Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4111 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5111 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5112 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4121 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5121 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 1

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5122 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4211 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5211 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4212 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5212 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4221 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5221 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 2

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4222 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5222 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2311 217 -0.3810E-01 0.3829 33.00 17.00 167.0 18.88 / 15 Constant 16.74 14.33 Mean -0.7003 0.4548 Sigma 0.4293 0.1510

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3311 217 1.518 1.812 0.000 48.00 169.0 18.45 / 16 Constant 12.99 1.521 Mean 1.389 0.9520E-01 Sigma 1.000 0.8830E-01

cm counts

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4311 217 0.5897E-01 0.4589 11.00 22.00 184.0 39.26 / 10 Constant 8.570 2.063 Mean -0.3772E-01 0.1030E-01 Sigma 0.5715E-01 0.1268E-01

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5311 217 0.6669E-01 0.4540 2.000 6.000 209.0 21.51 / 5 Constant 8437. 0.1272E+05 Mean 2.589 0.1741 Sigma 0.6913 0.8981E-01

cm counts

Residuals on Drift Ch. - module 3

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2312 3 0.7917E-01 0.2552 0.000 0.000 3.000 -9999. / -1 Constant 1.284 14.34 Mean -0.7500E-01 0.2300 Sigma 0.2301 5.160

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3312 3 3.500 2.125 0.000 1.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 1.375 18.56 Sigma 1.188 0.5038

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4312 3 -0.7083E-01 0.2045 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 0.1206E-01 Mean -0.1106 4.127 Sigma 4.497 0.2250E+08

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5312 3 -0.4583E-01 0.1434 0.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.6250E-01 139.1 Sigma 13.01 2.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4321 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5321 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 3

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4322 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5322 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5411 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5412 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 4

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2421 286 -0.1095 0.3337 29.00 30.00 227.0 46.88 / 16 Constant 11.63 9.003 Mean -0.4562 0.4774 Sigma 0.3663 0.1892

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3421 286 0.7099 1.965 7.000 5.000 274.0 12.02 / 16 Constant 20.80 1.864 Mean 0.7154 0.9368E-01 Sigma 1.165 0.9510E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4421 286 0.6059E-01 0.3986 18.00 19.00 249.0 28.45 / 10 Constant 12.63 1.488 Mean 0.4165E-01 0.2554E-01 Sigma 0.1005 0.1801E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5421 286 0.6059E-01 0.3986 18.00 19.00 249.0 16.07 / 5 Constant 14.47 2.437 Mean -0.1163E-01 0.1252E-01 Sigma 0.7381E-01 0.2136E-01

cm counts

Residuals on Drift Ch. - module 4

0

0.5

1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2422 6 0.3375 0.5289 0.000 2.000 4.000 -9999. / -1 Constant 1.328 14.80 Mean -0.1875 0.1064 Sigma 0.6641E-01 1.309

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3422 6 3.375 5.071 0.000 2.000 4.000 0.000 / 0 Constant 1.005 0.5389 Mean 0.5444 1.408 Sigma 3.841 1.414

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4422 6 -0.2375 0.3771 2.000 0.000 4.000 -0.2000E+05/ -2 Constant 1.000 0.1921E-01 Mean 0.7894E-01 15.32 Sigma 6.788 0.6488E+09

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5422 6 0.000 0.000 2.000 0.000 4.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5511 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5512 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5521 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 5

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5522 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5611 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4612 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5612 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5621 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 6

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4622 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5622 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2711 1 0.2125 0.8334E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 0.1197E+08 2.000 Mean 0.1488 1.414 Sigma 0.8334E-09 1.414

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3711 1 2.625 0.000 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.625 18.56 Sigma 1.188 0.5038

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4711 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5711 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on Drift Ch. - module 7

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2712 266 0.6062E-01 0.2952 14.00 13.00 239.0 20.93 / 16 Constant 12.83 1.261 Mean 0.7801E-01 0.2036E-01 Sigma 0.1455 0.1732E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3712 266 1.134 1.590 0.000 1.000 265.0 33.69 / 16 Constant 29.62 2.932 Mean 1.089 0.5441E-01 Sigma 0.6851 0.4836E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4712 266 0.5714E-01 0.3123 11.00 8.000 247.0 10.83 / 11 Constant 16.30 1.704 Mean 0.4060E-01 0.1737E-01 Sigma 0.9930E-01 0.1321E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5712 266 0.1854E-01 0.3388 0.000 1.000 265.0 5.626 / 5 Constant 24.81 2.707 Mean 0.2356E-01 0.1181E-01 Sigma 0.6779E-01 0.1115E-01

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4721 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5721 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 7

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4722 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5722 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5811 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5812 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on Drift Ch. - module 8

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2821 2 0.1625 0.1053E-08 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1762E-01 Mean 0.1159 5.352 Sigma 5.091 0.1519E+09

cm counts

0 0.25 0.5 0.75 1

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3821 2 2.875 0.000 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 2.875 18.56 Sigma 1.188 0.5038

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4821 2 0.1125 0.7449E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.1921E-01 Mean 0.7894E-01 15.32 Sigma 6.788 0.6488E+09

cm counts

0 0.25 0.5 0.75 1

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5821 2 0.000 0.000 0.000 1.000 1.000

cm counts

Residuals on Drift Ch. - module 8

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

2822 237 0.8107E-01 0.4619 15.00 16.00 206.0 10.29 / 17 Constant 13.22 1.431 Mean 0.3563E-01 0.9673E-02 Sigma 0.1040 0.7896E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

3822 237 1.141 1.786 1.000 1.000 235.0 15.93 / 16 Constant 13.21 1.320 Mean 1.032 0.1615 Sigma 1.575 0.1965

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

4822 237 0.5373E-01 0.4478 4.000 5.000 228.0 6.116 / 11 Constant 18.30 2.087 Mean 0.2900E-01 0.8702E-02 Sigma 0.8144E-01 0.8686E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

5822 237 0.5395E-01 0.4482 4.000 5.000 228.0 3.078 / 5 Constant 18.84 2.212 Mean 0.3329E-01 0.2057E-01 Sigma 0.7904E-01 0.1921E-01

cm counts

Residuals on OSIM - module 1

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 61 -0.7867E-01

0.3004 1.000 0.000 60.00 9.168 / 10 Constant 3.065 1.375 Mean 0.1069 0.2740 Sigma 0.1869 0.2018

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 61 -0.1000E-01 0.2840 3.000 1.000 57.00 10.72 / 11 Constant 1.926 0.6339 Mean 0.1730E-01 0.4357E-01 Sigma 0.1229 0.7177E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

131 61 -0.2049E-01 0.6953E-01

0.000 0.000 61.00 18.27 / 10 Constant 15.00 4.284 Mean 0.1832E-02 0.3598E-02 Sigma 0.2062E-01 0.4712E-02

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

141 61 -0.9295E-01 0.3122 0.000 0.000 61.00 2.025 / 3 Constant 0.1778E+07 0.4259E+07 Mean 1.336 0.4592E-01 Sigma 0.2585 0.3082E-01

cm counts

Residuals on OSIM - module 1

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

132 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

142 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 2

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 321 0.1324E-01

0.2392 0.000 0.000 321.0 21.96 / 13 Constant 27.83 3.183 Mean 0.5205E-02 0.5339E-02 Sigma 0.6232E-01 0.7620E-02

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 321 -0.2403E-01 0.3214 21.00 22.00 278.0 24.20 / 13 Constant 18.37 2.146 Mean -0.1127E-01 0.5890E-02 Sigma 0.6277E-01 0.5664E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

231 321 0.1081E-01

0.1806 0.000 0.000 321.0 24.91 / 15 Constant 31.27 3.229 Mean 0.8945E-02 0.4187E-02 Sigma 0.6213E-01 0.5406E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

241 321 0.7819E-02 0.1565 0.000 0.000 321.0 0.5564 / 3 Constant 50.27 4.945 Mean 0.3500E-02 0.2932E-02 Sigma 0.3355E-01 0.3363E-02

cm counts

Residuals on OSIM - module 2

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 2 -0.2258E-07 0.5000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.317 14.73 Mean -0.9112E-08 0.6417E-01 Sigma 0.6739E-01 1.369

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 2 -0.1100 0.1400 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.3000E-01 337.1 Sigma 21.50 1.414

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

232 2 -0.1000E-01 0.4000E-01

0.000 0.000 2.000 -9999. / -1 Constant 1.328 14.85 Mean -0.1000E-01 0.4991E-01 Sigma 0.5313E-01 1.048

cm counts

0

0.5

1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

242 2 -0.2258E-07 0.3000E-01 0.000 0.000 2.000 -9999. / -1 Constant 1.346 15.05 Mean -0.2226E-07 0.3568E-01 Sigma 0.3893E-01 0.7331

cm counts

Residuals on OSIM - module 3

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 193 0.3147E-01

0.2271 0.000 3.000 190.0 24.60 / 13 Constant 21.76 2.936 Mean 0.6022E-02 0.4672E-02 Sigma 0.4331E-01 0.4606E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 193 -0.5791E-01 0.3371 5.000 11.00 177.0 30.26 / 12 Constant 9.195 3.090 Mean -0.1681E-01 0.1135E-01 Sigma 0.5665E-01 0.1930E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

331 193 0.3147E-01

0.2267 0.000 3.000 190.0 29.49 / 16 Constant 20.77 2.951 Mean 0.6123E-02 0.4644E-02 Sigma 0.4592E-01 0.5057E-02

cm counts

0 20 40 60 80 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

341 193 0.5026E-02 0.2295E-01 0.000 0.000 193.0 14.79 / 3 Constant 103.6 10.12 Mean 0.2302E-02 0.1017E-02 Sigma 0.1334E-01 0.8190E-03

cm counts

Residuals on OSIM - module 3

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 1 -0.1000E-01 0.2137E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1000E-01 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

332 1 0.1300 0.7188E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1300 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

342 1 0.1000E-01 0.3692E-10 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.6191E-03 Mean 0.7084E-02 0.7293 Sigma 10.18 0.2456E+07

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

531 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

541 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 5

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

532 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

542 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

631 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

641 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 6

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 18 -0.2111 0.2244 0.000 0.000 18.00 2.270 / 3 Constant 0.2397E+05 0.2407E+05 Mean -0.9649 0.1885 Sigma 0.1907 0.3914E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 18 -0.3800E-01 0.3269 1.000 2.000 15.00 0.7694 / 4 Constant 1.243 0.6117 Mean 0.3384E-01 0.7180 Sigma 0.2187 1.068

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

632 18 0.4889E-01 0.4829E-01

0.000 0.000 18.00 4.802 / 7 Constant 1.691 0.6924 Mean 0.3090E-01 0.4262E-01 Sigma 0.8810E-01 0.6737E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

642 18 0.000 0.000 0.000 0.000 18.00

cm counts

Residuals on OSIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

731 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

741 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on OSIM - module 7

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 339 -0.1488 0.2170 1.000 1.000 337.0 20.64 / 14 Constant 28.74 3.124 Mean -0.1325 0.4959E-02 Sigma 0.6629E-01 0.7013E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 339 -0.1145E-01 0.2896 12.00 23.00 304.0 16.73 / 13 Constant 16.57 1.807 Mean -0.3168E-01 0.8425E-02 Sigma 0.8676E-01 0.9822E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

732 339 0.1124 0.1745 0.000 0.000 339.0 35.53 / 16 Constant 32.45 3.203 Mean 0.1035 0.4229E-02 Sigma 0.6077E-01 0.5229E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

742 339 0.9649E-01 0.1563 0.000 0.000 339.0 3.958 / 3 Constant 0.1167E+05 0.1478E+05 Mean 0.6199 0.2300E-01 Sigma 0.1645 0.2046E-01

cm counts

Residuals on OSIM - module 8

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 1 -0.1500 0.4657E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.1500 337.1 Sigma 21.50 1.414

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

831 1 0.1500 0.9740E-09

0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean 0.1500 337.1 Sigma 21.50 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

841 1 0.3000E-01 0.1936E-09 0.000 0.000 1.000 -0.2000E+05/ -2 Constant 1.000 0.4967E-03 Mean 0.3775E-01 0.6635 Sigma 21.17 0.1715E+07

cm counts

Residuals on OSIM - module 8

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 186 -0.1060 0.2687 1.000 1.000 184.0 33.71 / 14 Constant 19.34 2.844 Mean -0.1548 0.4221E-02 Sigma 0.3812E-01 0.4350E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 186 0.1277E-01 0.3638 12.00 15.00 159.0 6.403 / 13 Constant 6.463 1.095 Mean -0.2321E-01 0.2436E-01 Sigma 0.1228 0.4152E-01

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

832 186 0.1055 0.2674 1.000 1.000 184.0 29.06 / 15 Constant 19.92 2.825 Mean 0.1540 0.4288E-02 Sigma 0.3692E-01 0.4149E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

842 186 0.6559E-02 0.2883E-01 0.000 0.000 186.0 10.74 / 3 Constant 71.71 8.556 Mean 0.9082E-02 0.1445E-02 Sigma 0.1797E-01 0.1635E-02

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

911 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

921 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

931 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

941 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 9

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

912 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

922 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

932 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

942 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1011 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1021 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1031 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1041 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on OSIM - module 10

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1012 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1022 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1032 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1042 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 1

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1111 178 0.5141E-02

0.2776 0.000 1.000 177.0 8.854 / 13 Constant 14.37 1.749 Mean -0.7215E-01 0.3807E-01 Sigma 0.9474E-01 0.2776E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1121 178 -0.2638E-01 0.3223 11.00 7.000 160.0 16.24 / 12 Constant 8.741 1.342 Mean 0.3109E-01 0.1194E-01 Sigma 0.8162E-01 0.1343E-01

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1131 178 -0.4270E-02

0.1205 0.000 0.000 178.0 21.59 / 10 Constant 31.21 4.692 Mean 0.1638E-01 0.3053E-02 Sigma 0.3156E-01 0.3793E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1141 178 -0.5706E-02 0.2529 1.000 0.000 177.0 11.01 / 10 Constant 15.74 2.120 Mean 0.3576E-01 0.6592E-02 Sigma 0.6200E-01 0.7786E-02

cm counts

Residuals on ISIM - module 1

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1112 8 -0.2500E-02

0.4489 0.000 0.000 8.000 -9999. / -1 Constant 3.246 25.66 Mean -0.6000E-01 0.5957E-02 Sigma 0.1016E-01 0.8293E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1122 8 -0.3857E-01 0.2397 0.000 1.000 7.000 0.000 / 0 Constant 1.005 0.5568 Mean 0.5215E-01 0.8190 Sigma 0.3398 0.4132

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1132 8 -0.2500E-02

0.1816 0.000 0.000 8.000 0.7387 / 1 Constant 2.458 3.253 Mean -0.2901E-01 0.3317E-01 Sigma 0.6143E-01 0.6134E-01

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1142 8 0.2500E-02 0.4061 0.000 0.000 8.000 -9999. / -1 Constant 3.657 37.29 Mean 0.5562E-01 0.8838E-01 Sigma 0.8925E-02 0.9007E-01

cm counts

Residuals on ISIM - module 2

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1211 365 -0.3959E-01

0.2496 1.000 1.000 363.0 32.56 / 15 Constant 31.66 4.047 Mean -0.1591E-01 0.4582E-02 Sigma 0.5814E-01 0.7383E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1221 365 -0.2513E-01 0.3231 22.00 27.00 316.0 20.80 / 13 Constant 16.97 2.159 Mean -0.2347E-01 0.6534E-02 Sigma 0.7157E-01 0.8461E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1231 365 0.3652E-01

0.2429 0.000 0.000 365.0 13.99 / 11 Constant 33.13 3.157 Mean 0.1986E-01 0.4071E-02 Sigma 0.5933E-01 0.4754E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1241 365 0.1334E-01 0.9182E-01 0.000 0.000 365.0 58.17 / 10 Constant 55.87 7.319 Mean 0.7001E-02 0.2321E-02 Sigma 0.3697E-01 0.4188E-02

cm counts

Residuals on ISIM - module 2

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1212 11 -0.1364E-01

0.2999 0.000 0.000 11.00 0.7053 / 3 Constant 4.208 20.01 Mean 2.624 3.667 Sigma 1.641 3.527

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1222 11 0.2560 0.3170 1.000 0.000 10.00 0.3046E-05/ 3 Constant 1.028 6.153 Mean -6.215 326.0 Sigma 27.06 2133.

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1232 11 0.1182E-01

0.2817 0.000 0.000 11.00 0.2124 / 1 Constant 1.621 1.371 Mean 0.2072E-01 0.4909E-01 Sigma 0.7587E-01 0.8669E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1242 11 0.4545E-02 0.1082 0.000 0.000 11.00 0.9294 / 3 Constant 1.424 0.7513 Mean -0.6382E-01 0.9987 Sigma 0.2779 1.369

cm counts

Residuals on ISIM - module 3

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1311 68 -0.7697E-01

0.2630 2.000 0.000 66.00 10.70 / 11 Constant 9.117 14.13 Mean -0.5839 0.5882 Sigma 0.3574 0.1879

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1321 68 -0.5951E-01 0.2939 4.000 3.000 61.00 9.558 / 10 Constant 2.654 0.9959 Mean -0.1901E-01 0.3975E-01 Sigma 0.1227 0.9852E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1331 68 0.7121E-01

0.2373 0.000 2.000 66.00 9.383 / 11 Constant 4.739 1.314 Mean 0.3506E-01 0.1182E-01 Sigma 0.6163E-01 0.1661E-01

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1341 68 -0.5441E-01 0.1679 0.000 0.000 68.00 2.872 / 7 Constant 7.706 1.615 Mean -0.2382E-01 0.1072E-01 Sigma 0.5414E-01 0.1341E-01

cm counts

Residuals on ISIM - module 3

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1312 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1322 2 -0.7000E-01 0.6527E-09 0.000 1.000 1.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.7000E-01 337.1 Sigma 21.50 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1332 2 0.000 0.000 0.000 0.000 2.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1342 2 -0.2200 0.1300 0.000 0.000 2.000 -0.2000E+05/ -2 Constant 1.000 0.7138E-02 Mean -0.1170 2.768 Sigma 6.505 0.3675E+09

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1411 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1421 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1431 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1441 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 4

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1412 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1422 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1432 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1442 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 5

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1511 4 0.1850 0.1220 0.000 0.000 4.000 0.000 / 0 Constant 1.009 0.6901 Mean 0.8371E-01 1.282 Sigma 0.3089 3.802

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1521 4 0.2300 0.1855 1.000 0.000 3.000 -0.2000E+05/ -2 Constant 1.000 1.000 Mean -0.3000E-01 337.1 Sigma 21.50 1.414

cm counts

0

1

2

3

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1531 4 0.7000E-01 0.4690E-01

0.000 0.000 4.000 0.000 / 0 Constant 3.458 5.853 Mean 0.8993E-01 0.1724E-01 Sigma 0.3811E-01 0.3176E-01

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1541 4 0.1750 0.1152 0.000 0.000 4.000 -9999. / -1 Constant 2.149 10.14 Mean 0.1161 0.3304 Sigma 0.3727E-01 0.3794

cm counts

Residuals on ISIM - module 5

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1512 129 0.1481 0.2463 1.000 4.000 124.0 17.70 / 15 Constant 6.978 1.374 Mean 0.1001 0.1270E-01 Sigma 0.7900E-01 0.1579E-01

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1522 129 -0.3442E-01 0.3007 6.000 10.00 113.0 12.86 / 12 Constant 8.671 1.846 Mean -0.2676E-01 0.7274E-02 Sigma 0.4922E-01 0.8777E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1532 129 0.6876E-01

0.1287 0.000 0.000 129.0 19.23 / 11 Constant 16.22 3.535 Mean 0.4242E-01 0.4807E-02 Sigma 0.4333E-01 0.8796E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1542 129 0.1346 0.2568 0.000 3.000 126.0 11.66 / 8 Constant 9.618 2.165 Mean 0.7944E-01 0.2510E-01 Sigma 0.4884E-01 0.2463E-01

cm counts

Residuals on ISIM - module 6

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1611 4 0.1500 0.3742E-01

0.000 0.000 4.000 0.2045E-03/ 1 Constant 1.009 0.5852 Mean 0.1656 1.026 Sigma 0.2736 1.188

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1621 4 0.1100 0.4320E-01 0.000 1.000 3.000 0.000 / 0 Constant 1.018 0.6176 Mean 0.8957E-01 0.8510 Sigma 0.2581 0.3245

cm counts

0 0.5 1 1.5 2

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1631 4 0.1400 0.3000E-01

0.000 0.000 4.000 -9999. / -1 Constant 2.578 16.50 Mean 0.1232 0.5142E-01 Sigma 0.9587E-02 0.7471E-01

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1641 4 0.6000E-01 0.2236E-01 0.000 0.000 4.000 0.5069E-04/ 1 Constant 1.003 0.5804 Mean 0.6000E-01 1.280 Sigma 0.2482 9.951

cm counts

Residuals on ISIM - module 6

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1612 387 0.1079 0.2455 1.000 2.000 384.0 51.86 / 15 Constant 36.01 4.056 Mean 0.1247 0.3643E-02 Sigma 0.5310E-01 0.5391E-02

cm counts

0

10

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1622 387 -0.1434E-01 0.2971 15.00 31.00 341.0 14.84 / 13 Constant 19.28 2.149 Mean -0.2088E-01 0.7032E-02 Sigma 0.8168E-01 0.9322E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1632 387 0.1058 0.2366 1.000 0.000 386.0 43.90 / 11 Constant 48.86 63.42 Mean 0.2482 0.1569 Sigma 0.1334 0.5011E-01

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1642 387 0.3801E-01 0.9253E-01 0.000 0.000 387.0 51.59 / 10 Constant 78.92 9.650 Mean 0.3985E-01 0.1730E-02 Sigma 0.2845E-01 0.3056E-02

cm counts

Residuals on ISIM - module 7

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1711 1 0.000 0.000 0.000 0.000 1.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1721 1 0.000 0.000 1.000 0.000 0.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1731 1 0.000 0.000 0.000 0.000 1.000

cm counts

0 0.25 0.5 0.75 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1741 1 0.000 0.000 0.000 0.000 1.000

cm counts

Residuals on ISIM - module 7

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1712 63 0.9386E-01

0.3416 6.000 0.000 57.00 7.030 / 11 Constant 0.7873E+06 0.1608E+07 Mean 4.709 0.1375 Sigma 0.9077 0.9370E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1722 63 0.1040E-01 0.3636 8.000 5.000 50.00 6.695 / 8 Constant 16.71 52.75 Mean -1.558 1.060 Sigma 0.7326 0.3337

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1732 63 0.6690E-01

0.3341 5.000 0.000 58.00 4.220 / 8 Constant 0.8069E+08 0.1947E+09 Mean 4.384 0.1110 Sigma 0.7316 0.6483E-01

cm counts

0 2 4 6 8

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1742 63 0.2048E-01 0.2348 0.000 0.000 63.00 9.842 / 8 Constant 0.5326E+07 0.2057E+07 Mean -2.664 0.2008 Sigma 0.4913 0.3685E-01

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1811 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1821 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1831 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1841 0 0.000 0.000 0.000 0.000 0.000

cm counts

Residuals on ISIM - module 8

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1812 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1822 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1832 0 0.000 0.000 0.000 0.000 0.000

cm counts

-1 -0.5 0 0.5 1

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

1842 0 0.000 0.000 0.000 0.000 0.000

cm counts