Residuals on Straw Tubes (LOST)

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 40 0.3590E-03 0.1008E-01

1.000 0.000 39.00 4.261 / 7 Constant 7.247 1.614 Mean -0.3231E-03 0.1458E-02 Sigma 0.7830E-02 0.1375E-02

cm counts

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 40 0.3590E-03 0.1008E-01 1.000 0.000 39.00 4.261 / 7 Constant 7.247 1.614 Mean -0.3231E-03 0.1458E-02 Sigma 0.7830E-02 0.1375E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 40 0.2000E-02 0.1265E-01

0.000 0.000 40.00 5.090 / 10 Constant 3.913 0.9085 Mean 0.2154E-02 0.3857E-02 Sigma 0.1612E-01 0.4769E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 40 0.1500E-02 0.1333E-01 0.000 0.000 40.00 4.384 / 11 Constant 3.837 0.8694 Mean 0.2062E-02 0.3557E-02 Sigma 0.1649E-01 0.4167E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 40 -0.1795E-02 0.3903E-01

1.000 0.000 39.00 6.831 / 12 Constant 2.829 0.7404 Mean 0.4471E-02 0.6760E-02 Sigma 0.2099E-01 0.1006E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 27 -0.7280E-02 0.3874E-01 2.000 0.000 25.00 1.064 / 8 Constant 2.477 0.6616 Mean 0.2288E-02 0.1222E-01 Sigma 0.2645E-01 0.1883E-01

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 40 0.4300E-02 0.1998E-01

0.000 0.000 40.00 10.71 / 14 Constant 2.148 0.5736 Mean 0.3866E-03 0.1224E-01 Sigma 0.2945E-01 0.1999E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 30 -0.5333E-03 0.1470E-01 0.000 0.000 30.00 7.684 / 11 Constant 1.973 0.6356 Mean -0.3870E-02 0.1056E-01 Sigma 0.2570E-01 0.1805E-01

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 40 -0.6316E-03 0.2586E-01

1.000 1.000 38.00 6.059 / 12 Constant 2.542 0.6045 Mean -0.3606E-02 0.8685E-02 Sigma 0.2650E-01 0.1276E-01

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 30 -0.3857E-02 0.3325E-01 2.000 0.000 28.00 4.175 / 12 Constant 2.341 0.7895 Mean 0.3287E-02 0.6633E-02 Sigma 0.2235E-01 0.1092E-01

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 40 -0.8000E-03 0.2138E-01

0.000 0.000 40.00 7.239 / 13 Constant 2.773 0.7782 Mean 0.9402E-03 0.6992E-02 Sigma 0.2377E-01 0.1100E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 40 0.3043E-02 0.1851E-01 0.000 17.00 23.00 3.698 / 11 Constant 1.611 0.5111 Mean -0.2279E-02 0.2369E-01 Sigma 0.3856E-01 0.3827E-01

cm counts

Z Residuals on Straw Tubes

0 1 2 3 4

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 40 0.1100 1.992 0.000 0.000 40.00 6.715 / 20 Constant 1.566 0.4039 Mean 0.1634 1.181 Sigma 3.335 2.325

cm counts

0

2

4

6

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 40 -0.2200 1.570 0.000 0.000 40.00 8.562 / 14 Constant 2.386 0.5659 Mean -0.8176 1.244 Sigma 2.670 1.565

cm counts

Residuals on Drift Chambers

0 2 4 6 8 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 40 -0.1571E-01 0.1700 1.000 0.000 39.00 6.071 / 8 Constant 7.587 1.939 Mean 0.6895E-02 0.8004E-02 Sigma 0.3973E-01 0.8014E-02

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 40 -0.5000E-01 2.096 0.000 0.000 40.00 5.742 / 15 Constant 2.723 0.7847 Mean 0.1075 0.3947 Sigma 1.547 0.6772

cm counts

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 40 -0.7372E-02 0.1170 0.000 1.000 39.00 4.788 / 7 Constant 7.465 1.997 Mean -0.2645E-02 0.1055E-01 Sigma 0.4671E-01 0.1325E-01

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 40 -0.2937 1.713 0.000 0.000 40.00 4.902 / 16 Constant 2.279 0.5030 Mean -0.3533 0.7149 Sigma 2.298 1.022

cm counts

Residuals on Drift Chambers

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 40 -0.2147E-01 0.1909 1.000 0.000 39.00 4.556 / 6 Constant 5.485 1.165 Mean 0.8586E-02 0.1837E-01 Sigma 0.7806E-01 0.1575E-01

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 40 0.3938 2.038 0.000 0.000 40.00 7.103 / 20 Constant 1.539 0.3850 Mean 0.3357 1.441 Sigma 3.938 2.783

cm counts

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 40 0.1938E-01 0.1410 0.000 0.000 40.00 10.70 / 8 Constant 4.007 1.099 Mean 0.7229E-02 0.1752E-01 Sigma 0.7195E-01 0.2169E-01

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 40 -0.2500 2.472 0.000 0.000 40.00 7.301 / 17 Constant 1.610 0.4148 Mean -1.034 2.642 Sigma 4.927 4.956

cm counts

Residuals on OSIM

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 38 0.3158E-02

0.1934 0.000 0.000 38.00 2.675 / 10 Constant 3.385 0.8554 Mean -0.2363E-01 0.2007E-01 Sigma 0.7998E-01 0.2470E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 38 0.2568E-01 0.2056 0.000 1.000 37.00 7.857 / 7 Constant 5.157 1.545 Mean 0.1817E-01 0.7805E-02 Sigma 0.3313E-01 0.8443E-02

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 36 0.1333E-01

0.1851 0.000 0.000 36.00 4.214 / 10 Constant 3.039 0.8768 Mean 0.1436E-03 0.2546E-01 Sigma 0.8621E-01 0.4213E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 36 0.3514E-01 0.1914 0.000 1.000 35.00 7.602 / 7 Constant 3.640 1.309 Mean -0.1641E-02 0.1674E-01 Sigma 0.5414E-01 0.2743E-01

cm counts

Residuals on ISIM

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 37 0.7297E-02

0.1884 0.000 0.000 37.00 2.362 / 9 Constant 3.229 0.8224 Mean 0.1102E-01 0.4088E-01 Sigma 0.9466E-01 0.5574E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 37 0.2444E-01 0.2110 0.000 1.000 36.00 8.466 / 6 Constant 4.902 1.459 Mean 0.1717E-01 0.8534E-02 Sigma 0.3301E-01 0.9094E-02

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 36 -0.2000E-01

0.1891 0.000 0.000 36.00 2.227 / 9 Constant 3.483 0.9200 Mean -0.2382E-01 0.2343E-01 Sigma 0.8889E-01 0.3146E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 36 0.3457E-01 0.1943 0.000 1.000 35.00 4.852 / 7 Constant 4.682 1.399 Mean 0.1460E-03 0.1120E-01 Sigma 0.4671E-01 0.1377E-01

cm counts