Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 180 0.1334E-01 0.2393 2.000 0.000 178.0 28.58 / 12 Constant 24.51 4.006 Mean -0.2969E-02 0.4537E-02 Sigma 0.4655E-01 0.6297E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 180 -0.1138 1.526 1.000 0.000 179.0 34.29 / 25 Constant 9.021 1.015 Mean 0.4805E-01 0.1632 Sigma 1.719 0.1702

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 180 0.6601E-02 0.1953 2.000 0.000 178.0 17.29 / 12 Constant 18.86 2.009 Mean -0.1036E-02 0.7193E-02 Sigma 0.7914E-01 0.6187E-02

cm counts

0 2.5 5 7.5 10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 180 0.1292 2.243 0.000 0.000 180.0 22.76 / 29 Constant 7.920 0.8958 Mean -0.3328E-02 0.1772 Sigma 1.898 0.1834

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 4 0.3125E-01 0.3698E-01 0.000 0.000 4.000 0.4191E-04/ 1 Constant 1.004 0.5038 Mean 0.3994E-01 0.9320 Sigma 0.4139 0.8444

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 4 -1.250 1.746 0.000 0.000 4.000 0.4298E-04/ 1 Constant 1.003 0.6006 Mean -0.9406 138.8 Sigma 20.40 1117.

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 185 -0.4212E-02 0.2110 0.000 1.000 184.0 24.75 / 13 Constant 20.78 3.470 Mean 0.5075E-02 0.5602E-02 Sigma 0.6114E-01 0.8777E-02

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 185 0.8152E-01 1.536 1.000 0.000 184.0 16.22 / 28 Constant 11.73 1.199 Mean 0.1342 0.1154 Sigma 1.421 0.1014

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0

1

2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 6 0.1250E-01 0.1118 0.000 0.000 6.000 0.7104E-01/ 1 Constant 10.16 37.64 Mean 1.367 1.643 Sigma 0.7017 0.9480

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 6 -0.6250 1.080 0.000 0.000 6.000 0.4056 / 2 Constant 1.193 0.6318 Mean -0.9909 5.322 Sigma 3.342 10.73

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 186 -0.4704E-02 0.1420 0.000 0.000 186.0 14.77 / 13 Constant 21.83 2.277 Mean -0.1170E-01 0.6023E-02 Sigma 0.7084E-01 0.4941E-02

cm counts

0

5

10

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 186 -0.1855 2.123 0.000 0.000 186.0 33.26 / 28 Constant 8.058 0.9806 Mean -0.1973 0.1906 Sigma 1.853 0.2085

cm counts

Residuals on OSIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 5 -0.9000E-01

0.2339 0.000 0.000 5.000 0.5511E-06/ 1 Constant 0.9997 0.8785 Mean 0.1715E-01 7.347 Sigma 6.177 43.31

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 5 -0.3000E-01 0.1403 0.000 0.000 5.000 0.3388 / 1 Constant 1.326 0.7996 Mean -0.4275E-01 0.2802 Sigma 0.2957 0.5071

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 101 -0.2840E-01

0.1999 0.000 1.000 100.0 13.85 / 13 Constant 10.44 1.774 Mean -0.5910E-04 0.6317E-02 Sigma 0.5062E-01 0.6154E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 101 0.5469E-01 0.2015 1.000 2.000 98.00 28.38 / 20 Constant 9.914 1.756 Mean 0.1425E-01 0.6374E-02 Sigma 0.4747E-01 0.6094E-02

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 37 -0.2622E-01

0.2400 0.000 0.000 37.00 7.537 / 8 Constant 1.917 0.9239 Mean 0.1186 0.4414 Sigma 0.2319 0.4092

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 37 -0.1973E-01 0.2500 0.000 0.000 37.00 6.071 / 14 Constant 1.921 0.5183 Mean 0.6719E-01 0.1007 Sigma 0.2153 0.1615

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 1 -0.1000E-01 0.2137E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 1 -0.7000E-01 0.6527E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.7000E-01 337.1 Sigma 21.50 1.414

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 2 0.000 0.000 1.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 2 -0.1700 0.1297E-08 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1700 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 5 -0.1380 0.2065 0.000 0.000 5.000 0.2402E-03/ 1 Constant 1.007 1.317 Mean -0.3237E-01 3.273 Sigma 0.5980 13.37

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 5 -0.2000E-02 0.5879E-01 0.000 0.000 5.000 0.7432E-01/ 1 Constant 54.50 213.9 Mean -1.384 1.221 Sigma 0.5052 0.3322

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 92 0.2826E-01

0.2079 0.000 0.000 92.00 13.16 / 10 Constant 8.228 2.084 Mean -0.1134E-02 0.1167E-01 Sigma 0.5826E-01 0.1340E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 92 0.3689E-01 0.2078 1.000 1.000 90.00 22.03 / 20 Constant 7.367 1.702 Mean 0.1638E-01 0.1013E-01 Sigma 0.6961E-01 0.1610E-01

cm counts

Residuals on OSIM - module 8

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 2 -0.1000E-01 0.2000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.386 15.51 Mean -0.1000E-01 0.2164E-01 Sigma 0.2474E-01 0.4233

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 2 -0.2258E-07 0.1700 0.000 0.000 2.000 -9999. / -1 Constant 1.278 14.24 Mean 0.9817E-07 0.2458 Sigma 0.2438 5.616

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 51 0.1745E-01

0.2062 0.000 0.000 51.00 7.728 / 12 Constant 3.754 1.187 Mean 0.7783E-02 0.1699E-01 Sigma 0.7252E-01 0.2708E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 51 -0.1458E-01 0.1824 2.000 1.000 48.00 10.07 / 18 Constant 3.074 0.9932 Mean 0.1253E-01 0.2883E-01 Sigma 0.1341 0.5469E-01

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 22 -0.2909E-01

0.1624 0.000 0.000 22.00 4.375 / 7 Constant 1.506 1.156 Mean -0.6739E-02 0.1083 Sigma 0.1730 0.2400

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 22 0.4364E-01 0.2113 0.000 0.000 22.00 5.069 / 9 Constant 1.594 0.6971 Mean 0.2819E-02 0.1132 Sigma 0.2232 0.2008

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 1 0.1500 0.9740E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1500 337.1 Sigma 21.50 2.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 1 0.000 0.000 1.000 0.000 0.000

cm counts

Residuals on ISIM - module 2

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 106 0.5629E-01

0.2290 1.000 0.000 105.0 6.995 / 10 Constant 9.651 1.556 Mean 0.6734E-02 0.9132E-02 Sigma 0.6347E-01 0.9181E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 106 0.4553E-01 0.2430 1.000 2.000 103.0 28.41 / 25 Constant 3.755 0.8483 Mean 0.1849E-01 0.2027E-01 Sigma 0.1348 0.3131E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 3

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 14 -0.6429E-01

0.2980 0.000 0.000 14.00 0.4323 / 6 Constant 1.137 0.5471 Mean 0.1040E-01 0.2192 Sigma 0.1954 0.6186

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 14 -0.2429E-01 0.1537 0.000 0.000 14.00 1.236 / 8 Constant 1.147 0.4548 Mean -0.8742E-01 0.3061 Sigma 0.3633 0.8327

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 3 0.1033 0.2029 0.000 0.000 3.000 -9999. / -1 Constant 1.623 18.15 Mean -0.4000E-01 0.7383E-02 Sigma 0.1016E-01 0.1173

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 3 -0.3000E-01 0.4899E-01 0.000 0.000 3.000 0.000 / 0 Constant 1.004 0.8229 Mean -0.3000E-01 2.388 Sigma 0.4412 16.50

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 22 -0.3636E-02

0.2762 0.000 0.000 22.00 1.337 / 7 Constant 1.549 0.5409 Mean 0.1637E-01 0.9500E-01 Sigma 0.1587 0.1622

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 22 -0.3762E-01 0.2644 1.000 0.000 21.00 2.022 / 10 Constant 1.427 0.5061 Mean -0.3060E-01 0.1242 Sigma 0.2170 0.2212

cm counts

Residuals on ISIM - module 6

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 2 -0.3000E-01 0.1062E-09

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean -0.3000E-01 73.98 Sigma 4.525 2.000

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 2 0.1200 0.9000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.295 14.48 Mean 0.1200 0.1232 Sigma 0.1252 2.710

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 116 -0.2017E-01

0.2018 0.000 0.000 116.0 18.36 / 13 Constant 11.38 2.080 Mean -0.2695E-02 0.6136E-02 Sigma 0.5030E-01 0.7338E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 116 0.2732E-01 0.1720 1.000 3.000 112.0 30.77 / 26 Constant 9.436 1.727 Mean 0.4450E-02 0.7513E-02 Sigma 0.6215E-01 0.9294E-02

cm counts

Residuals on ISIM - module 7

0 500 1000

1500

2000 x 10^4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 1 0.5000E-01 0.3564E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.2238E+08 0.2939E-10 Mean 0.5000E-01 0.6344E-09 Sigma 0.1210E-08 8.336

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 1 -0.3100 0.1238E-08 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.833 Mean -0.4001 325.9 Sigma 4.956 0.4225E+05

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 11 -0.6364E-02

0.2351 0.000 0.000 11.00 0.3343 / 3 Constant 21.45 84.05 Mean 1.366 0.6207 Sigma 0.5690 0.5393

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 11 -0.1000E-01 0.1401 0.000 0.000 11.00 0.8407 / 6 Constant 1.167 0.4790 Mean 0.1707E-01 0.8409 Sigma 0.5799 2.272

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 1 0.000 0.000 1.000 0.000 0.000

cm counts