Residuals on Straw Tubes (LOST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 667 -0.3526E-02 0.3377E-01

49.00 15.00 603.0 15.35 / 19 Constant 43.70 2.564 Mean 0.1160E-02 0.9225E-03 Sigma 0.1935E-01 0.8754E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 667 -0.4685E-02 0.3486E-01 64.00 7.000 596.0 19.60 / 19 Constant 43.15 2.561 Mean 0.1171E-02 0.9285E-03 Sigma 0.1940E-01 0.8970E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 667 -0.8910E-02 0.3020E-01

19.00 6.000 642.0 17.85 / 19 Constant 52.24 2.894 Mean -0.4868E-02 0.7711E-03 Sigma 0.1736E-01 0.6869E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 667 -0.8943E-02 0.2586E-01 35.00 0.000 632.0 27.63 / 19 Constant 53.16 3.019 Mean -0.4963E-02 0.7445E-03 Sigma 0.1674E-01 0.6842E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 667 0.5145E-02 0.5401E-01

62.00 20.00 585.0 22.96 / 19 Constant 27.47 1.945 Mean 0.5819E-02 0.1615E-02 Sigma 0.2507E-01 0.1916E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 424 -0.8400E-02 0.6188E-01 55.00 9.000 360.0 13.40 / 19 Constant 15.11 1.308 Mean 0.1994E-03 0.2714E-02 Sigma 0.3045E-01 0.3485E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 667 -0.6870E-02 0.5774E-01

54.00 11.00 602.0 13.17 / 19 Constant 26.23 1.823 Mean -0.4559E-02 0.1847E-02 Sigma 0.2778E-01 0.2324E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 263 -0.3806E-02 0.6088E-01 54.00 3.000 206.0 11.13 / 19 Constant 8.992 1.088 Mean -0.8650E-03 0.2658E-02 Sigma 0.2473E-01 0.3074E-02

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 667 -0.1663E-02 0.5208E-01

77.00 8.000 582.0 19.97 / 19 Constant 27.78 1.806 Mean 0.1832E-02 0.1508E-02 Sigma 0.2473E-01 0.1508E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 349 -0.5146E-02 0.5737E-01 40.00 14.00 295.0 21.65 / 19 Constant 11.13 1.145 Mean -0.1373E-02 0.3918E-02 Sigma 0.3428E-01 0.6084E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 667 -0.9539E-02 0.5518E-01

56.00 4.000 607.0 22.44 / 19 Constant 30.77 2.062 Mean -0.4725E-02 0.1320E-02 Sigma 0.2270E-01 0.1404E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 667 -0.1010E-01 0.5784E-01 31.00 280.0 356.0 22.72 / 19 Constant 14.49 1.468 Mean -0.1826E-02 0.2236E-02 Sigma 0.2593E-01 0.3074E-02

cm counts

Z Residuals on Straw Tubes

0 10 20 30 40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 667 -0.1132 1.611 1.000 0.000 666.0 23.83 / 31 Constant 34.47 1.703 Mean -0.3829E-01 0.6391E-01 Sigma 1.481 0.4989E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 667 -0.2356 1.625 2.000 0.000 665.0 23.10 / 32 Constant 35.38 1.763 Mean -0.1262 0.6007E-01 Sigma 1.419 0.4643E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 237 0.6154E-01 0.3859 10.00 19.00 208.0 8.585 / 17 Constant 12.02 1.453 Mean 0.3295E-01 0.1170E-01 Sigma 0.1213 0.1353E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 237 0.6165 1.220 1.000 0.000 236.0 6.216 / 14 Constant 24.33 2.294 Mean 0.7628 0.6643E-01 Sigma 0.8924 0.6715E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 237 -0.5409E-01 0.3574 6.000 2.000 229.0 12.76 / 11 Constant 20.61 2.628 Mean -0.1916E-01 0.6376E-02 Sigma 0.7237E-01 0.7955E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 237 0.5035E-01 0.3514 8.000 17.00 212.0 4.384 / 5 Constant 16.33 2.102 Mean 0.3656E-01 0.2097E-01 Sigma 0.8037E-01 0.2078E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 229 -0.4776E-01 0.2618 6.000 11.00 212.0 27.32 / 16 Constant 12.35 1.378 Mean -0.6775E-01 0.1747E-01 Sigma 0.1300 0.1640E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 229 1.341 1.233 0.000 0.000 229.0 14.53 / 16 Constant 19.75 1.850 Mean 1.456 0.8976E-01 Sigma 1.068 0.8263E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 229 -0.6993E-02 0.2835 1.000 1.000 227.0 13.57 / 11 Constant 24.24 2.339 Mean -0.3546E-01 0.5828E-02 Sigma 0.7161E-01 0.4718E-02

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 229 0.1713E-01 0.2685 7.000 6.000 216.0 5.147 / 5 Constant 15.48 2.855 Mean 0.8029E-01 0.1323 Sigma 0.1585 0.1271

cm counts

Residuals on Drift Chambers

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 169 -0.6450E-01 0.3844 11.00 8.000 150.0 26.02 / 17 Constant 5.180 0.8308 Mean 0.1061 0.1862 Sigma 0.2562 0.2114

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 169 2.250 1.271 2.000 1.000 166.0 15.64 / 13 Constant 15.01 1.828 Mean 2.243 0.1222 Sigma 0.9615 0.1308

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 169 0.7016E-01 0.3643 5.000 4.000 160.0 27.13 / 11 Constant 8.092 1.387 Mean -0.4466E-01 0.1890E-01 Sigma 0.1174 0.3127E-01

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 169 -0.7016E-01 0.3643 4.000 5.000 160.0 5.430 / 5 Constant 8.557 1.577 Mean 0.2974E-01 0.2574E-01 Sigma 0.7509E-01 0.2686E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 258 -0.7256E-01 0.1962 16.00 6.000 236.0 19.56 / 15 Constant 15.56 1.400 Mean -0.6922E-01 0.1414E-01 Sigma 0.1314 0.1155E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 258 0.7607 1.917 1.000 1.000 256.0 9.145 / 16 Constant 23.62 2.065 Mean 0.8836 0.6646E-01 Sigma 0.9318 0.5677E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 258 -0.5015E-01 0.2648 7.000 4.000 247.0 13.51 / 11 Constant 23.42 2.050 Mean -0.5232E-01 0.7629E-02 Sigma 0.8598E-01 0.5757E-02

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 258 0.5494E-01 0.2746 4.000 6.000 248.0 5.722 / 5 Constant 21.78 12.67 Mean 0.5715E-01 0.2040 Sigma 0.1142 0.1166

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 561 -0.6645E-01

0.2368 3.000 1.000 557.0 38.01 / 14 Constant 41.36 3.253 Mean -0.8344E-01 0.4195E-02 Sigma 0.7316E-01 0.4963E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 561 0.2192E-01 0.2893 29.00 22.00 510.0 37.49 / 13 Constant 27.37 2.403 Mean 0.4206E-02 0.6320E-02 Sigma 0.8816E-01 0.8208E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 561 -0.3046E-01

0.1388 1.000 0.000 560.0 98.64 / 16 Constant 50.10 3.715 Mean -0.3571E-01 0.3574E-02 Sigma 0.6470E-01 0.4079E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 561 0.5709E-01 0.2078 0.000 0.000 561.0 6.836 / 3 Constant 0.2491E+07 0.2177E+07 Mean 1.883 0.2730E-01 Sigma 0.3918 0.1944E-01

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 529 -0.9004E-01

0.2235 3.000 4.000 522.0 48.12 / 14 Constant 39.77 3.126 Mean -0.8203E-01 0.4477E-02 Sigma 0.7039E-01 0.4582E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 529 -0.2188E-01 0.2948 32.00 19.00 478.0 15.78 / 13 Constant 24.75 2.289 Mean -0.4411E-01 0.8369E-02 Sigma 0.9486E-01 0.1098E-01

cm counts

0

25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 529 0.5049E-01

0.1639 0.000 0.000 529.0 68.82 / 16 Constant 67.52 5.741 Mean 0.3786E-01 0.2441E-02 Sigma 0.4705E-01 0.3243E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 529 -0.7118E-01 0.1766 0.000 4.000 525.0 1.344 / 3 Constant 804.9 478.0 Mean -0.2417 0.3984E-01 Sigma 0.9157E-01 0.9009E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 579 0.8541E-01

0.2263 4.000 4.000 571.0 49.55 / 15 Constant 39.01 3.081 Mean 0.7002E-01 0.4405E-02 Sigma 0.7836E-01 0.5421E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 579 0.1776E-01 0.2893 37.00 19.00 523.0 17.51 / 13 Constant 28.20 2.335 Mean -0.8482E-02 0.7035E-02 Sigma 0.9117E-01 0.8197E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 579 -0.3122E-01

0.1295 3.000 0.000 576.0 82.67 / 11 Constant 60.74 6.422 Mean -0.2499E-01 0.2973E-02 Sigma 0.5337E-01 0.5908E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 579 0.6242E-01 0.2148 0.000 1.000 578.0 33.35 / 10 Constant 48.33 3.735 Mean 0.5516E-01 0.4464E-02 Sigma 0.6672E-01 0.5537E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 583 0.6591E-01

0.2343 4.000 2.000 577.0 37.20 / 15 Constant 43.14 3.094 Mean 0.6911E-01 0.4086E-02 Sigma 0.7273E-01 0.4102E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 583 -0.1597E-01 0.3048 37.00 20.00 526.0 13.65 / 13 Constant 26.54 2.272 Mean -0.3862E-01 0.8685E-02 Sigma 0.1004 0.1131E-01

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 583 0.3316E-01

0.1557 0.000 1.000 582.0 51.54 / 11 Constant 79.90 6.377 Mean 0.2552E-01 0.2138E-02 Sigma 0.4344E-01 0.2809E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 583 -0.5455E-01 0.1891 0.000 3.000 580.0 48.36 / 10 Constant 51.21 5.620 Mean -0.4238E-01 0.5230E-02 Sigma 0.5732E-01 0.8218E-02

cm counts