Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 563 -0.1977E-02 0.3556E-01

32.00 10.00 521.0 39.59 / 19 Constant 36.75 2.433 Mean 0.1337E-02 0.1026E-02 Sigma 0.1920E-01 0.1011E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 563 -0.2250E-02 0.3012E-01 47.00 4.000 512.0 31.31 / 19 Constant 37.04 2.394 Mean 0.1553E-02 0.1008E-02 Sigma 0.1925E-01 0.9691E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 563 -0.9375E-02 0.3172E-01

23.00 2.000 538.0 29.69 / 19 Constant 43.94 2.673 Mean -0.7166E-02 0.8683E-03 Sigma 0.1691E-01 0.7379E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 563 -0.1004E-01 0.2891E-01 30.00 1.000 532.0 23.63 / 19 Constant 44.34 2.676 Mean -0.6387E-02 0.8708E-03 Sigma 0.1708E-01 0.7402E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 563 0.2382E-04 0.5973E-01

46.00 13.00 504.0 29.40 / 19 Constant 25.87 1.979 Mean 0.3849E-02 0.1274E-02 Sigma 0.2056E-01 0.1328E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 306 0.3647E-02 0.6221E-01 46.00 5.000 255.0 11.54 / 18 Constant 9.712 1.154 Mean 0.1440E-02 0.4257E-02 Sigma 0.3318E-01 0.7540E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 563 -0.1391E-01 0.5677E-01

45.00 8.000 510.0 28.62 / 19 Constant 21.99 1.701 Mean -0.1325E-02 0.1840E-02 Sigma 0.2621E-01 0.2260E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 189 -0.1534E-01 0.6040E-01 24.00 4.000 161.0 28.01 / 19 Constant 15.30 26.06 Mean -0.6244 0.2490 Sigma 0.3545 0.8409E-01

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 563 0.1219E-02 0.5313E-01

54.00 12.00 497.0 24.25 / 19 Constant 27.39 2.015 Mean 0.4592E-02 0.1259E-02 Sigma 0.2076E-01 0.1297E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 302 -0.3719E-02 0.5426E-01 44.00 2.000 256.0 14.38 / 19 Constant 10.72 1.136 Mean -0.3887E-02 0.3146E-02 Sigma 0.2947E-01 0.4105E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 563 -0.1367E-01 0.5034E-01

46.00 5.000 512.0 33.72 / 19 Constant 27.97 2.036 Mean -0.6025E-02 0.1283E-02 Sigma 0.2057E-01 0.1277E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 563 -0.8688E-02 0.5024E-01 28.00 224.0 311.0 18.04 / 19 Constant 13.34 1.255 Mean 0.2267E-02 0.2502E-02 Sigma 0.2738E-01 0.2914E-02

cm counts

Z Residuals on Straw Tubes

0

10

20

30

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 563 1.619 1.551 0.000 0.000 563.0 40.79 / 35 Constant 28.59 1.588 Mean 1.643 0.6740E-01 Sigma 1.454 0.5341E-01

cm counts

0

10

20

30

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 563 -1.868 1.575 1.000 0.000 562.0 44.35 / 35 Constant 25.52 1.443 Mean -1.815 0.7900E-01 Sigma 1.649 0.6786E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 218 0.4744E-01 0.3372 17.00 30.00 171.0 16.18 / 17 Constant 11.97 1.606 Mean 0.2323E-01 0.1097E-01 Sigma 0.1014 0.1104E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 218 0.9017 1.495 1.000 2.000 215.0 31.89 / 16 Constant 23.63 3.256 Mean 0.7504 0.5996E-01 Sigma 0.7330 0.8692E-01

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 206 -0.6941E-01 0.3359 11.00 14.00 181.0 14.10 / 16 Constant 9.318 1.097 Mean -0.8771E-01 0.2559E-01 Sigma 0.1500 0.2325E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 206 1.660 1.579 0.000 0.000 206.0 13.73 / 17 Constant 17.40 1.744 Mean 1.413 0.8458E-01 Sigma 1.025 0.7691E-01

cm counts

Residuals on Drift Chambers

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 158 -0.5575E-01 0.4371 16.00 5.000 137.0 9.265 / 15 Constant 4.654 0.7127 Mean 0.6499E-01 0.1639 Sigma 0.3505 0.2838

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 158 2.254 1.706 2.000 1.000 155.0 21.67 / 16 Constant 13.12 1.690 Mean 2.317 0.9797E-01 Sigma 0.9374 0.1050

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 237 -0.8113E-01 0.2799 16.00 13.00 208.0 27.23 / 16 Constant 12.36 1.598 Mean -0.6970E-01 0.1832E-01 Sigma 0.1110 0.1564E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 237 1.333 1.587 3.000 3.000 231.0 9.514 / 18 Constant 21.02 1.937 Mean 1.202 0.7280E-01 Sigma 0.9917 0.6484E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 430 -0.4761E-01

0.2240 6.000 5.000 419.0 77.19 / 17 Constant 44.88 4.805 Mean -0.6461E-01 0.2839E-02 Sigma 0.4446E-01 0.3933E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 430 -0.4117E-01 0.2775 29.00 18.00 383.0 13.41 / 13 Constant 24.99 2.228 Mean -0.2541E-01 0.5982E-02 Sigma 0.7912E-01 0.6353E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 398 -0.2843E-02

0.2472 1.000 3.000 394.0 60.18 / 17 Constant 26.32 2.998 Mean -0.1712E-01 0.5001E-02 Sigma 0.7390E-01 0.7397E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 398 -0.4078E-01 0.3075 20.00 18.00 360.0 26.25 / 13 Constant 22.04 2.077 Mean -0.2375E-01 0.6296E-02 Sigma 0.7746E-01 0.6382E-02

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 442 0.3335E-01

0.2367 7.000 5.000 430.0 63.14 / 17 Constant 30.69 4.259 Mean 0.3819E-01 0.5235E-02 Sigma 0.6788E-01 0.8791E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 442 -0.3338E-01 0.3030 27.00 19.00 396.0 14.22 / 13 Constant 23.51 2.117 Mean -0.2515E-01 0.6618E-02 Sigma 0.8397E-01 0.7227E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 427 -0.9524E-02

0.2482 4.000 3.000 420.0 60.18 / 17 Constant 26.92 3.390 Mean -0.1224E-01 0.5089E-02 Sigma 0.7497E-01 0.8641E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 427 -0.3215E-01 0.3216 18.00 18.00 391.0 9.592 / 13 Constant 21.09 1.945 Mean -0.1953E-01 0.8027E-02 Sigma 0.9434E-01 0.9595E-02

cm counts