Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 372 -0.1436E-02 0.2377E-01

10.00 0.000 362.0 8.922 / 13 Constant 51.81 3.453 Mean 0.3819E-03 0.5777E-03 Sigma 0.1053E-01 0.4195E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 372 -0.2144E-02 0.2119E-01 11.00 1.000 360.0 8.452 / 13 Constant 52.65 3.460 Mean 0.5583E-03 0.5697E-03 Sigma 0.1040E-01 0.3982E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 372 -0.4474E-03 0.1379E-01

1.000 0.000 371.0 14.80 / 15 Constant 49.79 3.382 Mean -0.5046E-04 0.6199E-03 Sigma 0.1138E-01 0.4943E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 372 0.5397E-05 0.1413E-01 1.000 0.000 371.0 15.35 / 14 Constant 48.80 3.360 Mean 0.1298E-03 0.6480E-03 Sigma 0.1154E-01 0.5214E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 372 -0.2313E-02 0.2898E-01

14.00 0.000 358.0 16.89 / 19 Constant 26.88 1.962 Mean 0.5013E-03 0.1236E-02 Sigma 0.1960E-01 0.1089E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 258 0.9878E-03 0.3232E-01 11.00 2.000 245.0 10.68 / 19 Constant 20.63 1.784 Mean 0.1984E-02 0.1206E-02 Sigma 0.1664E-01 0.9432E-03

cm counts

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 372 -0.6521E-04 0.2350E-01

4.000 0.000 368.0 27.73 / 19 Constant 29.22 2.217 Mean -0.3963E-04 0.1056E-02 Sigma 0.1796E-01 0.1033E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 230 -0.7489E-03 0.2482E-01 3.000 0.000 227.0 20.15 / 18 Constant 20.67 1.856 Mean 0.3305E-03 0.1173E-02 Sigma 0.1538E-01 0.8976E-03

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 372 -0.3282E-02 0.3068E-01

7.000 3.000 362.0 10.85 / 19 Constant 29.86 2.101 Mean -0.5129E-03 0.1035E-02 Sigma 0.1753E-01 0.8306E-03

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 247 -0.1330E-02 0.3359E-01 14.00 0.000 233.0 15.10 / 19 Constant 21.85 1.950 Mean 0.1940E-02 0.1066E-02 Sigma 0.1494E-01 0.8570E-03

cm counts

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 372 0.8055E-03 0.1971E-01

7.000 0.000 365.0 26.73 / 19 Constant 34.36 2.439 Mean 0.4125E-03 0.8839E-03 Sigma 0.1526E-01 0.7062E-03

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 372 -0.1881E-02 0.2480E-01 3.000 134.0 235.0 12.68 / 18 Constant 20.56 1.925 Mean -0.5693E-03 0.1206E-02 Sigma 0.1655E-01 0.1160E-02

cm counts

Z Residuals on Straw Tubes

0

10

20

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 372 -0.1328 1.554 0.000 0.000 372.0 36.98 / 33 Constant 16.94 1.197 Mean -0.6339E-01 0.9687E-01 Sigma 1.610 0.8575E-01

cm counts

0

10

20

30

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 372 -0.1667E-01 1.467 0.000 0.000 372.0 42.42 / 32 Constant 18.31 1.295 Mean -0.1182E-01 0.8597E-01 Sigma 1.458 0.7287E-01

cm counts

Residuals on Drift Chambers

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 368 0.1277E-01 0.1999 1.000 3.000 364.0 32.43 / 13 Constant 43.06 4.326 Mean -0.7175E-03 0.4021E-02 Sigma 0.6536E-01 0.5414E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 368 -0.6726E-01 1.592 0.000 0.000 368.0 24.97 / 30 Constant 21.60 1.493 Mean -0.5790E-01 0.9069E-01 Sigma 1.590 0.7375E-01

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 368 -0.1462E-01 0.1964 2.000 1.000 365.0 44.22 / 13 Constant 47.09 4.313 Mean 0.1792E-02 0.3584E-02 Sigma 0.5674E-01 0.3904E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 368 0.8492E-01 1.586 0.000 0.000 368.0 17.03 / 29 Constant 22.97 1.552 Mean 0.1224 0.8506E-01 Sigma 1.521 0.6727E-01

cm counts

Residuals on Drift Chambers

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 372 0.1176E-01 0.1706 1.000 1.000 370.0 14.97 / 13 Constant 46.34 3.218 Mean -0.3186E-03 0.3971E-02 Sigma 0.7002E-01 0.3039E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 372 0.1364 2.004 0.000 0.000 372.0 26.22 / 30 Constant 17.62 1.266 Mean 0.3207 0.1247 Sigma 1.970 0.1168

cm counts

0

20

40

60

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 372 -0.9527E-02 0.1278 1.000 1.000 370.0 9.792 / 12 Constant 50.39 3.645 Mean -0.5280E-03 0.3800E-02 Sigma 0.6685E-01 0.3397E-02

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 372 0.7796E-01 1.956 0.000 0.000 372.0 34.13 / 30 Constant 17.70 1.289 Mean 0.3474E-01 0.1161 Sigma 1.899 0.1084

cm counts

Residuals on OSIM

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 292 -0.4296E-02

0.2209 1.000 0.000 291.0 20.48 / 13 Constant 24.93 2.730 Mean 0.1145E-02 0.4847E-02 Sigma 0.6328E-01 0.5740E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 292 -0.3078E-01 0.2314 4.000 5.000 283.0 13.59 / 13 Constant 21.87 2.092 Mean -0.1053E-01 0.6311E-02 Sigma 0.7542E-01 0.6095E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 276 -0.1168E-02

0.2138 0.000 2.000 274.0 19.76 / 13 Constant 22.80 2.613 Mean 0.3185E-03 0.5349E-02 Sigma 0.6899E-01 0.7115E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 276 -0.2193E-01 0.2530 4.000 2.000 270.0 16.94 / 13 Constant 19.01 1.953 Mean -0.3526E-02 0.6850E-02 Sigma 0.8061E-01 0.7567E-02

cm counts

Residuals on ISIM

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 292 0.8419E-02

0.2463 1.000 0.000 291.0 24.74 / 13 Constant 21.50 2.472 Mean -0.5386E-02 0.5704E-02 Sigma 0.7124E-01 0.7447E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 292 -0.2846E-01 0.2313 3.000 4.000 285.0 11.92 / 13 Constant 21.59 2.054 Mean -0.1153E-01 0.6422E-02 Sigma 0.7747E-01 0.6356E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 282 0.4448E-02

0.2152 0.000 1.000 281.0 14.00 / 13 Constant 23.27 2.488 Mean 0.1218E-02 0.5303E-02 Sigma 0.6930E-01 0.6413E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 282 -0.2142E-01 0.2375 4.000 3.000 275.0 9.155 / 13 Constant 20.01 2.032 Mean -0.3013E-02 0.6882E-02 Sigma 0.8287E-01 0.8126E-02

cm counts