Residuals on Straw Tubes (LOST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 33 0.3032E-02 0.9198E-02

2.000 0.000 31.00 3.069 / 7 Constant 4.763 1.260 Mean 0.3243E-02 0.2246E-02 Sigma 0.9943E-02 0.2615E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 33 0.3161E-02 0.8984E-02 2.000 0.000 31.00 3.824 / 6 Constant 4.612 1.351 Mean 0.2644E-02 0.5321E-02 Sigma 0.1071E-01 0.5682E-02

cm counts

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 33 -0.2727E-02 0.9261E-02

0.000 0.000 33.00 3.764 / 8 Constant 5.393 1.591 Mean -0.3470E-02 0.1981E-02 Sigma 0.8826E-02 0.2404E-02

cm counts

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 33 -0.2727E-02 0.9156E-02 0.000 0.000 33.00 3.011 / 8 Constant 5.369 1.380 Mean -0.2914E-02 0.1893E-02 Sigma 0.9127E-02 0.2029E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 33 0.2500E-03 0.2258E-01

0.000 1.000 32.00 7.268 / 10 Constant 2.671 2.200 Mean -0.6401E-04 0.6463E-02 Sigma 0.1908E-01 0.1202E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 27 0.8800E-03 0.1524E-01 2.000 0.000 25.00 5.192 / 10 Constant 1.735 0.5543 Mean -0.3631E-02 0.1556E-01 Sigma 0.3174E-01 0.3155E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 33 0.3939E-02 0.1912E-01

0.000 0.000 33.00 4.458 / 14 Constant 2.367 0.6923 Mean 0.5743E-02 0.7718E-02 Sigma 0.2541E-01 0.1328E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 23 -0.8695E-04 0.1542E-01 0.000 0.000 23.00 2.686 / 9 Constant 3.071 1.006 Mean 0.7804E-03 0.4070E-02 Sigma 0.1480E-01 0.6107E-02

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 33 0.3125E-02 0.2623E-01

1.000 0.000 32.00 5.401 / 12 Constant 1.895 0.5260 Mean 0.8254E-02 0.1280E-01 Sigma 0.2979E-01 0.1927E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 20 0.4316E-02 0.2429E-01 1.000 0.000 19.00 2.782 / 10 Constant 1.319 0.4894 Mean 0.3390E-02 0.2168E-01 Sigma 0.3945E-01 0.4558E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 33 -0.9091E-03 0.2183E-01

0.000 0.000 33.00 4.637 / 12 Constant 2.176 0.7355 Mean 0.2317E-02 0.9171E-02 Sigma 0.2669E-01 0.2133E-01

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 33 0.3636E-02 0.1562E-01 0.000 11.00 22.00 3.328 / 10 Constant 1.819 0.5786 Mean 0.8602E-02 0.2607E-01 Sigma 0.2713E-01 0.4332E-01

cm counts

Z Residuals on Straw Tubes

0

1

2

3

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 33 1.415 1.984 0.000 0.000 33.00 3.019 / 15 Constant 433.7 953.8 Mean -82.68 20.75 Sigma 25.18 5.702

cm counts

0 1 2 3 4

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 33 -2.173 1.486 0.000 0.000 33.00 6.596 / 16 Constant 5.134 14.86 Mean -60.98 43.13 Sigma 35.78 17.45

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 33 0.3144E-01 0.2463 0.000 0.000 33.00 6.951 / 7 Constant 4.238 1.563 Mean 0.2402E-01 0.1583E-01 Sigma 0.5428E-01 0.2900E-01

cm counts

0 1 2 3 4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 33 -0.1477 1.532 0.000 0.000 33.00 7.232 / 15 Constant 1.849 0.5662 Mean -0.2497 1.249 Sigma 2.437 2.472

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 33 -0.1477E-01 0.1913 0.000 0.000 33.00 3.686 / 7 Constant 3.640 1.258 Mean -0.1825E-01 0.5816E-01 Sigma 0.7854E-01 0.6032E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 33 0.2992 1.224 0.000 0.000 33.00 6.435 / 14 Constant 1.950 0.5217 Mean 0.2181 0.9272 Sigma 2.125 1.660

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 33 0.3598E-01 0.2083 0.000 0.000 33.00 4.077 / 8 Constant 3.914 1.064 Mean -0.3330E-01 0.2347E-01 Sigma 0.8710E-01 0.2775E-01

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 33 -0.4508 1.939 0.000 0.000 33.00 6.258 / 17 Constant 1.545 0.4533 Mean 1.027 2.626 Sigma 4.435 3.652

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 33 0.3409E-02 0.9551E-01 0.000 0.000 33.00 4.399 / 9 Constant 4.848 1.565 Mean 0.1045E-01 0.1285E-01 Sigma 0.5873E-01 0.1982E-01

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 33 0.4659 1.630 0.000 0.000 33.00 6.910 / 13 Constant 1.685 0.4409 Mean 0.5625 2.390 Sigma 4.268 5.290

cm counts

Residuals on OSIM

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 25 -0.3320E-01

0.2343 0.000 0.000 25.00 2.718 / 5 Constant 2.635 1.172 Mean 0.1597E-01 0.2754E-01 Sigma 0.7333E-01 0.4900E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 25 0.1957E-01 0.1931 2.000 0.000 23.00 0.7887 / 5 Constant 3.061 1.014 Mean 0.1402E-01 0.2253E-01 Sigma 0.6450E-01 0.2889E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 24 -0.3667E-01

0.2632 0.000 0.000 24.00 1.977 / 5 Constant 2.772 0.9782 Mean -0.5968E-03 0.3648E-01 Sigma 0.8477E-01 0.5189E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 24 0.2545E-01 0.1484 2.000 0.000 22.00 3.036 / 5 Constant 2.388 1.094 Mean -0.6667E-02 0.2657E-01 Sigma 0.6788E-01 0.5542E-01

cm counts

Residuals on ISIM

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 25 0.4400E-02

0.2142 0.000 0.000 25.00 2.929 / 6 Constant 2.610 0.9832 Mean -0.4824E-02 0.2882E-01 Sigma 0.7304E-01 0.4267E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 25 0.1500E-01 0.1909 1.000 0.000 24.00 1.431 / 5 Constant 3.300 1.188 Mean 0.4279E-02 0.2310E-01 Sigma 0.6117E-01 0.3388E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 25 0.1960E-01

0.2253 0.000 0.000 25.00 4.217 / 7 Constant 1.884 0.7669 Mean 0.2675E-02 0.3861E-01 Sigma 0.1006 0.5722E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 25 0.9167E-02 0.1900 1.000 0.000 24.00 1.608 / 5 Constant 2.683 1.003 Mean 0.1020E-01 0.4654E-01 Sigma 0.8304E-01 0.6111E-01

cm counts