Residuals on Straw Tubes (LOST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 223 0.2489E-03 0.1428E-01

6.000 0.000 217.0 11.76 / 13 Constant 28.73 2.550 Mean 0.1349E-02 0.9074E-03 Sigma 0.1141E-01 0.6798E-03

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 223 -0.3779E-03 0.1804E-01 6.000 0.000 217.0 16.62 / 13 Constant 29.04 2.595 Mean 0.1565E-02 0.9167E-03 Sigma 0.1094E-01 0.6387E-03

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 223 0.3009E-02 0.1778E-01

1.000 0.000 222.0 24.88 / 14 Constant 26.97 2.359 Mean 0.9051E-03 0.8494E-03 Sigma 0.1149E-01 0.5986E-03

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 223 0.5045E-03 0.1712E-01 1.000 0.000 222.0 21.28 / 13 Constant 27.65 2.439 Mean 0.5550E-03 0.8822E-03 Sigma 0.1157E-01 0.6594E-03

cm counts

Residuals on Straw Tubes (RIST)

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 223 -0.1665E-02 0.2825E-01

8.000 0.000 215.0 14.99 / 18 Constant 16.93 1.624 Mean 0.1686E-02 0.1458E-02 Sigma 0.1814E-01 0.1325E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 161 0.5098E-03 0.2975E-01 7.000 1.000 153.0 22.18 / 18 Constant 12.32 1.616 Mean -0.2037E-02 0.1462E-02 Sigma 0.1524E-01 0.1515E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 223 -0.7156E-03 0.2553E-01

4.000 1.000 218.0 23.71 / 19 Constant 19.02 1.977 Mean -0.1141E-02 0.1170E-02 Sigma 0.1518E-01 0.1146E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 161 -0.2692E-02 0.2884E-01 4.000 1.000 156.0 14.06 / 18 Constant 13.19 1.503 Mean 0.2466E-02 0.1462E-02 Sigma 0.1610E-01 0.1282E-02

cm counts

Residuals on Straw Tubes (LEST)

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 223 -0.2488E-02 0.2567E-01

10.00 0.000 213.0 7.920 / 19 Constant 17.70 1.651 Mean -0.5686E-03 0.1319E-02 Sigma 0.1732E-01 0.1109E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 147 -0.2979E-03 0.3186E-01 5.000 1.000 141.0 20.11 / 16 Constant 9.990 1.299 Mean 0.3922E-02 0.2343E-02 Sigma 0.1922E-01 0.2477E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 223 0.3014E-03 0.2974E-01

4.000 0.000 219.0 11.82 / 18 Constant 17.06 1.616 Mean 0.5278E-03 0.1439E-02 Sigma 0.1836E-01 0.1319E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 223 -0.3437E-02 0.3662E-01 3.000 78.00 142.0 15.43 / 18 Constant 12.23 1.580 Mean 0.2237E-02 0.1521E-02 Sigma 0.1489E-01 0.1413E-02

cm counts

Z Residuals on Straw Tubes

0

5

10

15

-10 -5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 223 1.610 1.597 0.000 0.000 223.0 25.85 / 32 Constant 10.50 0.9825 Mean 1.820 0.1180 Sigma 1.512 0.1061

cm counts

0

5

10

15

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 223 -1.825 1.620 0.000 0.000 223.0 20.01 / 29 Constant 10.63 1.009 Mean -1.840 0.1259 Sigma 1.574 0.1282

cm counts

Residuals on Drift Chambers

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 220 -0.3096E-01 0.2197 5.000 1.000 214.0 31.45 / 12 Constant 30.80 4.233 Mean -0.3594E-02 0.5123E-02 Sigma 0.5000E-01 0.6192E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 220 0.1892 1.520 0.000 2.000 218.0 32.54 / 27 Constant 12.08 1.188 Mean 0.9717E-01 0.1239 Sigma 1.565 0.1173

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 220 0.2621E-01 0.1928 1.000 2.000 217.0 26.75 / 13 Constant 31.39 3.828 Mean 0.1140E-02 0.4044E-02 Sigma 0.4996E-01 0.4639E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 220 0.9532E-01 1.680 0.000 1.000 219.0 21.79 / 27 Constant 12.73 1.179 Mean 0.1088 0.1263 Sigma 1.576 0.1080

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 223 -0.4281E-02 0.1822 3.000 1.000 219.0 5.269 / 11 Constant 28.92 2.739 Mean 0.9748E-02 0.5098E-02 Sigma 0.6682E-01 0.4488E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 223 0.2562 2.052 0.000 0.000 223.0 20.48 / 29 Constant 10.96 1.050 Mean 0.1037 0.1473 Sigma 1.807 0.1352

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 222 0.2234E-01 0.1650 1.000 0.000 221.0 5.389 / 13 Constant 30.04 2.747 Mean -0.2508E-02 0.4800E-02 Sigma 0.6675E-01 0.3992E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 222 0.1937 2.175 0.000 0.000 222.0 34.09 / 27 Constant 9.623 0.9442 Mean -0.1241 0.1699 Sigma 1.931 0.1636

cm counts

Residuals on OSIM

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 173 0.2836E-01

0.1958 2.000 0.000 171.0 20.33 / 13 Constant 16.30 2.494 Mean 0.4219E-02 0.6287E-02 Sigma 0.5485E-01 0.6759E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 173 0.1241E-01 0.2165 4.000 3.000 166.0 26.40 / 13 Constant 12.04 1.760 Mean -0.1295E-02 0.7165E-02 Sigma 0.6488E-01 0.7671E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 164 0.6951E-02

0.1925 0.000 0.000 164.0 19.66 / 13 Constant 14.26 2.031 Mean 0.3883E-02 0.5960E-02 Sigma 0.5812E-01 0.6292E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 164 0.1846E-01 0.2001 3.000 5.000 156.0 7.983 / 13 Constant 10.50 1.386 Mean -0.5817E-02 0.9675E-02 Sigma 0.8376E-01 0.1028E-01

cm counts

Residuals on ISIM

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 175 -0.1855E-01

0.1984 2.000 0.000 173.0 17.16 / 12 Constant 15.44 2.168 Mean -0.6482E-02 0.6122E-02 Sigma 0.5873E-01 0.6787E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 175 0.7619E-02 0.2278 3.000 4.000 168.0 26.17 / 13 Constant 9.583 1.595 Mean -0.1775E-01 0.1065E-01 Sigma 0.8542E-01 0.1658E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 169 0.8683E-02

0.1821 1.000 1.000 167.0 18.77 / 13 Constant 13.93 1.824 Mean -0.1170E-02 0.6248E-02 Sigma 0.6200E-01 0.5962E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 169 0.1162E-01 0.2114 3.000 6.000 160.0 14.14 / 13 Constant 10.74 1.357 Mean -0.1668E-02 0.8605E-02 Sigma 0.7614E-01 0.7286E-02

cm counts