Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 219 -0.1099 0.4120 19.00 9.000 191.0 26.83 / 17 Constant 7.900 10.14 Mean -0.2741 0.4301 Sigma 0.2714 0.1642

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 219 1.637 1.222 0.000 51.00 168.0 23.65 / 15 Constant 19.38 2.784 Mean 1.416 0.6373E-01 Sigma 0.7018 0.8687E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 5 -0.1792 0.1852 0.000 2.000 3.000 -9999. / -1 Constant 1.289 14.41 Mean -0.7500E-01 0.1918 Sigma 0.1931 4.263

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 5 4.812 2.146 0.000 1.000 4.000 -0.2000E+05/ -2 Constant 2.000 1.414 Mean 3.125 20.07 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 329 -0.6010E-01 0.3170 20.00 17.00 292.0 46.39 / 17 Constant 13.91 1.494 Mean -0.2958E-01 0.1570E-01 Sigma 0.1252 0.1311E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 329 1.265 1.524 5.000 2.000 322.0 17.75 / 19 Constant 29.84 2.447 Mean 1.298 0.5822E-01 Sigma 0.9642 0.5725E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 5 0.1250E-01 0.1500 0.000 3.000 2.000 -9999. / -1 Constant 1.287 14.37 Mean 0.1250E-01 0.2108 Sigma 0.2116 4.709

cm counts

0

0.5

1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 5 1.975 6.334 0.000 0.000 5.000 -9999. / -1 Constant 1.284 14.34 Mean 0.5000 2.401 Sigma 2.301 51.60

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.5 1 1.5 2

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 4 0.2917E-01 0.1179E-01 0.000 1.000 3.000 -9999. / -1 Constant 2.578 19.66 Mean 0.2901E-01 0.6332E-01 Sigma 0.1198E-01 0.9358E-01

cm counts

0 0.5 1 1.5 2

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 4 2.000 1.386 0.000 0.000 4.000 0.000 / 0 Constant 3.831 12.06 Mean 9.936 24.77 Sigma 5.679 10.39

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 286 0.6844E-01 0.2887 9.000 12.00 265.0 17.89 / 16 Constant 15.16 1.443 Mean 0.8088E-01 0.1620E-01 Sigma 0.1337 0.1415E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 286 1.086 1.609 0.000 0.000 286.0 15.66 / 19 Constant 27.32 2.315 Mean 1.218 0.5956E-01 Sigma 0.9201 0.5364E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 230 0.3227E-01 0.2937 8.000 7.000 215.0 19.34 / 17 Constant 13.80 1.378 Mean 0.3153E-01 0.1081E-01 Sigma 0.1161 0.8685E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 230 1.408 1.823 0.000 0.000 230.0 18.31 / 19 Constant 14.89 1.528 Mean 1.368 0.1087 Sigma 1.312 0.1195

cm counts

Residuals on OSIM - module 1

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 67 -0.2063E-01

0.2664 2.000 1.000 64.00 12.51 / 13 Constant 3.786 1.129 Mean 0.2852E-01 0.1706E-01 Sigma 0.8363E-01 0.2562E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 67 0.1333E-01 0.2404 4.000 3.000 60.00 6.826 / 12 Constant 3.135 0.6878 Mean -0.6768E-01 0.1301 Sigma 0.1946 0.1118

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 398 0.9899E-02

0.2497 1.000 2.000 395.0 40.22 / 17 Constant 30.02 3.314 Mean -0.2372E-02 0.4441E-02 Sigma 0.6629E-01 0.6149E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 398 -0.7529E-02 0.2853 20.00 30.00 348.0 26.61 / 19 Constant 17.59 1.800 Mean -0.1660E-01 0.1834E-01 Sigma 0.1134 0.1830E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 2 -0.3100 0.3000 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 2 0.000 0.000 1.000 0.000 1.000

cm counts

Residuals on OSIM - module 3

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 205 0.5931E-01

0.2549 0.000 3.000 202.0 63.02 / 17 Constant 7.637 1.518 Mean 0.1300E-01 0.1343E-01 Sigma 0.9416E-01 0.1999E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 205 -0.1256E-01 0.2630 11.00 14.00 180.0 15.08 / 18 Constant 9.662 1.471 Mean 0.9761E-02 0.1226E-01 Sigma 0.9616E-01 0.1612E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 32 -0.3072 0.2769 3.000 0.000 29.00 2.788 / 6 Constant 1.799 1.646 Mean -0.1192 0.3038E-01 Sigma 0.7205E-01 0.5542E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 32 0.3963E-01 0.2280 1.000 4.000 27.00 3.206 / 8 Constant 1.431 0.4581 Mean 0.2782E-02 0.5830 Sigma 0.3537 1.035

cm counts

Residuals on OSIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 2 -0.7000E-01 0.8000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.299 14.53 Mean -0.7000E-01 0.1083 Sigma 0.1106 2.367

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 2 0.000 0.000 0.000 1.000 1.000

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 381 -0.1181 0.2466 2.000 0.000 379.0 53.49 / 17 Constant 23.53 4.639 Mean -0.2128 0.6852E-01 Sigma 0.1563 0.3484E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 381 -0.2251E-01 0.2781 21.00 26.00 334.0 34.20 / 19 Constant 15.58 1.498 Mean -0.3271E-01 0.2324E-01 Sigma 0.1215 0.1894E-01

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 205 -0.9039E-01

0.2398 1.000 0.000 204.0 24.33 / 16 Constant 18.13 9.854 Mean -0.2251 0.1783 Sigma 0.1242 0.8672E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 205 0.1746E-02 0.2876 6.000 10.00 189.0 11.80 / 17 Constant 9.811 1.710 Mean -0.7848E-01 0.8452E-01 Sigma 0.1664 0.5306E-01

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 226 -0.1471E-01

0.2497 3.000 2.000 221.0 22.94 / 17 Constant 13.22 1.630 Mean -0.3352E-01 0.8948E-02 Sigma 0.9032E-01 0.1031E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 226 -0.1427E-01 0.2804 7.000 13.00 206.0 29.16 / 19 Constant 10.26 1.342 Mean -0.6133E-01 0.5882E-01 Sigma 0.1322 0.3818E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 12 -0.6500E-01

0.1567 0.000 0.000 12.00 0.4119 / 5 Constant 1.183 0.5866 Mean -0.6189E-01 0.1042 Sigma 0.1308 0.2863

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 12 0.1150 0.2852 0.000 0.000 12.00 0.7408 / 4 Constant 1.275 0.8685 Mean 0.3795E-01 0.1314 Sigma 0.1349 0.2688

cm counts

Residuals on ISIM - module 2

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 405 -0.2348E-01

0.2379 1.000 2.000 402.0 43.60 / 17 Constant 30.89 3.185 Mean -0.1991E-01 0.4575E-02 Sigma 0.6621E-01 0.5591E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 405 -0.1056E-01 0.2797 25.00 24.00 356.0 34.33 / 19 Constant 17.99 1.612 Mean -0.3967E-01 0.2642E-01 Sigma 0.1188 0.1987E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 8 0.1250E-01

0.4040 0.000 0.000 8.000 0.3630E-03/ 1 Constant 1.010 0.6301 Mean -0.4099E-01 1.579 Sigma 0.5245 7.221

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 8 -0.1386 0.3272 1.000 0.000 7.000 -9999. / -1 Constant 1.295 14.48 Mean 0.2000E-01 0.1232 Sigma 0.1252 2.710

cm counts

Residuals on ISIM - module 3

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 99 -0.9522E-01

0.2997 7.000 0.000 92.00 10.76 / 14 Constant 3.946 0.7849 Mean -0.2657E-01 0.2134E-01 Sigma 0.1079 0.2728E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 99 0.7471E-02 0.2627 4.000 8.000 87.00 16.08 / 18 Constant 3.386 0.8200 Mean 0.3867E-01 0.2594E-01 Sigma 0.1249 0.4236E-01

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 3 -0.3100 0.3581 0.000 0.000 3.000 -9999. / -1 Constant 1.303 14.58 Mean -0.6000E-01 0.9345E-01 Sigma 0.9615E-01 2.029

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 3 0.7000E-01 0.1020 0.000 0.000 3.000 0.000 / 0 Constant 1.004 0.2147 Mean -0.7180E-01 32.26 Sigma 1.796 518.5

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 149 0.1661 0.2573 0.000 1.000 148.0 7.953 / 13 Constant 10.49 1.499 Mean 0.1020 0.1144E-01 Sigma 0.7325E-01 0.1118E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 149 0.1075E-01 0.2999 8.000 8.000 133.0 18.43 / 18 Constant 6.650 1.282 Mean -0.2458E-01 0.3960E-01 Sigma 0.1139 0.4085E-01

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 2 0.4200 0.3300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1875E-01 Mean 0.1157 8.559 Sigma 4.344 0.2697E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 2 0.000 0.000 1.000 0.000 1.000

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 436 0.1021 0.2289 1.000 4.000 431.0 71.04 / 17 Constant 23.54 2.789 Mean 0.1297 0.2526E-01 Sigma 0.1124 0.2687E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 436 -0.2632E-01 0.2831 20.00 25.00 391.0 25.53 / 19 Constant 18.46 1.629 Mean -0.3064E-01 0.2525E-01 Sigma 0.1305 0.2132E-01

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 67 0.5645E-01

0.3606 5.000 0.000 62.00 8.403 / 10 Constant 1180. 3256. Mean 4.178 0.5186 Sigma 1.126 0.2735

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 67 0.4897E-01 0.2781 4.000 5.000 58.00 7.821 / 14 Constant 1.818 0.4727 Mean -0.5221E-01 0.2493 Sigma 0.3683 0.3443

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 0 0.000 0.000 0.000 0.000 0.000

cm counts