Residuals on Drift Ch. - module 1

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 216 0.4744E-01 0.3372 15.00 30.00 171.0 16.18 / 17 Constant 11.97 1.606 Mean 0.2323E-01 0.1097E-01 Sigma 0.1014 0.1104E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 216 0.8034 1.100 1.000 2.000 213.0 31.89 / 16 Constant 23.63 3.256 Mean 0.7504 0.5996E-01 Sigma 0.7330 0.8692E-01

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 2 0.6250E-01 0.6177E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6016E-02 Mean 0.5314E-01 0.9903 Sigma 2.743 0.4430E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 2 4.125 0.2500 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 3.875 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 155 -0.5602E-01 0.4232 15.00 5.000 135.0 9.265 / 15 Constant 4.654 0.7127 Mean 0.6499E-01 0.1639 Sigma 0.3505 0.2838

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 155 2.278 1.686 1.000 0.000 154.0 20.68 / 15 Constant 13.14 1.685 Mean 2.317 0.9785E-01 Sigma 0.9360 0.1041

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 5 0.6250E-01 0.6177E-09 4.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6016E-02 Mean 0.5314E-01 0.9903 Sigma 2.743 0.4430E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 5 0.000 0.000 2.000 2.000 1.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 2 0.000 0.000 2.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 2 0.000 0.000 0.000 0.000 2.000

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 204 -0.7014E-01 0.3367 10.00 14.00 180.0 14.14 / 16 Constant 9.247 1.097 Mean -0.9003E-01 0.2612E-01 Sigma 0.1505 0.2389E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 204 1.636 1.568 0.000 0.000 204.0 12.77 / 17 Constant 17.42 1.742 Mean 1.412 0.8428E-01 Sigma 1.023 0.7635E-01

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 3 0.000 0.000 1.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 3 -1.375 0.000 1.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -1.375 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 232 -0.8182E-01 0.2804 12.00 13.00 207.0 26.74 / 16 Constant 12.29 1.590 Mean -0.7064E-01 0.1849E-01 Sigma 0.1113 0.1581E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 232 1.297 1.493 1.000 1.000 230.0 9.514 / 18 Constant 21.02 1.937 Mean 1.202 0.7280E-01 Sigma 0.9917 0.6484E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 2 -0.3200 0.1700 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.5459E-02 Mean -0.1059 5.247 Sigma 12.66 0.1198E+06

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 2 0.2500 0.2600 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 15 -0.1143E-01

0.4034 0.000 1.000 14.00 0.2039 / 1 Constant 2.035 2.712 Mean -0.7871E-01 0.2435E-01 Sigma 0.4850E-01 0.6136E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 15 0.7000E-01 0.3621 2.000 3.000 10.00 0.000 / 0 Constant 111.3 343.6 Mean -0.4269 0.3595 Sigma 0.1522 0.1089

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 140 -0.6597E-01

0.2241 5.000 1.000 134.0 26.19 / 15 Constant 11.92 3.013 Mean -0.1011 0.7996E-02 Sigma 0.5145E-01 0.1416E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 140 -0.3976E-01 0.2987 9.000 8.000 123.0 23.87 / 15 Constant 7.726 1.532 Mean -0.5223E-02 0.1136E-01 Sigma 0.6484E-01 0.1331E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 5

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 267 -0.8229E-01

0.2244 3.000 2.000 262.0 44.60 / 17 Constant 33.43 4.111 Mean -0.1011 0.3098E-02 Sigma 0.3821E-01 0.3774E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 267 0.1557E-02 0.2838 16.00 7.000 244.0 28.76 / 18 Constant 12.92 1.882 Mean 0.1723E-01 0.9716E-02 Sigma 0.9489E-01 0.1626E-01

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 18 -0.2922 0.2276 0.000 0.000 18.00 -9999. / -1 Constant 2.578 10.84 Mean -0.1232 0.2771E-01 Sigma 0.9587E-02 0.4165E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 18 -0.3000E-01 0.1418 2.000 2.000 14.00 2.228 / 5 Constant 1.623 0.7189 Mean 0.2536E-01 0.9015E-01 Sigma 0.1563 0.1470

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 4 -0.2000 0.2300 0.000 2.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 4 0.5600 0.2900 1.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3886E-01 Mean 0.1986 13.48 Sigma 4.514 0.7614E+07

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 137 -0.6956E-01

0.2425 1.000 0.000 136.0 21.24 / 16 Constant 10.84 2.038 Mean -0.6431E-01 0.6959E-02 Sigma 0.5859E-01 0.9698E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 137 -0.9500E-01 0.3148 8.000 5.000 124.0 5.240 / 12 Constant 8.688 10.36 Mean -0.2034 0.5265 Sigma 0.2019 0.2491

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 2 0.2200 0.1300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1875E-01 Mean 0.1157 8.559 Sigma 4.344 0.2697E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 2 -0.3000E-01 0.1062E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 242 -0.4107E-01

0.2478 0.000 0.000 242.0 39.91 / 15 Constant 22.84 3.772 Mean -0.7108E-01 0.4515E-02 Sigma 0.5290E-01 0.8201E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 242 -0.7885E-01 0.3025 9.000 7.000 226.0 17.93 / 15 Constant 20.48 13.72 Mean -0.2206 0.1824 Sigma 0.1643 0.6901E-01

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 9 0.6750E-01

0.3773 1.000 0.000 8.000 0.000 / 0 Constant 1.005 0.6361 Mean 0.9077E-01 6.916 Sigma 0.6763 79.64

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 9 0.2778E-01 0.4520 0.000 0.000 9.000 0.4970E-04/ 1 Constant 1.005 0.6880 Mean 0.3228E-01 12.44 Sigma 0.7324 331.8

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 34 0.8871E-01

0.2721 2.000 1.000 31.00 3.872 / 9 Constant 1.741 3.662 Mean 0.9457 5.695 Sigma 1.188 4.075

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 34 0.4200E-01 0.3672 1.000 3.000 30.00 2.891 / 6 Constant 12.05 45.11 Mean -2.041 1.610 Sigma 1.017 0.4275

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 97 0.6333E-01

0.2301 1.000 3.000 93.00 24.30 / 14 Constant 7.988 1.905 Mean 0.9734E-01 0.7180E-02 Sigma 0.4407E-01 0.9089E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 97 -0.2084E-01 0.3231 7.000 7.000 83.00 13.12 / 14 Constant 7.766 8.949 Mean -0.3613 0.4671 Sigma 0.2800 0.1694

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 4 -0.1450 0.2696 0.000 0.000 4.000 -9999. / -1 Constant 1.346 13.72 Mean -0.1400 0.3629E-01 Sigma 0.3893E-01 0.7331

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 4 0.2350 0.3520 0.000 0.000 4.000 -9999. / -1 Constant 1.299 14.53 Mean 0.2100 0.1087 Sigma 0.1106 2.367

cm counts

Residuals on ISIM - module 4

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 297 0.8003E-01

0.2253 5.000 3.000 289.0 53.40 / 17 Constant 32.62 4.415 Mean 0.8569E-01 0.3214E-02 Sigma 0.4059E-01 0.4655E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 297 -0.1134E-01 0.2902 18.00 10.00 269.0 26.61 / 19 Constant 12.44 1.453 Mean -0.2772E-01 0.3245E-01 Sigma 0.1362 0.3121E-01

cm counts

0

1

2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 10 0.6000E-01

0.3362 0.000 0.000 10.00 0.1752E-01/ 1 Constant 2.490 9.524 Mean 0.2200 1.511 Sigma 0.1783 0.7616

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 10 -0.3333E-02 0.4099 0.000 1.000 9.000 0.4605E-04/ 1 Constant 1.006 0.9743E-01 Mean 0.1545 14.37 Sigma 1.635 277.2

cm counts

Residuals on ISIM - module 5

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 36 0.2617 0.2426 0.000 0.000 36.00 2.298 / 2 Constant 0.3683E+05 0.1336E+06 Mean 2.266 0.2714 Sigma 0.4754 0.1208

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 36 0.2062E-01 0.2274 2.000 2.000 32.00 5.811 / 12 Constant 4.121 8.063 Mean -0.8472 1.396 Sigma 0.6202 0.5151

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 4 0.3000E-01

0.1608 1.000 0.000 3.000 -9999. / -1 Constant 1.317 14.73 Mean -0.8000E-01 0.6430E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 4 0.3700 0.2200 2.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.2465E-01 Mean 0.1071 19.59 Sigma 6.788 0.5089E+09

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 2 -0.2000E-01 0.5000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean -0.2000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 2 0.000 0.000 0.000 0.000 2.000

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 109 0.6543E-01

0.2665 0.000 4.000 105.0 22.58 / 14 Constant 13.58 2.506 Mean 0.4732E-01 0.4402E-02 Sigma 0.3139E-01 0.3983E-02

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 109 -0.6938E-01 0.2947 8.000 4.000 97.00 8.310 / 14 Constant 7.755 8.267 Mean -0.3075 0.4327 Sigma 0.2562 0.1668

cm counts

Residuals on ISIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 2 0.000 0.000 0.000 1.000 1.000

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 268 0.4119E-01

0.2394 0.000 0.000 268.0 39.28 / 17 Constant 22.73 3.598 Mean 0.4725E-01 0.4759E-02 Sigma 0.5878E-01 0.8365E-02

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 268 -0.7616E-01 0.3164 8.000 10.00 250.0 16.82 / 18 Constant 12.72 2.128 Mean -0.8025E-01 0.6506E-01 Sigma 0.1198 0.3842E-01

cm counts