Residuals on Straw Tubes (LOST)

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 116745 -0.3412E-02 0.3614E-01 0.1046E+05

1142. 0.1051E+06 557.0 / 19 Constant 8113. 35.51 Mean 0.3226E-03 0.6541E-04 Sigma 0.1875E-01 0.6211E-04

cm counts

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 116745 -0.3582E-02 0.3483E-01 0.1164E+05 843.0 0.1043E+06 564.0 / 19 Constant 8129. 35.60 Mean 0.2597E-03 0.6509E-04 Sigma 0.1867E-01 0.6167E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 116745 -0.2745E-02 0.3181E-01

4405. 678.0 0.1117E+06 812.1 / 19 Constant 9198. 38.83 Mean 0.7490E-04 0.5868E-04 Sigma 0.1777E-01 0.5514E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 116745 -0.2839E-02 0.3099E-01 5158. 375.0 0.1112E+06 836.7 / 19 Constant 9255. 39.07 Mean 0.9284E-04 0.5818E-04 Sigma 0.1765E-01 0.5457E-04

cm counts

Residuals on Straw Tubes (RIST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 116745 -0.2533E-02 0.5475E-01 0.1472E+05

2118. 0.9991E+05 91.60 / 19 Constant 4671. 24.18 Mean 0.8830E-03 0.1322E-03 Sigma 0.2743E-01 0.1629E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 70934 -0.3708E-02 0.5844E-01 0.1151E+05 1760.

0.5766E+05 27.35 / 19 Constant 2483. 17.30 Mean -0.2316E-03 0.2051E-03 Sigma 0.2999E-01 0.2724E-03

cm counts

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 116745 -0.4032E-02 0.5470E-01 0.1180E+05

2151. 0.1028E+06 203.3 / 19 Constant 5054. 25.62 Mean 0.7322E-03 0.1175E-03 Sigma 0.2586E-01 0.1397E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 62319 -0.5045E-02 0.5750E-01 0.1002E+05 1514.

0.5078E+05 54.61 / 19 Constant 2320. 16.99 Mean -0.2753E-04 0.1902E-03 Sigma 0.2774E-01 0.2364E-03

cm counts

Residuals on Straw Tubes (LEST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 116745 -0.2924E-02 0.5482E-01 0.1418E+05

2005. 0.1006E+06 106.3 / 19 Constant 4701. 24.23 Mean 0.1467E-02 0.1324E-03 Sigma 0.2752E-01 0.1635E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 64200 -0.3188E-02 0.5921E-01 0.1011E+05 1532.

0.5256E+05 52.23 / 19 Constant 2235. 16.47 Mean 0.2000E-02 0.2131E-03 Sigma 0.2960E-01 0.2795E-03

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 116745 -0.3798E-02 0.5483E-01 0.1228E+05

1837. 0.1026E+06 173.3 / 19 Constant 5063. 25.59 Mean 0.4655E-03 0.1163E-03 Sigma 0.2569E-01 0.1365E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 116745 -0.3178E-02 0.5868E-01 4463.

0.7811E+05 0.3418E+05 28.05 / 19 Constant 1447. 13.22 Mean 0.1017E-02 0.2684E-03 Sigma 0.2995E-01 0.3563E-03

cm counts

Z Residuals on Straw Tubes

0

1000

2000

3000

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 116745 -0.2041 3.484 546.0 188.0 0.1160E+06 27.29 / 37 Constant 2782. 13.28 Mean -0.1248 0.1587E-01 Sigma 3.095 0.2346E-01

cm counts

0

1000

2000

3000

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 116745 -0.1690 3.525 588.0 132.0 0.1160E+06 62.69 / 37 Constant 2719. 13.15 Mean -0.5763E-01 0.1669E-01 Sigma 3.182 0.2569E-01

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 32736 -0.3565E-01 0.4070 3147. 3150.

0.2644E+05 367.6 / 17 Constant 1211. 13.07 Mean -0.1830E-01 0.1574E-02 Sigma 0.1495 0.1787E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 32736 0.9828 2.112 261.0 1387.

0.3109E+05 557.8 / 19 Constant 2469. 20.96 Mean 1.001 0.7096E-02 Sigma 1.106 0.7257E-02

cm counts

0

500

1000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 34158 0.1629E-01 0.3874 2948. 2983.

0.2823E+05 62.26 / 17 Constant 1150. 12.00 Mean -0.1445E-01 0.2338E-02 Sigma 0.2016 0.3575E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 34158 1.147 1.925 157.0 223.0 0.3378E+05 218.9 / 19 Constant 2705. 20.78 Mean 1.231 0.6883E-02 Sigma 1.134 0.6457E-02

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36381 -0.4735E-02 0.3940 3588. 3653.

0.2914E+05 276.9 / 17 Constant 1413. 13.58 Mean 0.9527E-02 0.1445E-02 Sigma 0.1565 0.1679E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36381 1.089 2.246 648.0 458.0 0.3528E+05 250.4 / 19 Constant 2552. 19.72 Mean 1.188 0.7651E-02 Sigma 1.228 0.7508E-02

cm counts

0 500 1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 40715 0.8593E-02 0.3820 3110. 3096.

0.3451E+05 89.59 / 17 Constant 1902. 16.31 Mean -0.8584E-02 0.1076E-02 Sigma 0.1392 0.1157E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 40715 0.9629 2.132 271.0 511.0 0.3993E+05 118.4 / 19 Constant 2672. 19.30 Mean 1.059 0.8258E-02 Sigma 1.342 0.8236E-02

cm counts

Residuals on OSIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 71975 -0.4726E-02

0.2979 1036. 1129.

0.6981E+05 846.0 / 17 Constant 3794. 25.26 Mean -0.8046E-02 0.5350E-03 Sigma 0.1002 0.6125E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 71975 -0.2118E-01 0.3406 5809. 4800.

0.6137E+05 212.5 / 13 Constant 2845. 22.42 Mean -0.1766E-01 0.7922E-03 Sigma 0.1043 0.1041E-02

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 72778 -0.2733E-01

0.3000 1156. 1000.

0.7062E+05 2141. / 17 Constant 3815. 27.29 Mean -0.2731E-01 0.5230E-03 Sigma 0.9709E-01 0.6626E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 72778 -0.2282E-01 0.3432 6180. 5200.

0.6140E+05 272.8 / 13 Constant 2815. 22.38 Mean -0.2276E-01 0.8190E-03 Sigma 0.1048 0.1075E-02

cm counts

Residuals on ISIM

0

1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 78091 -0.1134E-01

0.3175 2262. 2011.

0.7382E+05 435.4 / 17 Constant 3531. 23.22 Mean -0.9100E-02 0.6356E-03 Sigma 0.1123 0.7609E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 78091 -0.1479E-01 0.3502 6576. 5555.

0.6596E+05 112.6 / 13 Constant 2835. 21.93 Mean -0.1164E-01 0.8656E-03 Sigma 0.1119 0.1201E-02

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 80023 0.1561E-01

0.3198 2360. 2519.

0.7514E+05 1640. / 17 Constant 3640. 25.24 Mean 0.1503E-01 0.5797E-03 Sigma 0.1054 0.7323E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 80023 -0.2320E-01 0.3522 7212. 5931.

0.6688E+05 292.8 / 13 Constant 2913. 22.69 Mean -0.2178E-01 0.8358E-03 Sigma 0.1076 0.1125E-02

cm counts