Residuals on Straw Tubes (LOST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 186 -0.4581E-03 0.1603E-01

7.000 0.000 179.0 8.228 / 12 Constant 25.07 2.559 Mean -0.9390E-03 0.8853E-03 Sigma 0.1081E-01 0.7874E-03

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 186 -0.1775E-02 0.1300E-01 8.000 0.000 178.0 8.705 / 12 Constant 25.42 2.586 Mean -0.1148E-02 0.8638E-03 Sigma 0.1062E-01 0.7597E-03

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 186 -0.7312E-03 0.9990E-02

0.000 0.000 186.0 19.11 / 12 Constant 27.94 2.625 Mean -0.9257E-03 0.7915E-03 Sigma 0.9569E-02 0.5301E-03

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 186 -0.9032E-03 0.1015E-01 0.000 0.000 186.0 16.58 / 12 Constant 28.50 2.650 Mean -0.8177E-03 0.7661E-03 Sigma 0.9523E-02 0.5185E-03

cm counts

Residuals on Straw Tubes (RIST)

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 186 -0.1011E-02 0.2304E-01

8.000 0.000 178.0 15.20 / 18 Constant 14.06 1.472 Mean -0.5247E-03 0.1660E-02 Sigma 0.1839E-01 0.1482E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 124 0.3248E-03 0.2779E-01 7.000 0.000 117.0 24.54 / 16 Constant 8.072 1.325 Mean 0.9797E-02 0.2376E-02 Sigma 0.1837E-01 0.2916E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 186 0.4249E-02 0.2457E-01

1.000 0.000 185.0 18.30 / 19 Constant 15.07 1.465 Mean 0.2759E-02 0.1445E-02 Sigma 0.1721E-01 0.1074E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 126 -0.3344E-02 0.2612E-01 1.000 0.000 125.0 8.358 / 16 Constant 9.168 1.203 Mean 0.6770E-03 0.2293E-02 Sigma 0.2000E-01 0.2505E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 186 -0.3326E-02 0.3226E-01

5.000 0.000 181.0 17.49 / 17 Constant 13.39 1.392 Mean -0.1273E-02 0.1698E-02 Sigma 0.1861E-01 0.1484E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 124 -0.9824E-03 0.1892E-01 10.00 0.000 114.0 8.037 / 14 Constant 12.22 1.547 Mean 0.2349E-02 0.1442E-02 Sigma 0.1348E-01 0.1223E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 186 0.2753E-02 0.2548E-01

0.000 0.000 186.0 4.653 / 18 Constant 14.61 1.465 Mean 0.1113E-02 0.1605E-02 Sigma 0.1905E-01 0.1474E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 186 -0.1292E-02 0.2230E-01 2.000 71.00 113.0 18.46 / 17 Constant 7.148 1.037 Mean -0.5288E-02 0.2996E-02 Sigma 0.2232E-01 0.3352E-02

cm counts

Z Residuals on Straw Tubes

0

5

10

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 186 1.666 1.574 0.000 0.000 186.0 29.82 / 30 Constant 7.672 0.8873 Mean 1.636 0.1765 Sigma 1.702 0.1940

cm counts

0

5

10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 186 -1.648 1.469 0.000 0.000 186.0 18.63 / 30 Constant 8.621 0.8863 Mean -1.692 0.1419 Sigma 1.618 0.1406

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 184 0.1374E-01 0.2367 2.000 0.000 182.0 27.94 / 12 Constant 25.00 4.072 Mean -0.1472E-02 0.4464E-02 Sigma 0.4750E-01 0.6429E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 184 -0.1387 1.540 1.000 0.000 183.0 41.46 / 27 Constant 9.208 1.093 Mean 0.2024 0.1465 Sigma 1.579 0.1575

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 185 -0.4212E-02 0.2110 0.000 1.000 184.0 24.75 / 13 Constant 20.78 3.470 Mean 0.5075E-02 0.5602E-02 Sigma 0.6114E-01 0.8777E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 185 0.8152E-01 1.536 1.000 0.000 184.0 16.22 / 28 Constant 11.73 1.199 Mean 0.1342 0.1154 Sigma 1.421 0.1014

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 186 0.6793E-02 0.1932 2.000 0.000 184.0 19.59 / 12 Constant 19.02 2.003 Mean 0.3055E-03 0.7298E-02 Sigma 0.8063E-01 0.6323E-02

cm counts

0

5

10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 186 0.1048 2.219 0.000 0.000 186.0 24.52 / 29 Constant 8.240 0.9141 Mean -0.2586E-01 0.1715 Sigma 1.873 0.1740

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 186 -0.4704E-02 0.1420 0.000 0.000 186.0 14.77 / 13 Constant 21.83 2.277 Mean -0.1170E-01 0.6023E-02 Sigma 0.7084E-01 0.4941E-02

cm counts

0

5

10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 186 -0.1855 2.123 0.000 0.000 186.0 33.26 / 28 Constant 8.058 0.9806 Mean -0.1973 0.1906 Sigma 1.853 0.2085

cm counts

Residuals on OSIM

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 147 -0.3317E-01

0.2145 1.000 1.000 145.0 16.20 / 13 Constant 14.58 2.045 Mean 0.4776E-02 0.5678E-02 Sigma 0.5197E-01 0.5124E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 147 0.3014E-01 0.2158 1.000 3.000 143.0 15.04 / 12 Constant 11.18 1.757 Mean -0.2085E-02 0.8584E-02 Sigma 0.6493E-01 0.9015E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 149 0.1872E-01

0.2087 0.000 0.000 149.0 19.29 / 12 Constant 14.33 2.434 Mean -0.7096E-02 0.6642E-02 Sigma 0.5196E-01 0.7406E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 149 0.1764E-01 0.1971 3.000 2.000 144.0 10.45 / 13 Constant 12.04 1.740 Mean 0.3786E-02 0.6924E-02 Sigma 0.6409E-01 0.7236E-02

cm counts

Residuals on ISIM

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 148 0.3177E-01

0.2296 1.000 0.000 147.0 12.07 / 12 Constant 12.78 1.932 Mean -0.6439E-02 0.6636E-02 Sigma 0.6068E-01 0.7586E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 148 0.3552E-01 0.2293 1.000 2.000 145.0 25.18 / 13 Constant 13.55 2.877 Mean 0.5807E-02 0.7000E-02 Sigma 0.4644E-01 0.9070E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 152 -0.9868E-02

0.2271 0.000 1.000 151.0 28.21 / 13 Constant 14.81 2.336 Mean -0.4554E-03 0.5095E-02 Sigma 0.4622E-01 0.5479E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 152 0.2021E-01 0.1973 4.000 3.000 145.0 17.36 / 13 Constant 11.86 1.720 Mean 0.6490E-02 0.6782E-02 Sigma 0.6154E-01 0.6697E-02

cm counts