Residuals on Drift Ch. - module 1

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 237 0.5437E-01 0.3936 9.000 19.00 209.0 16.25 / 17 Constant 11.15 1.349 Mean 0.3217E-01 0.1246E-01 Sigma 0.1242 0.1360E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 237 0.6165 1.220 1.000 0.000 236.0 8.459 / 16 Constant 23.76 2.265 Mean 0.7522 0.6722E-01 Sigma 0.9218 0.6926E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 1 -0.1250E-01 0.4659E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1154E-02 Mean -0.8907E-02 1.166 Sigma 9.702 0.4496E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 1 0.1250 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1250 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 169 -0.6283E-01 0.3847 11.00 8.000 150.0 33.41 / 17 Constant 4.886 0.7827 Mean 0.1260 0.2506 Sigma 0.2516 0.2183

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 169 2.250 1.271 2.000 1.000 166.0 17.99 / 16 Constant 15.30 1.763 Mean 2.219 0.8760E-01 Sigma 0.9273 0.8773E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 5 0.000 0.000 3.000 0.000 2.000

cm counts

0

0.5

1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 5 -1.625 6.561 1.000 1.000 3.000 -9999. / -1 Constant 1.317 14.67 Mean 3.000 1.392 Sigma 0.8424 17.10

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 228 -0.5030E-01 0.2632 6.000 11.00 211.0 21.69 / 16 Constant 10.80 1.091 Mean -0.9698E-01 0.3939E-01 Sigma 0.1873 0.3599E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 228 1.346 1.234 0.000 0.000 228.0 14.36 / 19 Constant 19.90 1.769 Mean 1.437 0.7645E-01 Sigma 1.051 0.6326E-01

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 253 -0.7126E-01 0.1878 13.00 6.000 234.0 23.83 / 16 Constant 13.96 1.261 Mean -0.8339E-01 0.2040E-01 Sigma 0.1457 0.1533E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 253 0.7890 1.772 0.000 0.000 253.0 10.35 / 18 Constant 23.66 2.057 Mean 0.8786 0.6441E-01 Sigma 0.9235 0.5321E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 2 -0.3000E-01 0.6000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.3000E-01 0.7878E-01 Sigma 0.8174E-01 1.697

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 2 -0.9000E-01 0.8430E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.7138E-02 Mean -0.1170 2.768 Sigma 6.505 0.3675E+09

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 21 -0.1460 0.2326 0.000 1.000 20.00 2.064 / 4 Constant 1.591 0.7354 Mean -0.9491E-01 0.4646E-01 Sigma 0.8459E-01 0.7186E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 21 0.1000E-01 0.2110 0.000 1.000 20.00 1.249 / 7 Constant 1.195 1.725 Mean -0.3475 4.847 Sigma 0.9365 4.965

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 166 -0.6092E-01

0.2209 3.000 0.000 163.0 26.00 / 16 Constant 8.132 1.304 Mean -0.7838E-01 0.1544E-01 Sigma 0.1091 0.2174E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 166 0.4333E-01 0.3197 7.000 6.000 153.0 16.73 / 18 Constant 6.436 1.131 Mean 0.3231E-01 0.1790E-01 Sigma 0.1131 0.2438E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 371 -0.5849E-01

0.2400 0.000 1.000 370.0 49.72 / 17 Constant 34.96 4.892 Mean -0.7959E-01 0.5136E-02 Sigma 0.5416E-01 0.7153E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 371 0.1243E-01 0.2806 20.00 14.00 337.0 41.21 / 19 Constant 16.57 1.900 Mean -0.4756E-02 0.1382E-01 Sigma 0.1031 0.1577E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 21 -0.2795 0.1806 0.000 0.000 21.00 1.119 / 2 Constant 1.330 0.7451 Mean -0.1749 0.2481 Sigma 0.1129 0.3577

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 21 0.2263E-01 0.1514 0.000 2.000 19.00 1.261 / 9 Constant 7.616 23.68 Mean -2.884 3.110 Sigma 1.536 1.139

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 2 -0.2200 0.5000E-01

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1845E-01 Mean -0.2188 5.604 Sigma 5.091 0.1454E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 2 0.000 0.000 0.000 1.000 1.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 192 -0.1017 0.2552 3.000 0.000 189.0 15.91 / 15 Constant 16.17 2.211 Mean -0.7604E-01 0.5687E-02 Sigma 0.5773E-01 0.6428E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 192 -0.3267E-01 0.2780 13.00 7.000 172.0 27.26 / 17 Constant 11.05 1.760 Mean -0.4495E-01 0.1265E-01 Sigma 0.6820E-01 0.1371E-01

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 1 0.000 0.000 1.000 0.000 0.000

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 314 -0.7849E-01

0.2005 0.000 3.000 311.0 37.07 / 16 Constant 24.47 2.613 Mean -0.7683E-01 0.6432E-02 Sigma 0.6783E-01 0.6740E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 314 -0.1730E-01 0.3097 19.00 10.00 285.0 15.71 / 18 Constant 15.23 13.82 Mean -0.1813 0.2451 Sigma 0.2088 0.9387E-01

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 2 0.5000E-01

0.2400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.6888E-02 Mean -0.1343 6.501 Sigma 12.42 0.9246E+05

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 2 0.3900 0.4200 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 48 0.5128E-01

0.2278 1.000 0.000 47.00 6.574 / 12 Constant 2.397 0.6884 Mean 0.2342E-01 0.5370E-01 Sigma 0.1606 0.1166

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 48 0.8000E-01 0.2323 1.000 1.000 46.00 6.304 / 10 Constant 2.218 0.6410 Mean 0.2797E-01 0.6488E-01 Sigma 0.1686 0.1231

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 120 0.1139 0.2106 0.000 3.000 117.0 16.17 / 14 Constant 7.443 1.200 Mean 0.8515E-01 0.1430E-01 Sigma 0.8798E-01 0.1544E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 120 0.5702E-01 0.2811 2.000 4.000 114.0 12.36 / 17 Constant 5.293 1.008 Mean 0.2301E-01 0.2002E-01 Sigma 0.1082 0.2694E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 4 -0.1250 0.1830 0.000 0.000 4.000 0.000 / 0 Constant 1.008 7.585 Mean -0.2444 23.01 Sigma 1.890 0.1252E+06

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 4 -0.7000E-01 0.3082 0.000 0.000 4.000 0.000 / 0 Constant 1.004 1.075 Mean 0.1041 11.87 Sigma 1.710 3.757

cm counts

Residuals on ISIM - module 4

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 410 0.6838E-01

0.2239 2.000 0.000 408.0 52.75 / 17 Constant 28.64 3.236 Mean 0.5957E-01 0.5680E-02 Sigma 0.7442E-01 0.7836E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 410 0.1070E-01 0.2878 29.00 12.00 369.0 37.44 / 19 Constant 19.37 2.431 Mean -0.7557E-02 0.1127E-01 Sigma 0.8945E-01 0.1482E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 14 -0.5857E-01

0.3004 0.000 0.000 14.00 1.211 / 5 Constant 1.188 0.5615 Mean 0.5796E-01 0.4871 Sigma 0.3652 1.076

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 14 -0.1800E-01 0.1931 2.000 2.000 10.00 0.7679E-04/ 4 Constant 1.015 1.543 Mean 2.198 92.89 Sigma 11.41 182.0

cm counts

Residuals on ISIM - module 5

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 41 0.1500 0.2431 1.000 1.000 39.00 1.733 / 8 Constant 1.759 4.482 Mean 1.421 8.879 Sigma 1.753 6.617

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 41 -0.6588E-01 0.2970 4.000 3.000 34.00 5.983 / 11 Constant 1.360 0.5831 Mean 0.4647E-01 0.2430 Sigma 0.3184 0.5550

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 1 0.5000E-01 0.3564E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 1 0.2500 0.1460E-08 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.2746E-01 Mean 0.1784 8.369 Sigma 5.091 0.1003E+09

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 2 0.2900 0.8942E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.8973E-02 Mean 0.2037 6.975 Sigma 13.01 0.5943E+05

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 133 0.9892E-01

0.2838 1.000 2.000 130.0 11.40 / 16 Constant 9.891 1.584 Mean 0.6557E-01 0.7529E-02 Sigma 0.6105E-01 0.7535E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 133 -0.3479E-01 0.3293 9.000 3.000 121.0 13.49 / 16 Constant 5.076 0.8871 Mean -0.6818E-01 0.5520 Sigma 0.1817 0.2455

cm counts

Residuals on ISIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 4 0.9667E-01 0.8219E-01

1.000 0.000 3.000 0.000 / 0 Constant 1.008 0.5700 Mean 0.5071E-01 1.196 Sigma 0.7601 1.414

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 4 0.4333E-01 0.2015 1.000 0.000 3.000 -9999. / -1 Constant 1.303 14.58 Mean 0.1800 0.9378E-01 Sigma 0.9615E-01 2.029

cm counts

0 10 20 30 40 50

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 383 0.6307E-01

0.2103 2.000 0.000 381.0 41.21 / 17 Constant 29.25 2.762 Mean 0.6583E-01 0.5091E-02 Sigma 0.7104E-01 0.5926E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 383 -0.2267E-01 0.3047 25.00 14.00 344.0 27.76 / 19 Constant 21.75 18.21 Mean -0.1931 0.3186 Sigma 0.1833 0.1446

cm counts