Residuals on Straw Tubes (LOST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 285 -0.4173E-03 0.1949E-01

5.000 2.000 278.0 5.391 / 12 Constant 38.09 3.087 Mean -0.1977E-02 0.7922E-03 Sigma 0.1157E-01 0.7391E-03

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 285 -0.5891E-03 0.1315E-01 10.00 0.000 275.0 4.824 / 12 Constant 38.60 3.114 Mean -0.1846E-02 0.7843E-03 Sigma 0.1146E-01 0.7228E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 285 -0.4421E-03 0.1140E-01

0.000 0.000 285.0 9.945 / 14 Constant 41.91 3.190 Mean -0.3068E-03 0.6674E-03 Sigma 0.1051E-01 0.5136E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 285 -0.4000E-03 0.1152E-01 0.000 0.000 285.0 10.54 / 14 Constant 41.21 3.139 Mean -0.1573E-03 0.6777E-03 Sigma 0.1068E-01 0.5244E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 285 -0.3455E-02 0.2631E-01

8.000 2.000 275.0 19.87 / 19 Constant 22.49 1.940 Mean -0.3661E-03 0.1174E-02 Sigma 0.1737E-01 0.1092E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 203 0.1083E-02 0.2390E-01 10.00 1.000 192.0 11.65 / 19 Constant 14.79 1.480 Mean -0.2021E-03 0.1553E-02 Sigma 0.1860E-01 0.1360E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 285 -0.1703E-02 0.2744E-01

2.000 0.000 283.0 25.77 / 19 Constant 22.93 1.966 Mean 0.9701E-03 0.1132E-02 Sigma 0.1687E-01 0.1028E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 179 0.2678E-02 0.2499E-01 2.000 0.000 177.0 11.35 / 17 Constant 14.23 1.482 Mean 0.2120E-02 0.1624E-02 Sigma 0.1803E-01 0.1431E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 285 -0.7626E-03 0.3191E-01

5.000 2.000 278.0 19.40 / 19 Constant 22.79 1.987 Mean -0.5856E-03 0.1151E-02 Sigma 0.1701E-01 0.1082E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 180 -0.1813E-02 0.2986E-01 8.000 1.000 171.0 12.24 / 17 Constant 13.76 1.401 Mean -0.4665E-03 0.1637E-02 Sigma 0.1796E-01 0.1318E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 285 -0.2851E-02 0.2425E-01

3.000 0.000 282.0 17.54 / 17 Constant 24.82 2.070 Mean 0.1120E-03 0.1095E-02 Sigma 0.1640E-01 0.9998E-03

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 285 -0.3838E-02 0.3186E-01 1.000 99.00 185.0 11.94 / 19 Constant 14.12 1.495 Mean -0.3363E-03 0.1557E-02 Sigma 0.1853E-01 0.1491E-02

cm counts

Z Residuals on Straw Tubes

0 5 10 15 20

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 285 -0.1112 1.501 0.000 0.000 285.0 42.30 / 34 Constant 12.72 1.050 Mean -0.1082 0.1078 Sigma 1.559 0.9343E-01

cm counts

0

5

10

15

20

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 285 -0.3123E-01 1.438 0.000 0.000 285.0 29.12 / 31 Constant 13.95 1.122 Mean -0.3022E-01 0.1017 Sigma 1.494 0.8809E-01

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 282 -0.1089E-01 0.2268 0.000 3.000 279.0 43.97 / 13 Constant 27.77 4.078 Mean 0.3975E-02 0.5526E-02 Sigma 0.6886E-01 0.8951E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 282 -0.4167E-01 1.587 0.000 0.000 282.0 29.90 / 28 Constant 16.43 1.440 Mean 0.1831 0.1043 Sigma 1.550 0.1061

cm counts

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 282 0.2248E-02 0.1941 4.000 0.000 278.0 34.29 / 13 Constant 30.84 3.015 Mean -0.8569E-02 0.4657E-02 Sigma 0.6473E-01 0.4477E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 282 0.2660E-01 1.594 0.000 0.000 282.0 11.76 / 28 Constant 17.18 1.332 Mean 0.1710E-01 0.1028 Sigma 1.582 0.8426E-01

cm counts

Residuals on Drift Chambers

0

20

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 284 0.6493E-02 0.2080 0.000 1.000 283.0 14.03 / 12 Constant 35.90 3.192 Mean -0.5265E-02 0.4622E-02 Sigma 0.6643E-01 0.4240E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 284 -0.1972 2.033 0.000 0.000 284.0 35.38 / 30 Constant 11.45 1.009 Mean -0.2448 0.1748 Sigma 2.246 0.1914

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 284 -0.7023E-02 0.1446 0.000 1.000 283.0 13.73 / 13 Constant 37.06 3.127 Mean 0.6115E-02 0.4353E-02 Sigma 0.6783E-01 0.3928E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 284 0.1532 2.073 0.000 0.000 284.0 34.70 / 29 Constant 14.42 1.223 Mean 0.3281 0.1159 Sigma 1.649 0.1019

cm counts

Residuals on OSIM

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 222 -0.1099E-01

0.2178 0.000 0.000 222.0 19.13 / 13 Constant 18.73 2.339 Mean 0.4025E-03 0.5548E-02 Sigma 0.6326E-01 0.6526E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 222 0.1057E-01 0.2103 7.000 3.000 212.0 15.20 / 13 Constant 15.58 2.006 Mean -0.1260E-01 0.7486E-02 Sigma 0.7797E-01 0.9854E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 210 0.1400E-01

0.2011 0.000 0.000 210.0 16.55 / 13 Constant 17.80 2.183 Mean 0.9723E-03 0.5509E-02 Sigma 0.6173E-01 0.5842E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 210 0.5025E-02 0.1760 6.000 3.000 201.0 13.14 / 13 Constant 16.05 1.916 Mean -0.3758E-02 0.6726E-02 Sigma 0.7008E-01 0.6847E-02

cm counts

Residuals on ISIM

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 227 0.1274E-01

0.2171 1.000 0.000 226.0 21.27 / 13 Constant 16.90 2.198 Mean 0.3547E-02 0.6408E-02 Sigma 0.6818E-01 0.7819E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 227 0.1215E-02 0.1975 8.000 5.000 214.0 13.92 / 13 Constant 14.46 1.793 Mean -0.5320E-02 0.8580E-02 Sigma 0.8600E-01 0.1126E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 216 -0.1630E-01

0.2107 0.000 0.000 216.0 19.87 / 13 Constant 17.39 2.368 Mean -0.3136E-02 0.5828E-02 Sigma 0.6167E-01 0.7034E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 216 -0.4348E-03 0.2173 6.000 3.000 207.0 11.49 / 12 Constant 15.54 1.960 Mean -0.1088E-01 0.7852E-02 Sigma 0.7659E-01 0.9905E-02

cm counts