Residuals on Straw Tubes (LOST)

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 5 0.1240E-01 0.9330E-02

0.000 0.000 5.000 0.2442 / 1 Constant 1.546 1.200 Mean 0.1009E-01 0.9651E-02 Sigma 0.1407E-01 0.1720E-01

cm counts

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 5 0.1300E-01 0.1034E-01 1.000 0.000 4.000 0.1135E-03/ 1 Constant 1.005 0.1429 Mean 0.2186E-01 1.584 Sigma 0.1471 21.18

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 5 -0.8400E-02 0.5426E-02

0.000 0.000 5.000 0.000 / 0 Constant 10.83 64.38 Mean 0.2061 0.8571E-01 Sigma 0.1080 0.1722

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 5 -0.8400E-02 0.5426E-02 0.000 0.000 5.000 0.000 / 0 Constant 10.83 64.38 Mean 0.2061 0.8571E-01 Sigma 0.1080 0.1722

cm counts

Residuals on Straw Tubes (RIST)

0

1

2

3

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 5 -0.1240E-01 0.7419E-02

0.000 0.000 5.000 0.3012 / 1 Constant 7.904 40.24 Mean 0.1361 0.1554 Sigma 0.7653E-01 0.1376

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 4 0.1533E-01 0.1508E-01 1.000 0.000 3.000 -9999. / -1 Constant 2.059 6.546 Mean 0.2066E-01 0.2284 Sigma 0.2218E-01 0.2379

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 5 0.4000E-03 0.3115E-01

0.000 0.000 5.000 -9999. / -1 Constant 2.993 2.105 Mean 0.2286E-01 0.1813 Sigma 0.1948E-01 0.1191

cm counts

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 3 -0.1400E-01 0.1424E-01 0.000 0.000 3.000 0.000 / 0 Constant 1.054 1.458 Mean -0.1945E-01 0.7447E-01 Sigma 0.4326E-01 0.2969

cm counts

Residuals on Straw Tubes (LEST)

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 5 0.3000E-02 0.1775E-01

1.000 0.000 4.000 0.1826E-03/ 1 Constant 1.005 0.4903 Mean 0.5680E-02 0.7286 Sigma 0.1738 1.414

cm counts

0

0.5

1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 3 -0.4000E-02 0.1000E-01 1.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean -0.4000E-02 0.1285E-01 Sigma 0.1348E-01 0.2739

cm counts

0 0.5 1 1.5 2

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 5 0.9200E-02 0.1917E-01

0.000 0.000 5.000 0.3786 / 1 Constant 1.264 0.7930 Mean 0.9455E-02 0.6926E-01 Sigma 0.4864E-01 0.1481

cm counts

0 0.25 0.5 0.75 1

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 5 -0.1400E-01 0.9798E-02 0.000 2.000 3.000 0.000 / 0 Constant 1.004 0.8267 Mean -0.1400E-01 0.4793 Sigma 0.8829E-01 3.324

cm counts

Z Residuals on Straw Tubes

0 0.5 1 1.5 2

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 5 1.660 2.246 0.000 0.000 5.000 0.3062 / 1 Constant 1.396 2.305 Mean 2.142 3.470 Sigma 4.169 6.168

cm counts

0 0.25 0.5 0.75 1

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 5 -2.140 1.127 0.000 0.000 5.000 0.2856E-03/ 2 Constant 1.006 0.9919 Mean -2.102 39.39 Sigma 9.477 184.0

cm counts

Residuals on Drift Chambers

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 5 0.9750E-01 0.9823E-01 0.000 0.000 5.000 0.6878E-04/ 1 Constant 1.008 0.1406 Mean 0.1011 9.537 Sigma 0.7136 116.2

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 5 0.2500E-01 0.5385 0.000 0.000 5.000 0.3013E-04/ 2 Constant 1.004 0.4472 Mean 0.3839E-01 293.5 Sigma 7.398 0.5216E+08

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 5 -0.8250E-01 0.6205E-01 0.000 0.000 5.000 0.2136E-03/ 2 Constant 1.010 0.4473 Mean -0.1759 29.43 Sigma 0.8869 0.5601E+07

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 5 0.3250 1.427 0.000 0.000 5.000 0.1779E-03/ 2 Constant 1.006 1.623 Mean 0.7073 49.27 Sigma 12.29 264.0

cm counts

Residuals on Drift Chambers

0

1

2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 5 -0.1325 0.3793 0.000 0.000 5.000 0.000 / 0 Constant 10.99 67.07 Mean 0.8448 0.6621 Sigma 0.3817 0.6545

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 5 1.375 4.809 0.000 0.000 5.000 0.1572E-03/ 1 Constant 1.009 0.6594 Mean -2.014 86.32 Sigma 17.84 509.6

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 5 0.4250E-01 0.2040 0.000 0.000 5.000 0.1997E-03/ 1 Constant 1.008 0.5001 Mean -0.3338E-01 0.7758 Sigma 0.4075 0.2043E+06

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 5 -0.7500E-01 2.130 0.000 0.000 5.000 0.4919E-03/ 2 Constant 1.011 3.349 Mean -1.421 52.15 Sigma 14.76 222.8

cm counts

Residuals on OSIM

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 4 -0.7000E-01 0.7483E-01

0.000 0.000 4.000 0.000 / 0 Constant 1.021 0.8226 Mean -0.3000E-01 0.8182 Sigma 0.2008 0.2659

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 4 -0.2050 0.4246 0.000 0.000 4.000 0.000 / 0 Constant 1.008 0.9361 Mean -0.1037E-01 3.607 Sigma 0.7616 0.6352

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 5 -0.1800E-01

0.1844 0.000 0.000 5.000 0.000 / 0 Constant 1.009 0.5774 Mean 0.4073E-01 2.661 Sigma 0.1971 0.4909E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 5 -0.1620 0.3263 0.000 0.000 5.000 0.1914E-04/ 1 Constant 1.002 0.8088E-01 Mean 0.1144 15.53 Sigma 2.315 472.4

cm counts

Residuals on ISIM

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 4 0.7500E-01 0.7533E-01

0.000 0.000 4.000 0.000 / 0 Constant 1.000 0.2064E-01 Mean 0.3761E-01 4.513 Sigma 2.545 0.5570E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 4 -0.2000 0.4161 0.000 0.000 4.000 0.000 / 0 Constant 1.008 0.9361 Mean -0.1037E-01 3.607 Sigma 0.7616 0.6352

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 5 0.9000E-01

0.1802 0.000 0.000 5.000 0.000 / 0 Constant 1.018 0.6176 Mean -0.7043E-01 0.8510 Sigma 0.2581 0.3245

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 5 -0.1900 0.3998 0.000 0.000 5.000 0.6615E-04/ 1 Constant 1.008 0.5000 Mean 0.7575E-02 3.097 Sigma 0.7691 0.2058E+08

cm counts