Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 46 0.3052E-01 0.4397 2.000 1.000 43.00 3.931 / 13 Constant 3.181 8.875 Mean 2.641 5.173 Sigma 1.999 3.820

cm counts

0 2 4 6 8

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 46 1.337 1.964 0.000 0.000 46.00 7.605 / 10 Constant 3.591 0.8611 Mean 1.266 0.2952 Sigma 1.120 0.3126

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 46 -0.5435E-03 0.1249E-01 0.000 0.000 46.00 -9999. / -1 Constant 37.37 86.78 Mean -0.5603E-03 0.3279E-02 Sigma 0.1269E-01 0.3041E-01

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 46 0.3052E-01 0.4397 2.000 1.000 43.00 0.4309 / 3 Constant 0.3247E+05 0.1097E+06 Mean 1.555 0.9987E-01 Sigma 0.3428 0.7717E-01

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 37 -0.4205E-01 0.2401 2.000 2.000 33.00 3.934 / 9 Constant 2.129 0.8425 Mean -0.2109 0.4261 Sigma 0.2802 0.3798

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 37 1.353 2.011 1.000 2.000 34.00 3.518 / 10 Constant 3.106 0.8089 Mean 1.571 0.3065 Sigma 1.067 0.3801

cm counts

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 37 0.2196E-01 0.1818 0.000 0.000 37.00 2.414 / 5 Constant 9.526 2.379 Mean 0.1426E-01 0.6812E-02 Sigma 0.3286E-01 0.7137E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 37 0.4129E-01 0.2362 2.000 2.000 33.00 3.093 / 3 Constant 0.1664E+06 0.5524E+06 Mean 2.199 0.1223 Sigma 0.4554 0.8688E-01

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 36 -0.5347E-01 0.2844 0.000 0.000 36.00 7.028 / 13 Constant 1.432 0.3607 Mean -0.1068 0.5298 Sigma 0.4774 1.110

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 36 2.146 1.136 0.000 0.000 36.00 5.316 / 8 Constant 4.133 1.167 Mean 2.071 0.1778 Sigma 0.7312 0.2471

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 36 -0.6944E-03 0.1248E-01 0.000 0.000 36.00 -9999. / -1 Constant 29.27 76.62 Mean -0.7153E-03 0.4405E-02 Sigma 0.1268E-01 0.3427E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 36 0.5347E-01 0.2844 0.000 0.000 36.00 1.572 / 4 Constant 3.786 1.753 Mean -0.1704E-01 0.4330E-01 Sigma 0.4127E-01 0.4438E-01

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 33 0.4375E-01 0.1174 0.000 1.000 32.00 5.539 / 6 Constant 3.313 0.8046 Mean 0.4634E-01 0.1464 Sigma 0.1431 0.1387

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 33 1.625 1.646 0.000 0.000 33.00 4.850 / 10 Constant 2.563 0.9534 Mean 1.286 0.5163 Sigma 1.207 0.8441

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 33 0.1932E-01 0.6889E-01 0.000 0.000 33.00 0.9346 / 2 Constant 14.98 3.505 Mean 0.1135E-01 0.4529E-02 Sigma 0.2128E-01 0.4020E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 33 0.4297E-01 0.1152 0.000 1.000 32.00 5.313 / 3 Constant 14.85 61.75 Mean 1.880 1.318 Sigma 0.9444 0.7781

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 42 -0.4524E-01

0.1685 0.000 0.000 42.00 15.92 / 9 Constant 2.194 0.9384 Mean -0.1570E-01 0.4769E-01 Sigma 0.8792E-01 0.9090E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 42 -0.4211E-02 0.3005 1.000 3.000 38.00 7.692 / 10 Constant 1.806 0.5564 Mean 0.3254E-01 0.6882E-01 Sigma 0.1399 0.9886E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 42 -0.8571E-02 0.3937E-01

0.000 0.000 42.00 4.921 / 5 Constant 19.35 4.138 Mean 0.1095E-02 0.2544E-02 Sigma 0.1491E-01 0.2112E-02

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 42 -0.4333E-01 0.1673 0.000 0.000 42.00 3.775 / 3 Constant 9.157 3.366 Mean 0.1376E-02 0.4210E-02 Sigma 0.1851E-01 0.6431E-02

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 14 0.9462E-01

0.1685 1.000 0.000 13.00 1.610 / 2 Constant 9.017 31.71 Mean 0.9501 1.180 Sigma 0.5107 0.7096

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 14 0.3571E-01 0.2044 0.000 0.000 14.00 0.2025E-03/ 6 Constant 1.002 0.3633 Mean 0.2248E-02 3.275 Sigma 0.9394 20.68

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 14 0.1000E-01

0.2549 0.000 0.000 14.00 0.5463E-01/ 1 Constant 3.810 2.181 Mean -0.9231E-02 0.3906E-01 Sigma 0.7185E-01 0.4832E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 14 0.8571E-02 0.2220 0.000 0.000 14.00 -9999. / -1 Constant 5.744 32.96 Mean 0.1855E-01 0.1731E-01 Sigma 0.1005E-01 0.5941E-01

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 11 -0.1580 0.1798 1.000 0.000 10.00 0.6247 / 2 Constant 2.777 2.229 Mean -0.2800E-01 0.2960E-01 Sigma 0.6816E-01 0.3640E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 11 0.8400E-01 0.1437 1.000 0.000 10.00 0.4319 / 3 Constant 1.134 0.5644 Mean 0.1055 0.7224 Sigma 0.3065 1.532

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 11 -0.1245 0.2144 0.000 0.000 11.00 0.000 / 0 Constant 6.171 5.045 Mean -0.1477E-01 0.1198E-01 Sigma 0.2346E-01 0.1243E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 11 0.000 0.000 0.000 1.000 10.00

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 38 -0.8789E-01

0.2233 0.000 0.000 38.00 4.560 / 8 Constant 4.339 1.190 Mean -0.1435 0.1195E-01 Sigma 0.5113E-01 0.1499E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 38 -0.3063E-01 0.2561 2.000 4.000 32.00 5.874 / 8 Constant 2.139 0.7220 Mean 0.1855E-01 0.4048E-01 Sigma 0.1090 0.6087E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 38 0.2105E-01 0.4849E-01

0.000 0.000 38.00 5.685 / 5 Constant 12.76 4.266 Mean 0.3483E-01 0.4932E-02 Sigma 0.2029E-01 0.7146E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 38 0.8632E-01 0.2225 0.000 0.000 38.00 -9999. / -1 Constant 2.090 7.741 Mean 0.3096E-01 0.6565 Sigma 0.6654E-01 0.7005

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 13 -0.1923E-01

0.2811 0.000 0.000 13.00 0.000 / 0 Constant 58.72 139.5 Mean -0.1200 0.8222E-02 Sigma 0.3153E-01 0.1113E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 13 0.4636E-01 0.4022 0.000 2.000 11.00 0.000 / 0 Constant 2.008 1.356 Mean 0.7123E-01 1.386 Sigma 1.069 1.414

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 13 0.1154E-01

0.2107 0.000 0.000 13.00 1.992 / 2 Constant 7.726 34.33 Mean 1.874 1.878 Sigma 0.9756 1.600

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 13 0.1769E-01 0.1861 0.000 0.000 13.00 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

0

0.5

1

1.5

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 7 -0.5000E-01

0.2775 0.000 0.000 7.000 -9999. / -1 Constant 1.386 15.51 Mean 0.7000E-01 0.2182E-01 Sigma 0.2474E-01 0.4233

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 7 0.1733 0.4808 0.000 1.000 6.000 0.000 / 0 Constant 1.018 0.6797 Mean 0.9761E-02 0.8711 Sigma 0.2500 0.6375

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 7 0.1857E-01

0.1025 0.000 0.000 7.000 0.4186 / 2 Constant 1.888 10.24 Mean -1.061 5.956 Sigma 1.024 3.218

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 7 -0.4714E-01 0.2591 0.000 0.000 7.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 1 0.3000E-01 0.1936E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.3000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 1 -0.1000E-01 0.2137E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 1 0.3000E-01 0.1936E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on ISIM - module 1

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 44 0.1364E-02

0.1897 0.000 0.000 44.00 17.49 / 9 Constant 1.872 0.6513 Mean -0.1300E-01 0.9753E-01 Sigma 0.1613 0.1506

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 44 -0.7693E-03 0.2963 1.000 4.000 39.00 5.795 / 11 Constant 2.292 0.7251 Mean -0.1672E-01 0.4170E-01 Sigma 0.1062 0.7139E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 44 0.4545E-03 0.7740E-01

0.000 0.000 44.00 11.21 / 8 Constant 7.302 3.037 Mean 0.1276E-01 0.6886E-02 Sigma 0.3152E-01 0.1027E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 44 -0.2258E-07 0.1727 0.000 0.000 44.00 11.63 / 8 Constant 12.22 3.514 Mean 0.2474E-01 0.3401E-02 Sigma 0.1591E-01 0.3538E-02

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 1 0.1000E-01 0.3692E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 1 0.1000E-01 0.3692E-10

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1121E-02 Mean -0.7070E-02 0.8575 Sigma 7.909 0.3963E+09

cm counts

Residuals on ISIM - module 2

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 9 -0.1875 0.2578 0.000 1.000 8.000 0.2044E-02/ 2 Constant 1.055 0.8399 Mean 0.4266E-01 0.5360 Sigma 0.3192 1.932

cm counts

0

1

2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 9 0.8111E-01 0.2383 0.000 0.000 9.000 0.000 / 0 Constant 2.521 2.755 Mean 0.2995E-01 0.4615E-01 Sigma 0.8814E-01 0.6792E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 9 0.1775 0.2339 1.000 0.000 8.000 0.5069E-04/ 1 Constant 1.003 0.5804 Mean 0.6000E-01 1.280 Sigma 0.2482 9.951

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 9 0.3333E-02 0.1939 0.000 0.000 9.000 0.6153E-02/ 1 Constant 2.067 1.132 Mean 0.1054E-01 0.2846E-01 Sigma 0.4993E-01 0.3139E-01

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 2 0.2800 0.1900 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1875E-01 Mean 0.1157 8.559 Sigma 4.344 0.2697E+08

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 2 0.1000E-01 0.4000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.328 14.85 Mean 0.1000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 2 -0.9000E-01 0.6000E-01

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.3647E-02 Mean -0.3788E-01 1.195 Sigma 4.595 0.6278E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 2 0.2700 0.1800 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1875E-01 Mean 0.1157 8.559 Sigma 4.344 0.2697E+08

cm counts

Residuals on ISIM - module 4

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 12 0.1773 0.1849 1.000 0.000 11.00 0.5649 / 3 Constant 1.498 0.8193 Mean 0.6038E-01 0.5273E-01 Sigma 0.8281E-01 0.9498E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 12 0.2000E-01 0.2536 0.000 0.000 12.00 0.2939 / 3 Constant 13.72 60.27 Mean 1.733 0.8686 Sigma 0.7475 0.8378

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 12 -0.2000E-01

0.1436 0.000 0.000 12.00 0.6002 / 2 Constant 2.237 1.013 Mean -0.4328E-01 0.2615E-01 Sigma 0.5045E-01 0.2862E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 12 0.1645 0.1721 1.000 0.000 11.00 0.7132 / 2 Constant 2.148 1.181 Mean 0.6733E-01 0.2832E-01 Sigma 0.5947E-01 0.4196E-01

cm counts

Residuals on ISIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 1 0.000 0.000 0.000 1.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 1 0.000 0.000 0.000 1.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 1 0.000 0.000 0.000 1.000 0.000

cm counts

Residuals on ISIM - module 5

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 45 0.7727E-01

0.1675 0.000 1.000 44.00 12.57 / 8 Constant 3.372 1.952 Mean 0.9367E-01 0.3785E-01 Sigma 0.8697E-01 0.5212E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 45 -0.3378E-01 0.2626 2.000 6.000 37.00 5.561 / 9 Constant 2.719 1.002 Mean -0.3222E-01 0.2636E-01 Sigma 0.8315E-01 0.4170E-01

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 45 0.3844E-01 0.8707E-01

0.000 0.000 45.00 8.610 / 7 Constant 16.56 4.459 Mean 0.5219E-01 0.2989E-02 Sigma 0.1562E-01 0.3359E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 45 0.9400E-01 0.2031 0.000 0.000 45.00 7.348 / 6 Constant 0.1029E+06 0.2473E+06 Mean 2.380 0.1069 Sigma 0.5024 0.7558E-01

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 10 0.1444E-01

0.3102 1.000 0.000 9.000 -9999. / -1 Constant 3.559 20.34 Mean 0.2159 0.1084 Sigma 0.2412E-01 0.2195

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 10 0.6500E-01 0.3668 0.000 2.000 8.000 0.1405 / 1 Constant 15.30 52.94 Mean -1.329 1.758 Sigma 0.5929 0.6137

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 10 0.000 0.000 1.000 0.000 9.000

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 10 -0.3800E-01 0.1657 0.000 0.000 10.00 0.6512 / 2 Constant 1.366 1.565 Mean 0.4863E-01 0.3479 Sigma 0.1948 0.5622

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 11 0.1000E-01

0.2202 0.000 0.000 11.00 0.6026 / 2 Constant 2.348 1.433 Mean -0.7614E-01 0.1172E-01 Sigma 0.2687E-01 0.1815E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 11 0.2000E-01 0.3239 0.000 1.000 10.00 0.3593 / 3 Constant 1.293 0.7704 Mean -0.7678E-02 0.9936E-01 Sigma 0.1337 0.2285

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 11 0.9091E-03 0.7103E-01

0.000 0.000 11.00 0.9418 / 2 Constant 3.840 2.374 Mean 0.1371E-01 0.2693E-01 Sigma 0.4632E-01 0.3235E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 11 -0.6364E-02 0.2064 0.000 0.000 11.00 0.6026 / 2 Constant 2.348 1.433 Mean 0.7614E-01 0.1171E-01 Sigma 0.2687E-01 0.1814E-01

cm counts

Residuals on ISIM - module 8

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 2 -0.5000E-01 0.4149E-09

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 0.3897E+08 0.1293E-09 Mean -0.5000E-01 0.1329E-09 Sigma 0.5224E-09 1.454

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 2 0.1300 0.7188E-09 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 2.000 0.6361E-02 Mean 0.9511E-01 3.889 Sigma 13.94 0.1577E+06

cm counts