Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 802 -0.3667E-02 0.3305E-01

57.00 6.000 739.0 25.52 / 19 Constant 57.27 3.153 Mean 0.2496E-03 0.7650E-03 Sigma 0.1830E-01 0.7910E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 802 -0.4049E-02 0.3313E-01 58.00 4.000 740.0 31.86 / 19 Constant 56.71 3.214 Mean 0.3183E-03 0.7821E-03 Sigma 0.1857E-01 0.8590E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 802 -0.3354E-02 0.2759E-01

29.00 2.000 771.0 25.13 / 19 Constant 69.42 3.531 Mean -0.1156E-03 0.6408E-03 Sigma 0.1600E-01 0.5694E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 802 -0.3492E-02 0.2823E-01 27.00 3.000 772.0 21.80 / 19 Constant 69.31 3.505 Mean 0.5522E-03 0.6300E-03 Sigma 0.1613E-01 0.5706E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 802 -0.1920E-02 0.4387E-01

79.00 19.00 704.0 17.34 / 19 Constant 40.57 2.280 Mean -0.7129E-03 0.1151E-02 Sigma 0.2302E-01 0.1148E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 537 0.2066E-03 0.5117E-01 67.00 15.00 455.0 21.48 / 19 Constant 19.75 1.461 Mean -0.1764E-02 0.2618E-02 Sigma 0.3213E-01 0.3369E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 802 -0.2059E-02 0.3951E-01

48.00 6.000 748.0 21.01 / 19 Constant 46.88 2.541 Mean 0.2531E-02 0.1019E-02 Sigma 0.2199E-01 0.1039E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 402 -0.2097E-02 0.4556E-01 26.00 3.000 373.0 17.64 / 19 Constant 22.87 1.854 Mean -0.4550E-03 0.1388E-02 Sigma 0.2093E-01 0.1450E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 802 -0.4776E-02 0.4682E-01

86.00 7.000 709.0 13.21 / 19 Constant 38.42 2.230 Mean -0.6121E-03 0.1320E-02 Sigma 0.2540E-01 0.1533E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 457 -0.1120E-02 0.5327E-01 57.00 9.000 391.0 22.22 / 19 Constant 18.48 1.594 Mean 0.3730E-02 0.2071E-02 Sigma 0.2569E-01 0.2490E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 802 -0.4317E-02 0.4478E-01

50.00 8.000 744.0 21.04 / 19 Constant 44.22 2.412 Mean -0.2051E-04 0.1080E-02 Sigma 0.2258E-01 0.1079E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 802 0.6061E-03 0.4902E-01 15.00 721.0 66.00 9.672 / 17 Constant 2.657 0.5843 Mean 0.2234E-02 0.1337E-01 Sigma 0.3785E-01 0.2128E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 802 1.538 1.747 0.000 1.000 801.0 29.38 / 36 Constant 38.95 1.769 Mean 1.593 0.6078E-01 Sigma 1.551 0.4618E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 802 -1.873 1.576 1.000 0.000 801.0 41.99 / 36 Constant 39.61 1.794 Mean -1.852 0.5930E-01 Sigma 1.535 0.4497E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 336 -0.5286E-01 0.3209 37.00 19.00 280.0 20.27 / 17 Constant 21.13 1.963 Mean -0.2724E-01 0.6949E-02 Sigma 0.9178E-01 0.5800E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 336 1.529 1.695 3.000 3.000 330.0 20.87 / 19 Constant 29.67 2.565 Mean 1.314 0.6073E-01 Sigma 0.9173 0.5826E-01

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 312 -0.3917E-01 0.2917 19.00 9.000 284.0 25.67 / 17 Constant 16.66 1.563 Mean -0.1363E-01 0.9421E-02 Sigma 0.1114 0.7492E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 312 1.652 1.652 1.000 0.000 311.0 16.01 / 18 Constant 27.02 2.119 Mean 1.595 0.6931E-01 Sigma 1.029 0.5735E-01

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 340 0.3288E-01 0.3282 17.00 36.00 287.0 37.19 / 17 Constant 15.24 1.332 Mean 0.1026E-01 0.1195E-01 Sigma 0.1388 0.1024E-01

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 340 0.8171 1.793 1.000 2.000 337.0 19.64 / 17 Constant 30.87 2.613 Mean 0.7206 0.5939E-01 Sigma 0.9562 0.6504E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 395 -0.5546E-01 0.2707 33.00 21.00 341.0 15.11 / 17 Constant 25.06 1.864 Mean -0.4338E-01 0.8040E-02 Sigma 0.1119 0.6025E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 395 2.027 1.965 4.000 1.000 390.0 25.22 / 18 Constant 39.03 2.660 Mean 1.758 0.4699E-01 Sigma 0.8277 0.3361E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 625 -0.2018E-01

0.2726 9.000 9.000 607.0 39.20 / 17 Constant 41.12 3.129 Mean -0.3077E-01 0.4211E-02 Sigma 0.7831E-01 0.4960E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 625 0.4891E-02 0.3025 35.00 38.00 552.0 14.07 / 13 Constant 28.44 2.307 Mean -0.1690E-01 0.7691E-02 Sigma 0.1033 0.1075E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 616 -0.3683E-01

0.2601 9.000 10.00 597.0 41.85 / 17 Constant 38.50 2.726 Mean -0.2534E-01 0.4489E-02 Sigma 0.8299E-01 0.4701E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 616 -0.9116E-02 0.2907 36.00 37.00 543.0 12.69 / 13 Constant 31.71 2.386 Mean -0.2754E-01 0.6521E-02 Sigma 0.9303E-01 0.7544E-02

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 655 -0.6667E-03

0.2798 14.00 11.00 630.0 34.43 / 17 Constant 41.02 2.752 Mean 0.6279E-03 0.4291E-02 Sigma 0.8048E-01 0.4020E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 655 0.9029E-03 0.3186 31.00 37.00 587.0 9.970 / 13 Constant 28.60 2.171 Mean -0.3622E-01 0.1001E-01 Sigma 0.1135 0.1279E-01

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 641 0.9807E-02

0.2888 10.00 9.000 622.0 34.74 / 17 Constant 36.18 2.489 Mean 0.9900E-02 0.4980E-02 Sigma 0.9054E-01 0.5102E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 641 0.1452E-01 0.3179 35.00 48.00 558.0 11.35 / 13 Constant 31.36 2.410 Mean -0.1726E-01 0.6145E-02 Sigma 0.8973E-01 0.7103E-02

cm counts