Residuals on Straw Tubes (LOST)

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 48538 -0.9969E-03 0.2262E-01

1173. 73.00 0.4729E+05 719.6 / 19 Constant 5313. 33.98 Mean -0.1222E-03 0.6388E-04 Sigma 0.1341E-01 0.5831E-04

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 48538 -0.1142E-02 0.2162E-01 1334. 32.00 0.4717E+05 736.6 / 19 Constant 5344. 34.20 Mean -0.1323E-03 0.6353E-04 Sigma 0.1332E-01 0.5799E-04

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 48538 -0.6441E-03 0.2198E-01

183.0 46.00 0.4831E+05 835.9 / 19 Constant 5374. 34.12 Mean -0.1724E-03 0.6375E-04 Sigma 0.1350E-01 0.5846E-04

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 48538 -0.9431E-03 0.2168E-01 225.0 27.00 0.4829E+05 832.4 / 19 Constant 5405. 34.28 Mean -0.1010E-03 0.6338E-04 Sigma 0.1343E-01 0.5801E-04

cm counts

Residuals on Straw Tubes (RIST)

0

1000

2000

3000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 48538 -0.3009E-02 0.4976E-01

2636. 564.0 0.4534E+05 136.2 / 19 Constant 2586. 18.89 Mean -0.5297E-03 0.1402E-03 Sigma 0.2268E-01 0.1500E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 35199 -0.2499E-02 0.5522E-01 2406. 618.0 0.3218E+05 135.3 / 19 Constant 1683. 15.19 Mean 0.2215E-04 0.1826E-03 Sigma 0.2366E-01 0.2045E-03

cm counts

0

1000

2000

3000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 48538 -0.2699E-02 0.4991E-01

2190. 562.0 0.4579E+05 120.8 / 19 Constant 2589. 18.83 Mean -0.3723E-03 0.1418E-03 Sigma 0.2292E-01 0.1525E-03

cm counts

0

500

1000

1500

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 34663 -0.2174E-02 0.5469E-01 1945. 594.0 0.3212E+05 118.7 / 19 Constant 1700. 15.29 Mean -0.2288E-03 0.1795E-03 Sigma 0.2343E-01 0.1995E-03

cm counts

Residuals on Straw Tubes (LEST)

0

1000

2000

3000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 48538 -0.3512E-02 0.4967E-01

2535. 535.0 0.4547E+05 116.7 / 19 Constant 2619. 19.01 Mean -0.6833E-03 0.1382E-03 Sigma 0.2250E-01 0.1462E-03

cm counts

0

500

1000

1500

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 33093 -0.2814E-02 0.5436E-01 2196. 567.0 0.3033E+05 116.6 / 19 Constant 1641. 15.04 Mean -0.2649E-03 0.1783E-03 Sigma 0.2294E-01 0.1932E-03

cm counts

0

1000

2000

3000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 48538 -0.2948E-02 0.4980E-01

2204. 494.0 0.4584E+05 138.3 / 19 Constant 2631. 19.10 Mean -0.4111E-03 0.1375E-03 Sigma 0.2247E-01 0.1460E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 48538 -0.2615E-02 0.5418E-01 1815.

0.1625E+05 0.3048E+05 82.69 / 19 Constant 1641. 14.96 Mean -0.1432E-03 0.1805E-03 Sigma 0.2319E-01 0.1963E-03

cm counts

Z Residuals on Straw Tubes

0

500

1000

1500

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 48538 -0.8758E-01 2.929 40.00 6.000 0.4849E+05 39.33 / 37 Constant 1279. 9.031 Mean -0.8822E-01 0.2289E-01 Sigma 3.057 0.3362E-01

cm counts

0

500

1000

1500

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 48538 -0.3355E-01 2.992 39.00 15.00 0.4848E+05 40.56 / 37 Constant 1286. 9.118 Mean -0.7695E-02 0.2169E-01 Sigma 2.961 0.3111E-01

cm counts

Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 36412 0.2338E-02 0.3646 1950. 1886.

0.3258E+05 597.6 / 13 Constant 1898. 19.64 Mean -0.1123E-02 0.9561E-03 Sigma 0.1115 0.1210E-02

cm counts

0 500 1000

1500

2000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 36413 0.1215E-01 1.935 54.00 55.00 0.3630E+05 64.20 / 30 Constant 2104. 14.58 Mean 0.1874E-01 0.9472E-02 Sigma 1.681 0.8211E-02

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 34902 -0.1544E-02 0.3446 1547. 1598.

0.3176E+05 722.2 / 13 Constant 1881. 19.72 Mean 0.1195E-02 0.9724E-03 Sigma 0.1126 0.1266E-02

cm counts

0 500 1000

1500

2000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 34902 0.6377E-02 1.860 44.00 46.00 0.3481E+05 34.68 / 30 Constant 2064. 14.37 Mean 0.2308E-02 0.9420E-02 Sigma 1.650 0.7865E-02

cm counts

Residuals on Drift Chambers

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 41681 0.2260E-02 0.3359 1420. 1342.

0.3892E+05 1182. / 13 Constant 2819. 25.50 Mean 0.9059E-03 0.6431E-03 Sigma 0.9326E-01 0.7393E-03

cm counts

0 500 1000

1500

2000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 41681 -0.1660E-01 2.210 29.00 23.00 0.4163E+05 22.04 / 30 Constant 1958. 13.13 Mean -0.2344E-01 0.1213E-01 Sigma 2.092 0.1207E-01

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 41017 0.3226E-03 0.3155 1291. 1288.

0.3844E+05 1201. / 13 Constant 2900. 26.23 Mean -0.3744E-03 0.6229E-03 Sigma 0.9157E-01 0.7195E-03

cm counts

0

500

1000

1500

2000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 41017 0.2677E-02 2.234 27.00 37.00 0.4095E+05 41.85 / 30 Constant 1912. 12.98 Mean -0.4279E-02 0.1239E-01 Sigma 2.109 0.1248E-01

cm counts

Residuals on OSIM

0

250

500

750

1000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 14131 -0.5185E-05

0.2954 286.0 286.0 0.1356E+05 181.5 / 13 Constant 762.6 12.32 Mean 0.6984E-04 0.1210E-02 Sigma 0.8940E-01 0.1506E-02

cm counts

0 200 400 600 800

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 14131 -0.5433E-03 0.2924 576.0 504.0 0.1305E+05 72.78 / 13 Constant 721.7 11.56 Mean -0.1003E-02 0.1330E-02 Sigma 0.9431E-01 0.1649E-02

cm counts

0

250

500

750

1000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 13819 0.4480E-02

0.2944 243.0 225.0 0.1335E+05 186.8 / 13 Constant 748.7 12.28 Mean -0.6877E-03 0.1232E-02 Sigma 0.8997E-01 0.1561E-02

cm counts

0 200 400 600 800

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 13819 -0.2106E-02 0.2943 492.0 479.0 0.1285E+05 60.32 / 13 Constant 713.3 11.45 Mean -0.1945E-02 0.1351E-02 Sigma 0.9499E-01 0.1675E-02

cm counts

Residuals on ISIM

0

200 400

600 800

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 12467 0.3542E-03

0.3039 322.0 345.0 0.1180E+05 140.6 / 13 Constant 647.7 11.36 Mean -0.8224E-03 0.1320E-02 Sigma 0.8979E-01 0.1652E-02

cm counts

0

200

400

600

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 12468 -0.8661E-03 0.3026 531.0 448.0 0.1149E+05 61.73 / 13 Constant 615.6 10.61 Mean 0.3205E-03 0.1459E-02 Sigma 0.9528E-01 0.1810E-02

cm counts

0 200 400 600 800

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 12239 -0.3389E-02

0.2988 277.0 270.0 0.1169E+05 174.1 / 13 Constant 649.5 11.48 Mean 0.7343E-03 0.1322E-02 Sigma 0.9004E-01 0.1691E-02

cm counts

0

200

400

600

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 12239 -0.6720E-03 0.2950 476.0 438.0 0.1132E+05 49.55 / 13 Constant 622.1 10.66 Mean 0.5589E-04 0.1453E-02 Sigma 0.9533E-01 0.1798E-02

cm counts