Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 217 -0.3690E-01 0.3840 33.00 17.00 167.0 18.67 / 16 Constant 10.69 13.45 Mean -0.4114 0.6638 Sigma 0.3072 0.2552

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 217 1.518 1.812 0.000 48.00 169.0 25.29 / 19 Constant 12.44 1.495 Mean 1.417 0.9748E-01 Sigma 1.068 0.9686E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 3 0.7917E-01 0.2552 0.000 0.000 3.000 -9999. / -1 Constant 1.284 14.34 Mean -0.7500E-01 0.2300 Sigma 0.2301 5.160

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 3 3.500 2.125 0.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 1.375 20.11 Sigma 1.375 0.5834

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 286 -0.1072 0.3298 29.00 30.00 227.0 38.57 / 15 Constant 14.86 11.34 Mean -0.6024 0.4988 Sigma 0.4427 0.1890

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 286 0.7099 1.965 7.000 5.000 274.0 13.75 / 18 Constant 21.20 1.844 Mean 0.7658 0.7964E-01 Sigma 1.117 0.7455E-01

cm counts

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 6 0.3313 0.5345 0.000 2.000 4.000 -9999. / -1 Constant 1.346 15.05 Mean -0.2000 0.4560E-01 Sigma 0.4866E-01 0.9163

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 6 3.375 5.071 0.000 2.000 4.000 0.000 / 0 Constant 1.005 0.5389 Mean 0.5444 1.408 Sigma 3.841 1.414

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 1 0.2125 0.8334E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.1197E+08 2.000 Mean 0.1488 1.414 Sigma 0.8334E-09 1.414

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 1 2.625 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.625 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 266 0.5905E-01 0.2957 14.00 13.00 239.0 22.88 / 17 Constant 12.92 1.239 Mean 0.8401E-01 0.2339E-01 Sigma 0.1421 0.1664E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 266 1.134 1.590 0.000 1.000 265.0 40.51 / 19 Constant 29.47 2.964 Mean 1.091 0.5495E-01 Sigma 0.6888 0.4997E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 2 0.1625 0.1053E-08 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1762E-01 Mean 0.1159 5.352 Sigma 5.091 0.1519E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 2 2.875 0.000 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.875 20.11 Sigma 1.375 0.5834

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 237 0.7949E-01 0.4640 15.00 16.00 206.0 25.15 / 17 Constant 10.60 1.228 Mean 0.2044E-01 0.1220E-01 Sigma 0.1156 0.1013E-01

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 237 1.141 1.786 1.000 1.000 235.0 22.55 / 19 Constant 13.56 1.286 Mean 1.232 0.1272 Sigma 1.446 0.1192

cm counts

Residuals on OSIM - module 1

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 61 -0.7867E-01

0.3004 1.000 0.000 60.00 10.45 / 13 Constant 2.770 0.8759 Mean 0.1339E-01 0.3102E-01 Sigma 0.1080 0.5401E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 61 -0.1070E-01 0.2829 3.000 1.000 57.00 11.46 / 17 Constant 1.824 0.4483 Mean 0.7540E-01 0.6932E-01 Sigma 0.2104 0.1112

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 321 0.1324E-01

0.2392 0.000 0.000 321.0 23.34 / 16 Constant 25.21 2.446 Mean 0.1171E-01 0.5070E-02 Sigma 0.7323E-01 0.5676E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 321 -0.2403E-01 0.3214 21.00 22.00 278.0 41.89 / 19 Constant 18.74 2.299 Mean -0.8433E-02 0.6240E-02 Sigma 0.6076E-01 0.6614E-02

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 2 -0.2258E-07 0.5000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean -0.2248E-07 0.6417E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 2 -0.1100 0.1400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 193 0.3147E-01

0.2271 0.000 3.000 190.0 30.46 / 17 Constant 20.71 2.984 Mean 0.6041E-02 0.4689E-02 Sigma 0.4605E-01 0.5194E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 193 -0.5791E-01 0.3371 5.000 11.00 177.0 34.54 / 17 Constant 11.55 2.332 Mean -0.1154E-01 0.5907E-02 Sigma 0.4415E-01 0.7795E-02

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 1 0.1300 0.7188E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.2313E-01 Mean 0.9156E-01 13.81 Sigma 5.977 0.1267E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 18 -0.2111 0.2244 0.000 0.000 18.00 2.272 / 3 Constant 0.2429E+05 0.2323E+05 Mean -0.9610 0.1907 Sigma 0.1895 0.3985E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 18 -0.3800E-01 0.3269 1.000 2.000 15.00 0.7701 / 5 Constant 1.296 0.8137 Mean 0.8252E-01 0.2107 Sigma 0.2329 0.5176

cm counts

Residuals on OSIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 1 0.000 0.000 0.000 0.000 1.000

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 339 -0.1488 0.2170 1.000 1.000 337.0 26.29 / 17 Constant 27.54 2.601 Mean -0.1544 0.2352E-01 Sigma 0.8720E-01 0.1857E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 339 -0.1112E-01 0.2897 12.00 23.00 304.0 28.71 / 18 Constant 14.11 2.071 Mean -0.8413E-01 0.7096E-01 Sigma 0.1547 0.4607E-01

cm counts

Residuals on OSIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 1 -0.1500 0.4657E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.5459E-02 Mean -0.1059 5.247 Sigma 12.66 0.1198E+06

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 1 0.000 0.000 0.000 0.000 1.000

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 186 -0.1060 0.2687 1.000 1.000 184.0 70.43 / 15 Constant 0.9291E+10 0.2412E+10 Mean -321.0 13.15 Sigma 48.32 1.965

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 186 0.1264E-01 0.3638 12.00 15.00 159.0 13.60 / 17 Constant 6.078 0.9272 Mean -0.4694E-01 0.7701E-01 Sigma 0.1488 0.5811E-01

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 178 0.5141E-02

0.2776 0.000 1.000 177.0 13.63 / 14 Constant 14.78 2.110 Mean -0.4009E-01 0.6786E-02 Sigma 0.6632E-01 0.8700E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 178 -0.2650E-01 0.3225 11.00 7.000 160.0 23.60 / 18 Constant 7.673 1.483 Mean 0.4130E-01 0.1315E-01 Sigma 0.9766E-01 0.2095E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 8 -0.2500E-02

0.4489 0.000 0.000 8.000 0.000 / 0 Constant 2.025 3.503 Mean -0.6916E-01 0.2582 Sigma 0.8479E-01 0.2445

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 8 -0.3857E-01 0.2397 0.000 1.000 7.000 0.5435E-04/ 2 Constant 1.004 0.4771 Mean 0.1291 6.468 Sigma 0.8920 54.38

cm counts

Residuals on ISIM - module 2

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 365 -0.3959E-01

0.2496 1.000 1.000 363.0 34.45 / 17 Constant 26.75 3.001 Mean -0.1763E-01 0.4852E-02 Sigma 0.7229E-01 0.7013E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 365 -0.2519E-01 0.3231 22.00 27.00 316.0 44.41 / 19 Constant 12.03 4.456 Mean -0.1281 0.1661 Sigma 0.1992 0.8793E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 11 -0.1364E-01

0.2999 0.000 0.000 11.00 0.3510 / 2 Constant 1.338 1.030 Mean 0.4511E-02 0.1221 Sigma 0.1613 0.2714

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 11 0.2560 0.3170 1.000 0.000 10.00 0.4039E-04/ 4 Constant 1.037 5.787 Mean -2.122 85.29 Sigma 8.247 425.5

cm counts

Residuals on ISIM - module 3

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 68 -0.7697E-01

0.2630 2.000 0.000 66.00 13.94 / 14 Constant 2.568 0.6120 Mean -0.5348E-01 0.1227 Sigma 0.1526 0.1276

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 68 -0.5951E-01 0.2939 4.000 3.000 61.00 9.888 / 11 Constant 2.355 0.5892 Mean -0.1676E-01 0.1015 Sigma 0.1906 0.1331

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 2 -0.4900 0.3000 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.6888E-02 Mean -0.1343 6.501 Sigma 12.42 0.9246E+05

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 2 -0.7000E-01 0.6527E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.8912E-02 Mean -0.8839E-01 2.928 Sigma 4.522 0.2718E+08

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 4 0.1850 0.1220 0.000 0.000 4.000 0.000 / 0 Constant 1.009 0.6901 Mean 0.8371E-01 1.282 Sigma 0.3089 3.802

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 4 0.2367 0.1761 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 129 0.1481 0.2463 1.000 4.000 124.0 20.68 / 16 Constant 7.808 1.843 Mean 0.9074E-01 0.1238E-01 Sigma 0.6582E-01 0.1938E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 129 -0.3372E-01 0.3010 6.000 10.00 113.0 16.17 / 13 Constant 7.143 1.611 Mean -0.3473E-01 0.1286E-01 Sigma 0.6288E-01 0.1915E-01

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 4 0.1500 0.3742E-01

0.000 0.000 4.000 0.000 / 0 Constant 1.004 0.5775 Mean 0.1300 1.851 Sigma 0.1774 0.3575E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 4 0.1100 0.4320E-01 0.000 1.000 3.000 0.000 / 0 Constant 1.018 0.6176 Mean 0.8956E-01 0.8511 Sigma 0.2582 0.3245

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 387 0.1079 0.2455 1.000 2.000 384.0 60.95 / 17 Constant 38.70 4.693 Mean 0.1230 0.3722E-02 Sigma 0.4791E-01 0.6255E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 387 -0.1434E-01 0.2973 15.00 31.00 341.0 32.07 / 19 Constant 15.72 1.940 Mean -0.3003E-01 0.2130E-01 Sigma 0.1166 0.2379E-01

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 1 0.000 0.000 1.000 0.000 0.000

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 63 0.9386E-01

0.3416 6.000 0.000 57.00 6.251 / 10 Constant 0.4543E+06 0.1069E+07 Mean 6.176 0.2164 Sigma 1.222 0.1488

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 63 0.1040E-01 0.3642 8.000 5.000 50.00 8.815 / 14 Constant 19.69 55.69 Mean -2.956 1.439 Sigma 1.319 0.3514

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 0 0.000 0.000 0.000 0.000 0.000

cm counts