Residuals on Straw Tubes (LOST)

0

25

50

75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 983 -0.4681E-02 0.3758E-01

61.00 6.000 916.0 27.50 / 19 Constant 75.70 3.539 Mean 0.7927E-03 0.6256E-03 Sigma 0.1702E-01 0.5618E-03

cm counts

0

25

50

75

100

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 983 -0.5396E-02 0.3615E-01 65.00 4.000 914.0 28.37 / 19 Constant 76.98 3.643 Mean 0.8077E-03 0.6108E-03 Sigma 0.1667E-01 0.5602E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 983 -0.2963E-02 0.2988E-01

35.00 1.000 947.0 24.64 / 19 Constant 86.19 3.798 Mean 0.4805E-03 0.5575E-03 Sigma 0.1582E-01 0.4589E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 983 -0.3517E-02 0.2765E-01 43.00 1.000 939.0 29.03 / 19 Constant 85.39 3.789 Mean 0.3558E-03 0.5602E-03 Sigma 0.1588E-01 0.4676E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 983 -0.4113E-02 0.5020E-01

115.0 18.00 850.0 14.82 / 19 Constant 43.86 2.406 Mean -0.1732E-02 0.1175E-02 Sigma 0.2438E-01 0.1315E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 570 -0.1642E-03 0.5229E-01 88.00 7.000 475.0 22.99 / 19 Constant 19.56 1.403 Mean 0.7732E-02 0.3267E-02 Sigma 0.3481E-01 0.4050E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 983 -0.3092E-03 0.4098E-01

68.00 16.00 899.0 26.51 / 19 Constant 53.71 2.722 Mean 0.9927E-03 0.9856E-03 Sigma 0.2268E-01 0.1041E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 509 -0.1478E-03 0.4542E-01 39.00 10.00 460.0 13.55 / 19 Constant 23.58 1.664 Mean 0.1315E-02 0.1851E-02 Sigma 0.2721E-01 0.2117E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 983 -0.1106E-03 0.4730E-01

102.0 13.00 868.0 17.55 / 19 Constant 45.07 2.417 Mean 0.1983E-03 0.1240E-02 Sigma 0.2560E-01 0.1445E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 614 -0.1718E-02 0.5391E-01 74.00 15.00 525.0 53.91 / 19 Constant 23.64 1.713 Mean -0.4207E-02 0.1852E-02 Sigma 0.2513E-01 0.1886E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 983 -0.1158E-02 0.4545E-01

66.00 10.00 907.0 16.26 / 19 Constant 50.85 2.650 Mean 0.1374E-02 0.1058E-02 Sigma 0.2377E-01 0.1205E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 983 0.2444E-02 0.4916E-01 34.00 715.0 234.0 25.83 / 19 Constant 10.71 1.185 Mean 0.9470E-03 0.2894E-02 Sigma 0.2746E-01 0.3705E-02

cm counts

Z Residuals on Straw Tubes

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 983 -0.1780 1.679 4.000 0.000 979.0 25.22 / 32 Constant 51.74 2.124 Mean -0.4540E-01 0.5041E-01 Sigma 1.434 0.3892E-01

cm counts

0

20

40

60

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 983 0.8553E-01 1.380 2.000 0.000 981.0 35.98 / 32 Constant 55.62 2.232 Mean 0.6720E-01 0.4618E-01 Sigma 1.359 0.3430E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 417 -0.2680E-01 0.3249 20.00 9.000 388.0 24.34 / 17 Constant 30.56 2.417 Mean -0.3178E-01 0.5827E-02 Sigma 0.9112E-01 0.5050E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 417 1.210 1.689 2.000 2.000 413.0 10.11 / 16 Constant 38.46 2.669 Mean 1.148 0.5245E-01 Sigma 0.9501 0.4734E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 417 0.2795E-01 0.3301 11.00 16.00 390.0 11.83 / 11 Constant 32.35 2.562 Mean 0.2787E-01 0.7286E-02 Sigma 0.8282E-01 0.5815E-02

cm counts

0

50

100

150

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 417 -0.9442E-02 0.1191 0.000 0.000 417.0 26.00 / 5 Constant 133.9 11.43 Mean -0.4270E-02 0.1327E-02 Sigma 0.2332E-01 0.1499E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 419 -0.4572E-01 0.2762 28.00 11.00 380.0 33.35 / 17 Constant 21.79 1.704 Mean -0.3299E-01 0.1033E-01 Sigma 0.1276 0.8601E-02

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 419 1.576 1.552 1.000 2.000 416.0 11.62 / 16 Constant 33.90 2.345 Mean 1.471 0.6547E-01 Sigma 1.096 0.6099E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 419 -0.4006E-01 0.2781 26.00 12.00 381.0 28.43 / 11 Constant 19.51 1.889 Mean -0.3674E-01 0.3182E-01 Sigma 0.1892 0.6814E-01

cm counts

0 25 50 75 100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 419 0.1483E-01 0.1395 0.000 0.000 419.0 9.444 / 5 Constant 104.6 7.858 Mean 0.8415E-02 0.1800E-02 Sigma 0.3285E-01 0.1765E-02

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 442 0.2676E-01 0.2961 18.00 26.00 398.0 25.37 / 17 Constant 25.99 1.885 Mean 0.9109E-02 0.8161E-02 Sigma 0.1228 0.7065E-02

cm counts

0 10 20 30 40 50

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 442 0.8207 1.857 2.000 3.000 437.0 17.12 / 16 Constant 40.14 2.828 Mean 0.8455 0.5136E-01 Sigma 0.9378 0.4933E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 442 -0.2487E-01 0.2963 24.00 20.00 398.0 15.66 / 11 Constant 25.12 1.939 Mean 0.1887E-01 0.2007E-01 Sigma 0.1567 0.2527E-01

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 442 0.2263E-03 0.1250E-01 0.000 0.000 442.0 -9999. / -1 Constant 358.8 269.7 Mean 0.2335E-03 0.7115E-03 Sigma 0.1270E-01 0.9854E-02

cm counts

Residuals on Drift Chambers

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 466 -0.3460E-01 0.2410 16.00 19.00 431.0 23.45 / 17 Constant 34.94 2.424 Mean -0.4209E-01 0.5878E-02 Sigma 0.1028 0.5227E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 466 1.646 1.479 0.000 3.000 463.0 19.85 / 16 Constant 43.29 2.890 Mean 1.665 0.5431E-01 Sigma 0.9695 0.5182E-01

cm counts

0 10 20 30 40

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 466 -0.3959E-01 0.2402 21.00 14.00 431.0 15.74 / 11 Constant 34.90 2.533 Mean -0.5518E-01 0.9000E-02 Sigma 0.1079 0.9225E-02

cm counts

0

100

200

300

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 466 -0.2682E-02 0.1221E-01 0.000 0.000 466.0 -9999. / -1 Constant 387.6 260.3 Mean -0.2677E-02 0.3729E-02 Sigma 0.1239E-01 0.8559E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 796 -0.6151E-01

0.2673 5.000 4.000 787.0 28.88 / 14 Constant 54.41 3.426 Mean -0.6409E-01 0.3763E-02 Sigma 0.7670E-01 0.4065E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 796 0.3538E-01 0.3171 44.00 46.00 706.0 19.49 / 13 Constant 36.94 2.749 Mean 0.4984E-02 0.6044E-02 Sigma 0.9578E-01 0.8429E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 796 -0.6006E-01

0.2458 5.000 4.000 787.0 60.59 / 16 Constant 53.99 4.504 Mean -0.5659E-01 0.5493E-02 Sigma 0.8109E-01 0.8487E-02

cm counts

0

100

200

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 796 0.6658E-02 0.1193 0.000 0.000 796.0 77.62 / 3 Constant 145.9 9.590 Mean 0.2929E-02 0.1674E-02 Sigma 0.2879E-01 0.1758E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 774 -0.7071E-01

0.2549 10.00 5.000 759.0 25.73 / 14 Constant 53.74 3.602 Mean -0.1022 0.3834E-02 Sigma 0.7582E-01 0.4615E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 774 0.2380E-02 0.3061 43.00 46.00 685.0 15.32 / 13 Constant 37.50 2.797 Mean -0.2203E-01 0.5627E-02 Sigma 0.8866E-01 0.7150E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 774 0.6285E-01

0.2379 5.000 8.000 761.0 55.39 / 16 Constant 55.25 4.203 Mean 0.8951E-01 0.3671E-02 Sigma 0.7420E-01 0.5428E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 774 -0.9587E-02 0.1275 0.000 0.000 774.0 7.290 / 3 Constant 117.7 7.270 Mean -0.1756E-02 0.2086E-02 Sigma 0.3534E-01 0.2287E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 843 0.5658E-01

0.2825 9.000 10.00 824.0 31.36 / 15 Constant 50.81 3.117 Mean 0.4869E-01 0.4112E-02 Sigma 0.8450E-01 0.4445E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 843 0.3072E-01 0.3162 44.00 50.00 749.0 11.81 / 13 Constant 38.41 2.707 Mean -0.3237E-02 0.5832E-02 Sigma 0.9456E-01 0.7488E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 843 -0.5110E-01

0.2528 5.000 3.000 835.0 42.20 / 11 Constant 61.19 4.915 Mean -0.2942E-01 0.3671E-02 Sigma 0.6434E-01 0.5698E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 843 0.9164E-02 0.1677 6.000 0.000 837.0 54.47 / 10 Constant 90.46 5.986 Mean 0.8857E-02 0.2273E-02 Sigma 0.5190E-01 0.2933E-02

cm counts

Residuals on ISIM

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 832 0.6627E-01

0.2783 11.00 11.00 810.0 25.41 / 15 Constant 51.18 3.244 Mean 0.7889E-01 0.3996E-02 Sigma 0.8190E-01 0.4482E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 832 0.4525E-02 0.3133 48.00 57.00 727.0 16.10 / 13 Constant 38.22 2.802 Mean -0.2070E-01 0.5642E-02 Sigma 0.8979E-01 0.7183E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 832 0.5363E-01

0.2491 3.000 9.000 820.0 29.91 / 11 Constant 62.49 4.233 Mean 0.6173E-01 0.3770E-02 Sigma 0.6812E-01 0.4783E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 832 -0.1202E-01 0.1564 3.000 6.000 823.0 52.27 / 10 Constant 77.29 4.918 Mean -0.1301E-01 0.2859E-02 Sigma 0.5840E-01 0.3281E-02

cm counts