Residuals on Straw Tubes (LOST)

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 84 -0.1005E-01 0.3152E-01

8.000 0.000 76.00 11.58 / 16 Constant 4.893 0.9571 Mean -0.3361E-02 0.3166E-02 Sigma 0.1963E-01 0.3838E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 84 -0.1079E-01 0.3392E-01 7.000 1.000 76.00 9.228 / 15 Constant 5.017 0.9691 Mean -0.5369E-02 0.4192E-02 Sigma 0.2080E-01 0.5019E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 84 -0.8000E-02 0.1995E-01

2.000 0.000 82.00 16.79 / 16 Constant 8.002 1.729 Mean -0.7201E-02 0.1569E-02 Sigma 0.1182E-01 0.2150E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 84 -0.7902E-02 0.1977E-01 2.000 0.000 82.00 12.51 / 15 Constant 8.051 1.416 Mean -0.3459E-02 0.1803E-02 Sigma 0.1365E-01 0.1829E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 84 -0.1373E-01 0.5413E-01

9.000 0.000 75.00 16.70 / 15 Constant 4.297 10.01 Mean -0.3838 0.4222 Sigma 0.3296 0.2437

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 46 -0.2195E-02 0.5484E-01 5.000 0.000 41.00 3.281 / 13 Constant 1.527 0.4889 Mean -0.9544E-02 0.2545E-01 Sigma 0.4888E-01 0.4476E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 84 -0.9710E-02 0.4275E-01

14.00 1.000 69.00 16.18 / 18 Constant 2.374 0.5043 Mean -0.8683E-02 0.1850E-01 Sigma 0.3778E-01 0.2829E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 51 -0.1349E-01 0.5496E-01 11.00 1.000 39.00 3.661 / 12 Constant 1.359 0.5492 Mean -0.3077E-01 0.1802 Sigma 0.1167 0.3287

cm counts

Residuals on Straw Tubes (LEST)

0 2 4 6 8

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 84 -0.1301E-01 0.4921E-01

10.00 1.000 73.00 17.83 / 16 Constant 2.561 0.6281 Mean -0.8828E-02 0.4582E-01 Sigma 0.3610E-01 0.5422E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 21 -0.3075E-01 0.7077E-01 5.000 0.000 16.00 1.120 / 3 Constant 1.351 0.8213 Mean -0.1360E-01 0.2097E-01 Sigma 0.2808E-01 0.4554E-01

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 84 -0.8319E-02 0.4989E-01

15.00 0.000 69.00 13.02 / 15 Constant 4.827 10.76 Mean -0.5294 0.6896 Sigma 0.4147 0.3425

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 84 -0.2200E-01 0.4942E-01 0.000 60.00 24.00 2.067 / 9 Constant 16.49 61.54 Mean 0.7363 0.3691 Sigma 0.3251 0.2121

cm counts

Z Residuals on Straw Tubes

0 2 4 6 8

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 84 -0.3738 1.393 0.000 0.000 84.00 11.82 / 23 Constant 3.953 0.6366 Mean -0.1943 0.2569 Sigma 1.635 0.3069

cm counts

0

2

4

6

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 84 -0.2690 1.616 0.000 0.000 84.00 22.37 / 27 Constant 2.585 0.4801 Mean 0.4155E-01 0.4514 Sigma 2.188 0.6482

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 37 -0.4205E-01 0.2401 2.000 2.000 33.00 3.934 / 9 Constant 2.129 0.8425 Mean -0.2109 0.4261 Sigma 0.2802 0.3798

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 37 1.353 2.011 1.000 2.000 34.00 3.518 / 10 Constant 3.106 0.8089 Mean 1.571 0.3065 Sigma 1.067 0.3801

cm counts

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 37 0.2196E-01 0.1818 0.000 0.000 37.00 2.414 / 5 Constant 9.526 2.379 Mean 0.1426E-01 0.6812E-02 Sigma 0.3286E-01 0.7137E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 37 0.4129E-01 0.2362 2.000 2.000 33.00 3.093 / 3 Constant 0.1664E+06 0.5524E+06 Mean 2.199 0.1223 Sigma 0.4554 0.8688E-01

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 33 0.4375E-01 0.1174 0.000 1.000 32.00 5.539 / 6 Constant 3.313 0.8046 Mean 0.4634E-01 0.1464 Sigma 0.1431 0.1387

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 33 1.625 1.646 0.000 0.000 33.00 4.850 / 10 Constant 2.563 0.9534 Mean 1.286 0.5163 Sigma 1.207 0.8441

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 33 0.1932E-01 0.6889E-01 0.000 0.000 33.00 0.9346 / 2 Constant 14.98 3.505 Mean 0.1135E-01 0.4529E-02 Sigma 0.2128E-01 0.4020E-02

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 33 0.4297E-01 0.1152 0.000 1.000 32.00 5.313 / 3 Constant 14.85 61.75 Mean 1.880 1.318 Sigma 0.9444 0.7781

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36 -0.5347E-01 0.2844 0.000 0.000 36.00 7.028 / 13 Constant 1.432 0.3607 Mean -0.1068 0.5298 Sigma 0.4774 1.110

cm counts

0

2

4

6

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36 2.146 1.136 0.000 0.000 36.00 5.316 / 8 Constant 4.133 1.167 Mean 2.071 0.1778 Sigma 0.7312 0.2471

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36 -0.6944E-03 0.1248E-01 0.000 0.000 36.00 -9999. / -1 Constant 29.27 76.62 Mean -0.7153E-03 0.4405E-02 Sigma 0.1268E-01 0.3427E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36 0.5347E-01 0.2844 0.000 0.000 36.00 1.572 / 4 Constant 3.786 1.753 Mean -0.1704E-01 0.4330E-01 Sigma 0.4127E-01 0.4438E-01

cm counts

Residuals on Drift Chambers

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 46 0.3052E-01 0.4397 2.000 1.000 43.00 3.931 / 13 Constant 3.181 8.875 Mean 2.641 5.173 Sigma 1.999 3.820

cm counts

0 2 4 6 8

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 46 1.337 1.964 0.000 0.000 46.00 7.605 / 10 Constant 3.591 0.8611 Mean 1.266 0.2952 Sigma 1.120 0.3126

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 46 -0.5435E-03 0.1249E-01 0.000 0.000 46.00 -9999. / -1 Constant 37.37 86.78 Mean -0.5603E-03 0.3279E-02 Sigma 0.1269E-01 0.3041E-01

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 46 0.3052E-01 0.4397 2.000 1.000 43.00 0.4309 / 3 Constant 0.3247E+05 0.1097E+06 Mean 1.555 0.9987E-01 Sigma 0.3428 0.7717E-01

cm counts

Residuals on OSIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 63 -0.1645E-01

0.1928 1.000 0.000 62.00 21.20 / 10 Constant 2.999 1.723 Mean 0.4038E-02 0.7395E-01 Sigma 0.7538E-01 0.1198

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 63 0.2379E-01 0.3099 1.000 4.000 58.00 10.68 / 11 Constant 2.895 0.8512 Mean 0.5058E-02 0.2729E-01 Sigma 0.9138E-01 0.4949E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 63 -0.1429E-02

0.1294 0.000 0.000 63.00 11.68 / 7 Constant 21.30 4.347 Mean 0.3051E-02 0.2685E-02 Sigma 0.1716E-01 0.2745E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 63 -0.3222E-01 0.1938 0.000 0.000 63.00 2.986 / 3 Constant 10.27 3.082 Mean 0.9526E-02 0.5405E-02 Sigma 0.2369E-01 0.6495E-02

cm counts

Residuals on OSIM

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 63 -0.8290E-01

0.2330 1.000 0.000 62.00 6.558 / 11 Constant 5.663 1.217 Mean -0.1366 0.1156E-01 Sigma 0.6107E-01 0.1315E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 63 0.3333E-02 0.2803 3.000 6.000 54.00 10.97 / 11 Constant 2.228 0.5746 Mean -0.1116E-01 0.2894 Sigma 0.1392 0.3591

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 63 -0.6825E-02

0.1468 0.000 0.000 63.00 20.72 / 10 Constant 13.95 3.644 Mean 0.3370E-01 0.3685E-02 Sigma 0.1960E-01 0.3900E-02

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 63 0.8129E-01 0.2094 0.000 1.000 62.00 0.000 / 0 Constant 2.019 1.041 Mean 0.3911E-01 0.2716 Sigma 0.7518E-01 0.2412

cm counts

Residuals on ISIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 67 -0.1185E-01

0.2201 0.000 2.000 65.00 17.49 / 10 Constant 4.354 3.647 Mean -0.1750 0.3952 Sigma 0.1968 0.2010

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 67 0.1533E-01 0.2897 1.000 6.000 60.00 10.86 / 12 Constant 2.851 0.7529 Mean -0.1888E-01 0.3401E-01 Sigma 0.1122 0.5546E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 67 0.2758E-01

0.1395 1.000 0.000 66.00 9.433 / 8 Constant 9.258 2.117 Mean 0.7024E-02 0.6278E-02 Sigma 0.3966E-01 0.7759E-02

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 67 0.7576E-02 0.1877 0.000 1.000 66.00 17.98 / 8 Constant 5.998 1.733 Mean 0.5591E-01 0.2918E-01 Sigma 0.4845E-01 0.2922E-01

cm counts

Residuals on ISIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 70 0.7806E-01

0.2012 2.000 1.000 67.00 12.26 / 10 Constant 5.360 1.207 Mean 0.1133 0.1358E-01 Sigma 0.6902E-01 0.1737E-01

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 70 0.6666E-03 0.2934 2.000 8.000 60.00 12.02 / 11 Constant 2.520 0.6275 Mean 0.1467E-01 0.6364E-01 Sigma 0.1218 0.8726E-01

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 70 0.2188E-01

0.1431 1.000 0.000 69.00 16.17 / 8 Constant 5.303 1.219 Mean 0.4671E-02 0.2030E-01 Sigma 0.6840E-01 0.2030E-01

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 70 0.8565E-01 0.1976 1.000 0.000 69.00 8.473 / 9 Constant 0.1450E+10 0.2612E+10 Mean 3.012 0.4988E-01 Sigma 0.4691 0.2739E-01

cm counts