Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 67374 -0.7927E-02 0.3962 6146. 6160.

0.5507E+05 158.1 / 17 Constant 2472. 18.26 Mean -0.1702E-01 0.1191E-02 Sigma 0.1641 0.1510E-02

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 67374 -0.2537E-01 2.017 479.0 1550.

0.6534E+05 249.7 / 15 Constant 5368. 30.78 Mean 0.5639E-03 0.5049E-02 Sigma 1.071 0.5107E-02

cm counts

0

1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 67374 0.2313E-01 0.3890 4447. 4301.

0.5863E+05 155.6 / 9 Constant 3444. 28.04 Mean 0.1001E-02 0.8377E-03 Sigma 0.1048 0.1182E-02

cm counts

0

2000

4000

6000

8000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 67374 0.2249E-01 0.3318 1596. 1820.

0.6396E+05 183.7 / 3 Constant 7599. 61.40 Mean 0.6920E-03 0.2993E-03 Sigma 0.4263E-01 0.3559E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 77620 0.3110E-02 0.3867 6774. 6812.

0.6403E+05 176.1 / 17 Constant 3425. 21.79 Mean -0.1910E-04 0.8153E-03 Sigma 0.1415 0.8873E-03

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 77620 -0.7510E-01 2.195 1002. 874.0 0.7574E+05 170.0 / 15 Constant 5365. 29.35 Mean 0.5841E-02 0.5942E-02 Sigma 1.237 0.6543E-02

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 77620 0.1311E-01 0.4011 4850. 4208.

0.6856E+05 505.1 / 9 Constant 4425. 31.78 Mean -0.2675E-02 0.7654E-03 Sigma 0.1077 0.1120E-02

cm counts

0 5000

10000

15000

20000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 77620 0.6200E-02 0.3216 1982. 2003.

0.7364E+05 3830. / 3 Constant 0.2570E+05 155.8 Mean 0.1738E-03 0.8149E-04 Sigma 0.1709E-01 0.6385E-04

cm counts

Residuals on OSIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 145381 -0.6269E-01

0.3013 2511. 1961.

0.1409E+06 217.5 / 10 Constant 8117. 41.27 Mean -0.7583E-01 0.4157E-03 Sigma 0.8555E-01 0.5430E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 145381 -0.6139E-02 0.3422 0.1182E+05 0.1032E+05 0.1232E+06 158.6 / 11 Constant 5702. 33.13 Mean -0.1565E-02 0.5847E-03 Sigma 0.1007 0.8440E-03

cm counts

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 145381 0.1131E-01

0.2565 959.0 1033.

0.1434E+06 130.2 / 14 Constant 8461. 37.28 Mean 0.1013E-01 0.4028E-03 Sigma 0.1007 0.4721E-03

cm counts

0 5000

10000

15000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 145381 0.1166E-01 0.2045 601.0 913.0 0.1439E+06 588.2 / 1 Constant 0.2103E+05 122.3 Mean -0.3380E-04 0.1333E-03 Sigma 0.2491E-01 0.1694E-03

cm counts

Residuals on ISIM

0 2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 158783 0.4781E-01

0.3200 4349. 5027.

0.1494E+06 212.1 / 11 Constant 7767. 38.94 Mean 0.5833E-01 0.4411E-03 Sigma 0.9227E-01 0.5793E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 158786 -0.5633E-02 0.3514 0.1363E+05 0.1172E+05 0.1334E+06 166.1 / 11 Constant 5987. 33.97 Mean -0.1750E-02 0.5676E-03 Sigma 0.1004 0.8164E-03

cm counts

0 2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 158789 0.1374E-01

0.2668 1944. 2252.

0.1546E+06 243.2 / 10 Constant 9817. 45.61 Mean 0.1055E-01 0.3631E-03 Sigma 0.8323E-01 0.4636E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 158783 0.9258E-02 0.2341 2277. 2831.

0.1537E+06 533.1 / 8 Constant 0.1200E+05 56.20 Mean 0.6756E-02 0.2818E-03 Sigma 0.6693E-01 0.3550E-03

cm counts

Residuals on Φ angle

0 1000

2000

3000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10013 71057 -0.7934E-02

1.687 2097. 1811.

0.6715E+05 179.0 / 10 Constant 4329. 30.33 Mean -0.5056E-01 0.2674E-02 Sigma 0.4090 0.3343E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0 2500

5000

7500

10000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10023 82199 0.6619E-02 1.197 597.0 460.0 0.8114E+05 151.2 / 5 Constant 0.1010E+05 60.81 Mean -0.1921E-02 0.1060E-02 Sigma 0.2043 0.1072E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

6000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10033 152438

0.4096 1.693 5325. 6536.

0.1406E+06 135.3 / 14 Constant 6291. 31.56 Mean 0.5235 0.2769E-02 Sigma 0.5684 0.3635E-02

Φ_{det}-Φ_{fit} (deg.)

counts

0

2000

4000

-5 0 5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

10043 166549 0.3707 1.878 0.1249E+05 0.1485E+05 0.1392E+06 105.9 / 17 Constant 4782. 24.83 Mean 0.5040 0.4034E-02 Sigma 0.7471 0.5832E-02

Φ_{det}-Φ_{fit} (deg.)

counts