Residuals on Drift Ch. - module 1

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 237 0.6154E-01 0.3859 10.00 19.00 208.0 8.585 / 17 Constant 12.02 1.453 Mean 0.3295E-01 0.1170E-01 Sigma 0.1213 0.1353E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 237 0.6165 1.220 1.000 0.000 236.0 6.216 / 14 Constant 24.33 2.294 Mean 0.7628 0.6643E-01 Sigma 0.8924 0.6715E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 237 -0.5409E-01 0.3574 6.000 2.000 229.0 12.76 / 11 Constant 20.61 2.628 Mean -0.1916E-01 0.6376E-02 Sigma 0.7237E-01 0.7955E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 237 0.5035E-01 0.3514 8.000 17.00 212.0 4.384 / 5 Constant 16.33 2.102 Mean 0.3656E-01 0.2097E-01 Sigma 0.8037E-01 0.2078E-01

cm counts

Residuals on Drift Ch. - module 1

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 1 -0.1250E-01 0.4659E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1154E-02 Mean -0.8907E-02 1.166 Sigma 9.702 0.4496E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 1 0.1250 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1250 18.56 Sigma 1.188 0.5038

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 1 0.1250E-01 0.9876E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1250E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 1 -0.1250E-01 0.4659E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1250E-01 337.1 Sigma 21.50 1.414

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 169 -0.6450E-01 0.3844 11.00 8.000 150.0 26.02 / 17 Constant 5.180 0.8308 Mean 0.1061 0.1862 Sigma 0.2562 0.2114

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 169 2.250 1.271 2.000 1.000 166.0 15.64 / 13 Constant 15.01 1.828 Mean 2.243 0.1222 Sigma 0.9615 0.1308

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 169 0.7016E-01 0.3643 5.000 4.000 160.0 27.13 / 11 Constant 8.092 1.387 Mean -0.4466E-01 0.1890E-01 Sigma 0.1174 0.3127E-01

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 169 -0.7016E-01 0.3643 4.000 5.000 160.0 5.430 / 5 Constant 8.557 1.577 Mean 0.2974E-01 0.2574E-01 Sigma 0.7509E-01 0.2686E-01

cm counts

Residuals on Drift Ch. - module 2

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 5 0.000 0.000 3.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 5 -1.625 6.561 1.000 1.000 3.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.375 18.56 Sigma 1.188 0.5038

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 5 0.000 0.000 0.000 2.000 3.000

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 5 0.000 0.000 2.000 0.000 3.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 228 -0.4793E-01 0.2624 6.000 11.00 211.0 27.71 / 16 Constant 12.13 1.353 Mean -0.6963E-01 0.1808E-01 Sigma 0.1320 0.1695E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 228 1.346 1.234 0.000 0.000 228.0 13.92 / 16 Constant 19.72 1.851 Mean 1.459 0.8977E-01 Sigma 1.067 0.8284E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 228 -0.7080E-02 0.2841 1.000 1.000 226.0 13.15 / 11 Constant 24.14 2.335 Mean -0.3562E-01 0.5850E-02 Sigma 0.7167E-01 0.4742E-02

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 228 0.1727E-01 0.2692 7.000 6.000 215.0 5.067 / 5 Constant 15.60 3.859 Mean 0.9440E-01 0.1788 Sigma 0.1703 0.1590

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 253 -0.7051E-01 0.1848 13.00 6.000 234.0 19.56 / 15 Constant 15.56 1.400 Mean -0.6922E-01 0.1414E-01 Sigma 0.1314 0.1155E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 253 0.7890 1.772 0.000 0.000 253.0 9.532 / 16 Constant 23.65 2.080 Mean 0.8740 0.6607E-01 Sigma 0.9244 0.5677E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 253 -0.5717E-01 0.2500 7.000 2.000 244.0 13.51 / 11 Constant 23.42 2.050 Mean -0.5232E-01 0.7629E-02 Sigma 0.8598E-01 0.5757E-02

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 253 0.6199E-01 0.2605 2.000 6.000 245.0 5.722 / 5 Constant 21.78 12.67 Mean 0.5715E-01 0.2040 Sigma 0.1142 0.1166

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 1

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 2 -0.3000E-01 0.6000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.309 14.64 Mean -0.3000E-01 0.7878E-01 Sigma 0.8174E-01 1.697

cm counts

0

2500

5000

7500

10000 x 10^3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 2 -0.9000E-01 0.8430E-09 1.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.9590E+07 0.1630E-07 Mean -0.9000E-01 0.1630E-07 Sigma 0.9566E-09 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 2 -0.2258E-07 0.1000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.623 18.15 Mean -0.2627E-07 0.7290E-02 Sigma 0.1016E-01 0.1173

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 2 -0.3000E-01 0.6000E-01 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on OSIM - module 1

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 21 -0.1460 0.2326 0.000 1.000 20.00 2.692 / 6 Constant 1.432 0.6242 Mean -0.1128 0.8531E-01 Sigma 0.1408 0.2009

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 21 0.9000E-02 0.2122 0.000 1.000 20.00 1.196 / 6 Constant 1.212 0.5332 Mean -0.2179E-01 0.1506 Sigma 0.2003 0.3511

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 21 -0.1476E-01 0.8814E-01

0.000 0.000 21.00 1.501 / 5 Constant 4.651 1.770 Mean -0.1335E-01 0.1630E-01 Sigma 0.5313E-01 0.1667E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 21 -0.1400 0.2288 0.000 1.000 20.00 -9999. / -1 Constant 2.228 17.76 Mean -0.3927E-01 0.2505 Sigma 0.2312E-01 0.3125

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 3

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 166 -0.6092E-01

0.2209 3.000 0.000 163.0 20.37 / 14 Constant 9.367 1.359 Mean -0.8425E-01 0.1070E-01 Sigma 0.8692E-01 0.1202E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 166 0.4333E-01 0.3195 7.000 6.000 153.0 16.32 / 13 Constant 7.036 1.385 Mean 0.1897E-01 0.1538E-01 Sigma 0.9721E-01 0.2698E-01

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 166 -0.6139E-01

0.2078 1.000 0.000 165.0 16.37 / 15 Constant 11.21 5.418 Mean -0.1588 0.1608 Sigma 0.1631 0.7785E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 166 0.4193E-01 0.1384 0.000 0.000 166.0 5.016 / 3 Constant 159.2 237.0 Mean 0.4491 0.4892E-01 Sigma 0.1929 0.6228E-01

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 371 -0.5849E-01

0.2400 0.000 1.000 370.0 42.03 / 14 Constant 32.73 4.029 Mean -0.7891E-01 0.4597E-02 Sigma 0.5848E-01 0.6278E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 371 0.1249E-01 0.2805 20.00 14.00 337.0 27.99 / 13 Constant 18.82 2.020 Mean 0.1992E-02 0.6966E-02 Sigma 0.8160E-01 0.8466E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 371 -0.2181E-01 0.9335E-01

0.000 0.000 371.0 93.04 / 15 Constant 94.64 13.66 Mean -0.3275E-01 0.1718E-02 Sigma 0.2116E-01 0.2837E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 371 0.5129E-01 0.2276 0.000 0.000 371.0 3.998 / 3 Constant 0.6562E+06 0.7754E+06 Mean 1.743 0.3658E-01 Sigma 0.3749 0.2689E-01

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 21 -0.2795 0.1806 0.000 0.000 21.00 1.235 / 3 Constant 8.401 38.38 Mean -1.055 1.290 Sigma 0.4676 0.6198

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 21 0.2263E-01 0.1514 0.000 2.000 19.00 1.205 / 7 Constant 2.125 5.543 Mean -0.5175 2.206 Sigma 0.5275 1.041

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 21 0.6429E-01 0.3444E-01

0.000 0.000 21.00 4.000 / 2 Constant 661.3 2519. Mean 0.5966E-01 0.3598E-03 Sigma 0.3373E-02 0.1476E-02

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 21 0.000 0.000 0.000 0.000 21.00

cm counts

Residuals on OSIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 2 -0.2200 0.5000E-01

0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.1845E-01 Mean -0.2188 5.604 Sigma 5.091 0.1454E+09

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 2 0.000 0.000 0.000 1.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 2 0.4000E-01 0.1000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.623 18.15 Mean 0.4000E-01 0.7383E-02 Sigma 0.1016E-01 0.1173

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 2 0.000 0.000 0.000 0.000 2.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 7

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 192 -0.1017 0.2552 3.000 0.000 189.0 17.55 / 14 Constant 15.24 2.120 Mean -0.7839E-01 0.5980E-02 Sigma 0.6244E-01 0.6959E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 192 -0.3233E-01 0.2774 13.00 7.000 172.0 12.93 / 13 Constant 11.00 1.675 Mean -0.4298E-01 0.8176E-02 Sigma 0.6650E-01 0.9046E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 192 0.9937E-01

0.2384 0.000 0.000 192.0 34.08 / 15 Constant 16.54 2.960 Mean 0.7245E-01 0.5744E-02 Sigma 0.5470E-01 0.8587E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 192 -0.6344E-01 0.1485 0.000 0.000 192.0 5.384 / 3 Constant 48.40 36.89 Mean -0.9538E-01 0.6904E-01 Sigma 0.5647E-01 0.2549E-01

cm counts

Residuals on OSIM - module 10

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 1 0.000 0.000 1.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 10

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 314 -0.7849E-01

0.2005 0.000 3.000 311.0 34.39 / 14 Constant 23.90 2.324 Mean -0.8099E-01 0.5872E-02 Sigma 0.7051E-01 0.5474E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 314 -0.1716E-01 0.3097 19.00 10.00 285.0 11.71 / 13 Constant 13.77 1.525 Mean -0.4065E-01 0.1197E-01 Sigma 0.1007 0.1366E-01

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 314 0.2503E-01 0.8712E-01

0.000 0.000 314.0 60.08 / 16 Constant 58.39 6.239 Mean 0.2976E-01 0.2213E-02 Sigma 0.3250E-01 0.2753E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 314 -0.7347E-01 0.1863 0.000 3.000 311.0 2.662 / 3 Constant 836.5 541.4 Mean -0.2517 0.4587E-01 Sigma 0.8583E-01 0.1113E-01

cm counts

Residuals on ISIM - module 1

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 2 0.3900 0.4200 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.3000E-01 337.1 Sigma 21.50 1.414

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 2 -0.1000E-01 0.1000E+00

0.000 0.000 2.000 -9999. / -1 Constant 1.292 14.44 Mean -0.1000E-01 0.1382 Sigma 0.1398 3.058

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 2 0.000 0.000 0.000 0.000 2.000

cm counts

Residuals on ISIM - module 1

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 48 0.5128E-01

0.2278 1.000 0.000 47.00 6.386 / 12 Constant 2.446 0.6335 Mean 0.3350E-01 0.1152 Sigma 0.1414 0.1653

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 48 0.8000E-01 0.2323 1.000 1.000 46.00 6.362 / 11 Constant 2.169 0.5982 Mean 0.9612E-01 0.3176 Sigma 0.2638 0.3761

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 48 -0.8333E-02

0.1189 0.000 0.000 48.00 8.795 / 7 Constant 5.051 1.273 Mean -0.1925E-01 0.1187E-01 Sigma 0.5441E-01 0.1510E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 48 -0.4787E-01 0.2073 0.000 1.000 47.00 9.447 / 10 Constant 2.707 1.266 Mean -0.1052E-01 0.4099E-01 Sigma 0.6799E-01 0.6397E-01

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 2

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 3

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 120 0.1139 0.2106 0.000 3.000 117.0 14.85 / 15 Constant 7.721 1.179 Mean 0.8395E-01 0.1048E-01 Sigma 0.8270E-01 0.1039E-01

cm counts

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 120 0.5684E-01 0.2810 2.000 4.000 114.0 9.231 / 13 Constant 5.276 1.043 Mean 0.1172E-01 0.2231E-01 Sigma 0.1125 0.4057E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 120 -0.1025 0.1900 3.000 0.000 117.0 7.869 / 10 Constant 21.53 20.89 Mean -0.2919 0.1985 Sigma 0.1660 0.6231E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 120 0.6217E-01 0.1282 0.000 0.000 120.0 13.12 / 9 Constant 16.76 2.398 Mean 0.3277E-01 0.4792E-02 Sigma 0.4116E-01 0.4124E-02

cm counts

Residuals on ISIM - module 3

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 4 -0.1250 0.1830 0.000 0.000 4.000 -9999. / -1 Constant 1.317 14.73 Mean 0.4000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 4 -0.7000E-01 0.3082 0.000 0.000 4.000 -9999. / -1 Constant 1.299 14.53 Mean -0.1000E-01 0.1083 Sigma 0.1106 2.367

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 4 0.1250 0.1652 0.000 0.000 4.000 -9999. / -1 Constant 1.317 14.73 Mean -0.2000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 4 -0.5000E-01 0.8602E-01 0.000 0.000 4.000 0.000 / 0 Constant 1.011 0.6011 Mean -0.3177E-01 1.053 Sigma 0.3456 0.3912

cm counts

Residuals on ISIM - module 4

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 410 0.6838E-01

0.2239 2.000 0.000 408.0 46.47 / 15 Constant 29.89 2.929 Mean 0.6296E-01 0.5054E-02 Sigma 0.7114E-01 0.5916E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 410 0.1065E-01 0.2876 29.00 12.00 369.0 14.30 / 13 Constant 20.47 2.003 Mean -0.1428E-01 0.8110E-02 Sigma 0.8461E-01 0.8272E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 410 -0.2229E-01 0.8110E-01

0.000 0.000 410.0 65.13 / 11 Constant 78.31 8.207 Mean -0.2245E-01 0.1823E-02 Sigma 0.3046E-01 0.2681E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 410 0.5898E-01 0.2215 0.000 0.000 410.0 32.58 / 10 Constant 32.32 2.881 Mean 0.6857E-01 0.7710E-02 Sigma 0.7542E-01 0.8585E-02

cm counts

Residuals on ISIM - module 4

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 14 -0.5857E-01

0.3004 0.000 0.000 14.00 1.062 / 3 Constant 1.418 0.7637 Mean 0.9839E-01 0.7402E-01 Sigma 0.1191 0.1380

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 14 -0.1600E-01 0.1908 2.000 2.000 10.00 0.4156E-03/ 3 Constant 1.014 1.070 Mean -0.1784 8.655 Sigma 1.414 1.129

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 14 0.2286E-01

0.1033 0.000 0.000 14.00 1.836 / 4 Constant 1.558 1.100 Mean -0.2315E-01 0.1187 Sigma 0.1352 0.4312

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 14 -0.5286E-01 0.2838 0.000 0.000 14.00 0.4196 / 3 Constant 1.933 8.780 Mean 1.207 8.144 Sigma 1.103 5.033

cm counts

Residuals on ISIM - module 5

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 41 0.1500 0.2431 1.000 1.000 39.00 3.993 / 7 Constant 262.9 815.4 Mean 2.329 0.1797 Sigma 0.6870 0.2364

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 41 -0.6765E-01 0.2968 4.000 3.000 34.00 5.831 / 9 Constant 1.676 0.6333 Mean -0.1848E-01 0.4830E-01 Sigma 0.1193 0.8377E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 41 0.5683E-01

0.1309 0.000 0.000 41.00 4.409 / 8 Constant 4.241 1.534 Mean 0.8686E-01 0.2960E-01 Sigma 0.6162E-01 0.4067E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 41 0.1315 0.3093 0.000 0.000 41.00 1.432 / 4 Constant 4.843 19.91 Mean 1.507 1.802 Sigma 0.8881 1.628

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 1 0.5000E-01 0.3564E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 1 0.3000E-01 0.1936E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 1 0.5000E-01 0.3564E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.5204E-02 Mean 0.3593E-01 2.475 Sigma 6.233 0.5161E+08

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 2 0.000 0.000 1.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 2 0.000 0.000 0.000 0.000 2.000

cm counts

Residuals on ISIM - module 7

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 133 0.9892E-01

0.2838 1.000 2.000 130.0 11.56 / 15 Constant 9.453 1.556 Mean 0.6820E-01 0.7848E-02 Sigma 0.6489E-01 0.8206E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 133 -0.3430E-01 0.3292 9.000 3.000 121.0 9.023 / 12 Constant 7.275 1.356 Mean -0.1801E-01 0.1083E-01 Sigma 0.7170E-01 0.1298E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 133 0.8788E-01

0.2789 0.000 1.000 132.0 14.60 / 9 Constant 9.443 1.689 Mean 0.6069E-01 0.9285E-02 Sigma 0.5994E-01 0.1133E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 133 -0.4398E-01 0.1356 0.000 0.000 133.0 27.94 / 10 Constant 23.43 5.047 Mean -0.2927E-01 0.3473E-02 Sigma 0.2693E-01 0.5229E-02

cm counts

Residuals on ISIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 4 0.9667E-01 0.8219E-01

1.000 0.000 3.000 0.000 / 0 Constant 1.008 0.5700 Mean 0.5071E-01 1.196 Sigma 0.7601 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 4 0.3667E-01 0.1948 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1100 187.2 Sigma 15.56 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 4 -0.9000E-01

0.1975 0.000 0.000 4.000 0.000 / 0 Constant 1.009 0.5774 Mean 0.1927E-01 2.850 Sigma 0.1971 0.4914E+07

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 4 -0.9667E-01 0.6600E-01 0.000 1.000 3.000 -9999. / -1 Constant 1.317 14.73 Mean -0.6000E-01 0.6427E-01 Sigma 0.6739E-01 1.369

cm counts

Residuals on ISIM - module 8

0 10 20 30 40 50

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 383 0.6307E-01

0.2103 2.000 0.000 381.0 31.33 / 15 Constant 29.20 2.519 Mean 0.6809E-01 0.4788E-02 Sigma 0.7157E-01 0.4721E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 383 -0.2250E-01 0.3048 25.00 14.00 344.0 7.409 / 13 Constant 17.46 1.789 Mean -0.4851E-01 0.1125E-01 Sigma 0.9712E-01 0.1265E-01

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 383 0.1893E-01 0.7763E-01

0.000 0.000 383.0 41.44 / 11 Constant 71.87 6.906 Mean 0.2348E-01 0.2023E-02 Sigma 0.3414E-01 0.2652E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 383 -0.5945E-01 0.1989 0.000 2.000 381.0 27.54 / 10 Constant 34.47 3.973 Mean -0.4880E-01 0.5378E-02 Sigma 0.5257E-01 0.7178E-02

cm counts