Residuals on Straw Tubes (LOST)

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 89 -0.1246E-01 0.2469E-01

6.000 0.000 83.00 15.98 / 17 Constant 7.290 1.573 Mean -0.9172E-02 0.1951E-02 Sigma 0.1382E-01 0.2442E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 89 -0.1260E-01 0.2462E-01 6.000 0.000 83.00 20.12 / 18 Constant 6.572 1.625 Mean -0.8259E-02 0.1853E-02 Sigma 0.1312E-01 0.2845E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 89 -0.5218E-02 0.2702E-01

1.000 1.000 87.00 10.27 / 17 Constant 7.158 1.147 Mean -0.6565E-02 0.2229E-02 Sigma 0.1741E-01 0.2334E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 89 -0.7442E-02 0.1606E-01 3.000 0.000 86.00 10.86 / 16 Constant 7.740 1.364 Mean -0.7010E-02 0.2072E-02 Sigma 0.1606E-01 0.2571E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 89 -0.8976E-02 0.4030E-01

6.000 1.000 82.00 13.66 / 19 Constant 2.787 0.5480 Mean 0.7732E-03 0.8792E-02 Sigma 0.3492E-01 0.1420E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 43 -0.8900E-02 0.4653E-01 3.000 0.000 40.00 6.328 / 17 Constant 1.328 0.3484 Mean -0.1776E-01 0.5225E-01 Sigma 0.8014E-01 0.1004

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 89 -0.9324E-02 0.5090E-01

17.00 1.000 71.00 7.308 / 18 Constant 3.309 0.7078 Mean -0.1117E-01 0.5257E-02 Sigma 0.2481E-01 0.6825E-02

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 65 -0.1058E-01 0.4905E-01 17.00 0.000 48.00 8.451 / 14 Constant 3.229 7.598 Mean -0.3112 0.5502 Sigma 0.2363 0.2305

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 89 -0.3446E-02 0.4265E-01

6.000 0.000 83.00 19.04 / 18 Constant 2.791 0.5689 Mean -0.6300E-02 0.9902E-02 Sigma 0.3505E-01 0.1715E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 42 -0.5122E-02 0.5105E-01 1.000 0.000 41.00 4.855 / 15 Constant 1.530 0.4213 Mean 0.6703E-02 0.2886E-01 Sigma 0.5676E-01 0.6888E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 89 -0.2211E-01 0.4992E-01

18.00 0.000 71.00 8.511 / 15 Constant 7.351 17.43 Mean -0.5606 0.4689 Sigma 0.3433 0.2018

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 89 -0.3000E-01 0.5610E-01 1.000 73.00 15.00 1.167 / 4 Constant 1.280 0.7203 Mean 0.6512E-02 0.3398E-01 Sigma 0.4475E-01 0.7391E-01

cm counts

Z Residuals on Straw Tubes

0

2

4

6

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 89 1.675 1.386 0.000 0.000 89.00 16.13 / 28 Constant 4.286 0.7303 Mean 1.650 0.1840 Sigma 1.406 0.2188

cm counts

0

2

4

6

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 89 -2.594 1.786 0.000 0.000 89.00 18.45 / 27 Constant 3.142 0.5704 Mean -2.241 0.3300 Sigma 1.957 0.4664

cm counts

Residuals on Drift Chambers

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 39 -0.6895E-01 0.3844 3.000 5.000 31.00 1.843 / 8 Constant 22.31 61.63 Mean 2.264 0.7178 Sigma 1.016 0.6699

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 39 1.361 2.806 0.000 3.000 36.00 7.663 / 12 Constant 1.718 0.7557 Mean 1.483 1.568 Sigma 2.880 3.866

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 30 0.1832 0.3513 1.000 0.000 29.00 4.098 / 4 Constant 58.23 225.4 Mean 2.402 0.8858 Sigma 0.9056 0.4602

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 30 1.458 2.068 0.000 0.000 30.00 3.997 / 8 Constant 3.096 1.157 Mean 1.037 0.3809 Sigma 0.9870 0.7126

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36 -0.1450 0.3172 2.000 4.000 30.00 6.000 / 9 Constant 1.387 5.122 Mean 1.745 63.64 Sigma 6.580 181.2

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36 1.454 2.061 1.000 0.000 35.00 4.954 / 10 Constant 3.302 1.071 Mean 1.432 0.3065 Sigma 1.071 0.4644

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 33 0.7250E-01 0.5178 1.000 2.000 30.00 3.124 / 8 Constant 1.335 0.5045 Mean -0.5050E-01 0.4585 Sigma 0.4728 1.154

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 33 1.231 2.414 0.000 0.000 33.00 5.200 / 11 Constant 1.691 0.6352 Mean 1.046 0.6381 Sigma 1.654 1.162

cm counts

Residuals on OSIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 62 0.1013 0.2203 0.000 2.000 60.00 15.76 / 10 Constant 5.631 4.101 Mean 0.5010E-01 0.1441E-01 Sigma 0.5006E-01 0.2649E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 62 -0.3208E-01 0.2185 4.000 10.00 48.00 7.060 / 11 Constant 2.843 0.8121 Mean 0.3089E-02 0.3603E-01 Sigma 0.1119 0.5442E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 50 -0.1130 0.2598 3.000 0.000 47.00 8.718 / 9 Constant 7.023 1.868 Mean -0.4000E-01 0.6021E-02 Sigma 0.2995E-01 0.5998E-02

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 50 -0.9000E-01 0.2516 2.000 9.000 39.00 4.733 / 12 Constant 2.172 0.6036 Mean -0.6053E-01 0.8785E-01 Sigma 0.1470 0.6825

cm counts

Residuals on ISIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 64 -0.1161 0.2278 5.000 0.000 59.00 8.601 / 13 Constant 7.301 1.731 Mean -0.5502E-01 0.7439E-02 Sigma 0.4432E-01 0.8396E-02

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 64 -0.7235E-01 0.2102 3.000 10.00 51.00 4.888 / 9 Constant 2.813 0.7259 Mean -0.5396E-01 0.8211E-01 Sigma 0.1086 0.8905E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 64 0.5903E-01

0.2681 0.000 2.000 62.00 11.11 / 13 Constant 4.723 1.277 Mean 0.4162E-01 0.1664E-01 Sigma 0.7540E-01 0.2140E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 64 -0.4018E-01 0.3041 1.000 8.000 55.00 6.251 / 12 Constant 2.356 0.5787 Mean -0.2812E-01 0.7398E-01 Sigma 0.1306 0.9306E-01

cm counts