Residuals on Straw Tubes (LOST)

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 10 -0.4000E-02 0.1268E-01

0.000 0.000 10.00 0.5537 / 3 Constant 2.503 1.325 Mean 0.6018E-02 0.1179E-01 Sigma 0.1810E-01 0.1325E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 10 -0.4000E-02 0.1268E-01 0.000 0.000 10.00 0.5537 / 3 Constant 2.503 1.325 Mean 0.6018E-02 0.1179E-01 Sigma 0.1810E-01 0.1325E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 10 -0.8000E-03 0.1013E-01

0.000 0.000 10.00 1.297 / 3 Constant 1.696 0.7444 Mean -0.3493E-02 0.1423E-01 Sigma 0.2101E-01 0.1840E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 10 -0.4000E-03 0.1031E-01 0.000 0.000 10.00 1.348 / 3 Constant 1.652 0.7030 Mean -0.2656E-02 0.1624E-01 Sigma 0.2240E-01 0.2193E-01

cm counts

Residuals on Straw Tubes (RIST)

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 10 0.1320E-01 0.2451E-01

0.000 0.000 10.00 1.370 / 3 Constant 1.458 0.7653 Mean 0.6379E-02 0.1532E-01 Sigma 0.1952E-01 0.2887E-01

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 4 -0.2400E-01 0.3105E-01 0.000 0.000 4.000 -9999. / -1 Constant 2.066 10.70 Mean -0.2904E-02 0.3017 Sigma 0.1917E-01 0.3184

cm counts

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 10 0.8000E-02 0.2637E-01

0.000 0.000 10.00 0.2190E-03/ 6 Constant 1.007 0.3334 Mean -0.4431E-01 12.47 Sigma 0.4818 0.7858E+07

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 6 -0.2133E-01 0.3490E-01 0.000 0.000 6.000 0.3532 / 1 Constant 1.325 0.9358 Mean -0.7255E-02 0.1724E-01 Sigma 0.1509E-01 0.3626E-01

cm counts

Residuals on Straw Tubes (LEST)

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 10 0.6000E-02 0.2479E-01

0.000 0.000 10.00 0.4308 / 5 Constant 1.141 0.5450 Mean -0.2411E-02 0.4997E-01 Sigma 0.5063E-01 0.1357

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 8 -0.1250E-01 0.3149E-01 0.000 0.000 8.000 0.4140 / 3 Constant 1.177 0.6358 Mean -0.5521E-02 0.4085E-01 Sigma 0.3660E-01 0.9698E-01

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 10 0.8800E-02 0.2754E-01

0.000 0.000 10.00 0.4389 / 5 Constant 1.127 0.6486 Mean 0.2921E-01 0.3379 Sigma 0.1096 0.6462

cm counts

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 10 -0.1960E-01 0.2835E-01 0.000 5.000 5.000 0.1777E-03/ 1 Constant 1.002 3.183 Mean -0.6000E-02 0.3151 Sigma 0.7884E-01 0.4029

cm counts

Z Residuals on Straw Tubes

0 0.5 1 1.5 2

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 10 -0.7200 0.9527 0.000 0.000 10.00 0.7129 / 5 Constant 1.302 0.5738 Mean -1.108 2.128 Sigma 2.277 3.755

cm counts

0

1

2

3

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 10 -0.4800 1.288 0.000 0.000 10.00 1.203 / 5 Constant 4.811 23.57 Mean -40.44 47.81 Sigma 23.36 17.58

cm counts

Residuals on Drift Chambers

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 10 -0.8750E-01 0.3448 0.000 0.000 10.00 0.9395 / 3 Constant 1.848 1.053 Mean 0.2771E-01 0.3396E-01 Sigma 0.6795E-01 0.5049E-01

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 10 -0.2000 1.245 0.000 0.000 10.00 0.5182E-03/ 7 Constant 1.011 2.041 Mean 2.836 454.6 Sigma 21.84 1008.

cm counts

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 10 0.1050 0.3578 0.000 0.000 10.00 0.7038 / 3 Constant 2.166 6.719 Mean 0.2886 2.219 Sigma 0.3322 1.234

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 10 -0.7500E-01 1.756 0.000 0.000 10.00 0.2544E-03/ 7 Constant 1.003 0.3568 Mean -0.4839 57.53 Sigma 18.54 358.8

cm counts

Residuals on Drift Chambers

0

1

2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 10 -0.7500E-01 0.1226 0.000 0.000 10.00 0.7120 / 3 Constant 10.19 34.96 Mean -0.9867 1.241 Sigma 0.4768 0.4339

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 10 -0.4500 2.579 0.000 0.000 10.00 0.7832 / 4 Constant 4.077 18.74 Mean 54.29 27.83 Sigma 34.44 61.97

cm counts

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 10 0.6750E-01 0.1742 0.000 0.000 10.00 0.3618 / 3 Constant 11.10 42.38 Mean 0.8695 0.6642 Sigma 0.4289 0.5343

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 10 -0.5250 1.783 0.000 0.000 10.00 0.3992 / 6 Constant 83.03 385.2 Mean -158.3 86.63 Sigma 53.51 27.36

cm counts

Residuals on OSIM

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 9 -0.2556E-01 0.8153E-01

0.000 0.000 9.000 0.4163 / 3 Constant 1.688 1.043 Mean 0.4833E-02 0.4492E-01 Sigma 0.8593E-01 0.8000E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 9 -0.2333E-01 0.1193 0.000 0.000 9.000 0.4424 / 1 Constant 4.609 18.37 Mean 0.7483 1.747 Sigma 0.4870 0.9332

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 8 0.1500E-01 0.8292E-01

0.000 0.000 8.000 0.9618 / 2 Constant 1.817 1.835 Mean -0.1949E-01 0.3102E-01 Sigma 0.6464E-01 0.7979E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 8 -0.3500E-01 0.1178 0.000 0.000 8.000 0.5870 / 1 Constant 2.520 1.897 Mean 0.6050E-02 0.3448E-01 Sigma 0.7640E-01 0.6171E-01

cm counts

Residuals on ISIM

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 8 0.2500E-02 0.9324E-01

0.000 0.000 8.000 0.4266 / 3 Constant 1.151 0.8143 Mean -0.6991E-02 0.3701 Sigma 0.2240 0.8937

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 8 -0.3750E-01 0.1257 0.000 0.000 8.000 0.2978 / 1 Constant 1.418 4.294 Mean -0.2627E-01 0.8492E-01 Sigma 0.1047 0.1593

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 7 -0.1571E-01 0.8862E-01

0.000 0.000 7.000 0.3302 / 2 Constant 1.455 1.498 Mean 0.2086E-01 0.5339E-01 Sigma 0.8476E-01 0.1392

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 7 -0.2714E-01 0.1239 0.000 0.000 7.000 0.000 / 0 Constant 138.7 358.9 Mean -0.9991 0.7735 Sigma 0.3548 0.2251

cm counts