Residuals on Straw Tubes (LOST)

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 833 -0.7617E-02 0.2796E-01

42.00 7.000 784.0 26.58 / 19 Constant 57.19 2.993 Mean -0.4996E-02 0.8558E-03 Sigma 0.1993E-01 0.8714E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 833 -0.7681E-02 0.2647E-01 52.00 3.000 778.0 27.52 / 19 Constant 56.62 2.938 Mean -0.5104E-02 0.8809E-03 Sigma 0.2018E-01 0.8770E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 833 -0.3242E-02 0.2887E-01

26.00 5.000 802.0 27.96 / 19 Constant 70.59 3.436 Mean -0.8192E-03 0.6633E-03 Sigma 0.1647E-01 0.5514E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 833 -0.4335E-02 0.2727E-01 32.00 1.000 800.0 37.20 / 19 Constant 72.10 3.584 Mean -0.6026E-03 0.6597E-03 Sigma 0.1593E-01 0.5496E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 833 -0.6059E-02 0.4562E-01

74.00 8.000 751.0 13.26 / 19 Constant 39.92 2.253 Mean -0.4245E-02 0.1350E-02 Sigma 0.2585E-01 0.1558E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 503 -0.7559E-02 0.4964E-01 50.00 9.000 444.0 23.16 / 19 Constant 25.09 1.905 Mean -0.7422E-02 0.1500E-02 Sigma 0.2190E-01 0.1549E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 833 -0.5005E-02 0.4382E-01

55.00 14.00 764.0 20.58 / 19 Constant 43.65 2.419 Mean 0.4204E-03 0.1086E-02 Sigma 0.2276E-01 0.1132E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 402 -0.4611E-02 0.5027E-01 35.00 7.000 360.0 21.67 / 19 Constant 18.97 1.614 Mean -0.2343E-02 0.1779E-02 Sigma 0.2418E-01 0.2066E-02

cm counts

Residuals on Straw Tubes (LEST)

0 10 20 30 40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 833 -0.6275E-02 0.5020E-01

66.00 12.00 755.0 15.02 / 19 Constant 35.54 2.096 Mean -0.4996E-02 0.1599E-02 Sigma 0.2758E-01 0.1918E-02

cm counts

0 5 10 15 20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 398 -0.1258E-01 0.4783E-01 46.00 5.000 347.0 12.21 / 19 Constant 17.00 1.421 Mean -0.4250E-02 0.2237E-02 Sigma 0.2682E-01 0.2485E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 833 -0.5723E-02 0.4528E-01

62.00 5.000 766.0 11.67 / 19 Constant 44.03 2.474 Mean -0.1580E-02 0.1116E-02 Sigma 0.2311E-01 0.1222E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 833 -0.5398E-02 0.5864E-01 16.00 704.0 113.0 19.88 / 19 Constant 3.144 0.5832 Mean -0.1283E-01 0.1716E-01 Sigma 0.4120E-01 0.9226E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 833 0.8271E-01 1.453 0.000 0.000 833.0 33.53 / 32 Constant 44.98 1.996 Mean 0.1782 0.5428E-01 Sigma 1.425 0.4246E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 833 -0.1900 1.529 1.000 1.000 831.0 41.96 / 33 Constant 43.27 1.873 Mean -0.1786 0.5504E-01 Sigma 1.459 0.3940E-01

cm counts

Residuals on Drift Chambers

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 223 -0.1082 0.4070 19.00 10.00 194.0 20.66 / 16 Constant 7.527 1.271 Mean -0.1619 0.1237 Sigma 0.2301 0.7782E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 223 1.645 1.227 0.000 51.00 172.0 21.46 / 13 Constant 19.33 2.686 Mean 1.398 0.6559E-01 Sigma 0.7162 0.8505E-01

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 223 0.1039 0.3912 7.000 15.00 201.0 11.95 / 11 Constant 9.719 1.292 Mean 0.6595E-01 0.6140E-01 Sigma 0.1292 0.3610E-01

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 223 0.8888E-01 0.3718 1.000 4.000 218.0 8.366 / 5 Constant 19.77 20.78 Mean 0.2524 0.4956 Sigma 0.2435 0.2390

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 291 0.6968E-01 0.2860 9.000 14.00 268.0 10.81 / 17 Constant 15.77 1.453 Mean 0.8272E-01 0.1548E-01 Sigma 0.1382 0.1384E-01

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 291 1.137 1.675 0.000 1.000 290.0 12.27 / 16 Constant 27.88 2.311 Mean 1.212 0.5935E-01 Sigma 0.8968 0.5133E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 291 0.5776E-01 0.2877 8.000 9.000 274.0 11.00 / 11 Constant 18.85 1.729 Mean 0.6754E-01 0.2402E-01 Sigma 0.1129 0.1572E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 291 0.5087E-01 0.2796 4.000 1.000 286.0 5.874 / 5 Constant 29.15 2.805 Mean 0.5467E-01 0.2361E-01 Sigma 0.8185E-01 0.1792E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 329 -0.6310E-01 0.3210 20.00 17.00 292.0 43.26 / 16 Constant 12.78 1.348 Mean -0.4823E-01 0.2452E-01 Sigma 0.1488 0.2132E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 329 1.265 1.524 5.000 2.000 322.0 14.93 / 16 Constant 30.57 2.497 Mean 1.291 0.5837E-01 Sigma 0.9346 0.5748E-01

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 329 0.5641E-01 0.3305 11.00 10.00 308.0 23.29 / 11 Constant 20.68 2.074 Mean 0.1465E-01 0.1022E-01 Sigma 0.8248E-01 0.7426E-02

cm counts

0

10

20

30

40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 329 0.5633E-01 0.3307 11.00 10.00 308.0 16.51 / 5 Constant 21.20 2.568 Mean -0.4998E-02 0.1085E-01 Sigma 0.7752E-01 0.1560E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 235 0.3439E-01 0.2904 8.000 10.00 217.0 13.50 / 17 Constant 15.95 1.599 Mean 0.3801E-01 0.9154E-02 Sigma 0.1063 0.7970E-02

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 235 1.420 2.028 0.000 0.000 235.0 15.53 / 16 Constant 15.67 1.582 Mean 1.317 0.1049 Sigma 1.203 0.1097

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 235 0.1425E-01 0.3179 4.000 2.000 229.0 14.54 / 11 Constant 22.07 2.272 Mean 0.3104E-01 0.7445E-02 Sigma 0.7734E-01 0.6868E-02

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 235 0.1425E-01 0.3179 4.000 2.000 229.0 11.28 / 5 Constant 22.51 3.546 Mean 0.5802E-01 0.6156E-01 Sigma 0.9812E-01 0.4461E-01

cm counts

Residuals on OSIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 672 0.2176E-01

0.2540 3.000 6.000 663.0 61.33 / 14 Constant 52.53 5.308 Mean -0.1147E-02 0.3531E-02 Sigma 0.6125E-01 0.6666E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 672 -0.5348E-02 0.2770 35.00 48.00 589.0 15.36 / 13 Constant 33.83 2.524 Mean -0.7847E-02 0.6197E-02 Sigma 0.9386E-01 0.7761E-02

cm counts

0

25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 672 0.2303E-01

0.2121 0.000 3.000 669.0 106.8 / 16 Constant 60.75 6.311 Mean -0.1291E-02 0.2715E-02 Sigma 0.5423E-01 0.5045E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 672 0.5127E-02 0.1577 2.000 1.000 669.0 24.63 / 3 Constant 146.1 11.14 Mean 0.1262E-02 0.1175E-02 Sigma 0.2301E-01 0.1437E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 620 -0.1184 0.2502 6.000 0.000 614.0 58.23 / 14 Constant 47.41 6.293 Mean -0.1309 0.3994E-02 Sigma 0.6487E-01 0.9555E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 620 -0.1203E-01 0.2800 29.00 40.00 551.0 19.91 / 13 Constant 31.97 2.393 Mean -0.1743E-01 0.5686E-02 Sigma 0.8557E-01 0.5987E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 620 0.9194E-01

0.2084 0.000 1.000 619.0 52.59 / 16 Constant 49.87 3.638 Mean 0.1039 0.3931E-02 Sigma 0.7163E-01 0.4857E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 620 0.6718E-01 0.1639 0.000 3.000 617.0 5.145 / 3 Constant 81.51 6.861 Mean 0.1321E-01 0.2039E-02 Sigma 0.2924E-01 0.2311E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 733 -0.2802E-01

0.2535 11.00 4.000 718.0 60.43 / 15 Constant 47.61 4.129 Mean -0.2045E-01 0.5248E-02 Sigma 0.8002E-01 0.8337E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 733 -0.9508E-02 0.2774 37.00 45.00 651.0 16.74 / 13 Constant 37.79 2.613 Mean -0.7411E-02 0.5587E-02 Sigma 0.9111E-01 0.6479E-02

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 733 0.2931E-01

0.2123 2.000 6.000 725.0 52.53 / 11 Constant 72.88 5.316 Mean 0.2035E-01 0.2461E-02 Sigma 0.5127E-01 0.3048E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 733 -0.1589E-02 0.1687 1.000 2.000 730.0 101.4 / 10 Constant 72.33 6.068 Mean 0.8098E-02 0.2548E-02 Sigma 0.5234E-01 0.4019E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 676 0.1061 0.2576 6.000 6.000 664.0 54.16 / 15 Constant 38.34 2.855 Mean 0.1115 0.6048E-02 Sigma 0.9359E-01 0.7712E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 676 -0.9106E-02 0.2886 33.00 39.00 604.0 8.434 / 13 Constant 33.82 2.389 Mean -0.1625E-01 0.6612E-02 Sigma 0.9529E-01 0.7310E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 676 0.8228E-01

0.2223 5.000 3.000 668.0 37.96 / 11 Constant 50.35 3.467 Mean 0.8017E-01 0.5289E-02 Sigma 0.7156E-01 0.5477E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 676 0.6077E-01 0.1599 0.000 2.000 674.0 82.11 / 10 Constant 59.71 5.044 Mean 0.3923E-01 0.3437E-02 Sigma 0.6218E-01 0.5635E-02

cm counts