Residuals on Straw Tubes (LOST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 667 -0.3526E-02 0.3377E-01

49.00 15.00 603.0 15.35 / 19 Constant 43.70 2.564 Mean 0.1160E-02 0.9225E-03 Sigma 0.1935E-01 0.8754E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 667 -0.4685E-02 0.3486E-01 64.00 7.000 596.0 19.60 / 19 Constant 43.15 2.561 Mean 0.1171E-02 0.9285E-03 Sigma 0.1940E-01 0.8970E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 667 -0.8910E-02 0.3020E-01

19.00 6.000 642.0 17.85 / 19 Constant 52.24 2.894 Mean -0.4868E-02 0.7711E-03 Sigma 0.1736E-01 0.6869E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 667 -0.8943E-02 0.2586E-01 35.00 0.000 632.0 27.63 / 19 Constant 53.16 3.019 Mean -0.4963E-02 0.7445E-03 Sigma 0.1674E-01 0.6842E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 667 0.5145E-02 0.5401E-01

62.00 20.00 585.0 22.96 / 19 Constant 27.47 1.945 Mean 0.5819E-02 0.1615E-02 Sigma 0.2507E-01 0.1916E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 424 -0.8400E-02 0.6188E-01 55.00 9.000 360.0 13.40 / 19 Constant 15.11 1.308 Mean 0.1994E-03 0.2714E-02 Sigma 0.3045E-01 0.3485E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 667 -0.6870E-02 0.5774E-01

54.00 11.00 602.0 13.17 / 19 Constant 26.23 1.823 Mean -0.4559E-02 0.1847E-02 Sigma 0.2778E-01 0.2324E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 263 -0.3806E-02 0.6088E-01 54.00 3.000 206.0 11.13 / 19 Constant 8.992 1.088 Mean -0.8650E-03 0.2658E-02 Sigma 0.2473E-01 0.3074E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 667 -0.1663E-02 0.5208E-01

77.00 8.000 582.0 19.97 / 19 Constant 27.78 1.806 Mean 0.1832E-02 0.1508E-02 Sigma 0.2473E-01 0.1508E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 349 -0.5146E-02 0.5737E-01 40.00 14.00 295.0 21.65 / 19 Constant 11.13 1.145 Mean -0.1373E-02 0.3918E-02 Sigma 0.3428E-01 0.6084E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 667 -0.9539E-02 0.5518E-01

56.00 4.000 607.0 22.44 / 19 Constant 30.77 2.062 Mean -0.4725E-02 0.1320E-02 Sigma 0.2270E-01 0.1404E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 667 -0.1010E-01 0.5784E-01 31.00 280.0 356.0 22.72 / 19 Constant 14.49 1.468 Mean -0.1826E-02 0.2236E-02 Sigma 0.2593E-01 0.3074E-02

cm counts

Z Residuals on Straw Tubes

0

10

20

30

40

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 667 -0.7631E-01 1.742 0.000 0.000 667.0 30.82 / 34 Constant 32.07 1.579 Mean 0.1631E-01 0.6733E-01 Sigma 1.570 0.5074E-01

cm counts

0 10 20 30 40

-10 -5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 667 -0.2958 1.777 1.000 0.000 666.0 27.51 / 35 Constant 33.38 1.690 Mean -0.1666 0.6265E-01 Sigma 1.485 0.4950E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 237 0.5437E-01 0.3936 9.000 19.00 209.0 16.25 / 17 Constant 11.15 1.349 Mean 0.3217E-01 0.1246E-01 Sigma 0.1242 0.1360E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 237 0.6165 1.220 1.000 0.000 236.0 8.459 / 16 Constant 23.76 2.265 Mean 0.7522 0.6722E-01 Sigma 0.9218 0.6926E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 229 -0.5012E-01 0.2626 6.000 11.00 212.0 21.34 / 16 Constant 10.95 1.109 Mean -0.9313E-01 0.3690E-01 Sigma 0.1835 0.3419E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 229 1.341 1.233 0.000 0.000 229.0 14.96 / 19 Constant 19.93 1.769 Mean 1.434 0.7646E-01 Sigma 1.051 0.6313E-01

cm counts

Residuals on Drift Chambers

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 169 -0.6283E-01 0.3847 11.00 8.000 150.0 33.41 / 17 Constant 4.886 0.7827 Mean 0.1260 0.2506 Sigma 0.2516 0.2183

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 169 2.250 1.271 2.000 1.000 166.0 17.99 / 16 Constant 15.30 1.763 Mean 2.219 0.8760E-01 Sigma 0.9273 0.8773E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 258 -0.7320E-01 0.1993 16.00 6.000 236.0 23.83 / 16 Constant 13.96 1.261 Mean -0.8339E-01 0.2040E-01 Sigma 0.1457 0.1533E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 258 0.7607 1.917 1.000 1.000 256.0 10.41 / 19 Constant 23.54 2.042 Mean 0.8917 0.6472E-01 Sigma 0.9357 0.5348E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 561 -0.6645E-01

0.2368 3.000 1.000 557.0 39.93 / 15 Constant 40.52 3.154 Mean -0.8392E-01 0.4213E-02 Sigma 0.7532E-01 0.4946E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 561 0.2188E-01 0.2895 29.00 22.00 510.0 37.49 / 13 Constant 27.37 2.403 Mean 0.4206E-02 0.6320E-02 Sigma 0.8816E-01 0.8208E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 529 -0.9004E-01

0.2235 3.000 4.000 522.0 51.72 / 15 Constant 38.55 3.054 Mean -0.8425E-01 0.4614E-02 Sigma 0.7333E-01 0.4773E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 529 -0.2205E-01 0.2950 32.00 19.00 478.0 15.19 / 13 Constant 24.78 2.281 Mean -0.4463E-01 0.8454E-02 Sigma 0.9522E-01 0.1103E-01

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 579 0.8541E-01

0.2263 4.000 4.000 571.0 52.61 / 16 Constant 38.02 3.000 Mean 0.7081E-01 0.4476E-02 Sigma 0.8117E-01 0.5562E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 579 0.1799E-01 0.2895 37.00 19.00 523.0 17.00 / 13 Constant 28.39 2.356 Mean -0.7944E-02 0.6933E-02 Sigma 0.9048E-01 0.8090E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 583 0.6591E-01

0.2343 4.000 2.000 577.0 45.21 / 16 Constant 42.01 3.088 Mean 0.7080E-01 0.4210E-02 Sigma 0.7527E-01 0.4398E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 583 -0.1624E-01 0.3048 37.00 20.00 526.0 14.35 / 13 Constant 26.41 2.255 Mean -0.3885E-01 0.8814E-02 Sigma 0.1009 0.1139E-01

cm counts