Residuals on Straw Tubes (LOST)

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 89 -0.1246E-01 0.2469E-01

6.000 0.000 83.00 15.98 / 17 Constant 7.290 1.573 Mean -0.9172E-02 0.1951E-02 Sigma 0.1382E-01 0.2442E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 89 -0.1260E-01 0.2462E-01 6.000 0.000 83.00 20.12 / 18 Constant 6.572 1.625 Mean -0.8259E-02 0.1853E-02 Sigma 0.1312E-01 0.2845E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 89 -0.5218E-02 0.2702E-01

1.000 1.000 87.00 10.27 / 17 Constant 7.158 1.147 Mean -0.6565E-02 0.2229E-02 Sigma 0.1741E-01 0.2334E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 89 -0.7442E-02 0.1606E-01 3.000 0.000 86.00 10.86 / 16 Constant 7.740 1.364 Mean -0.7010E-02 0.2072E-02 Sigma 0.1606E-01 0.2571E-02

cm counts

Residuals on Straw Tubes (RIST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 89 -0.8976E-02 0.4030E-01

6.000 1.000 82.00 13.66 / 19 Constant 2.787 0.5480 Mean 0.7732E-03 0.8792E-02 Sigma 0.3492E-01 0.1420E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 43 -0.8900E-02 0.4653E-01 3.000 0.000 40.00 6.328 / 17 Constant 1.328 0.3484 Mean -0.1776E-01 0.5225E-01 Sigma 0.8014E-01 0.1004

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 89 -0.9324E-02 0.5090E-01

17.00 1.000 71.00 7.308 / 18 Constant 3.309 0.7078 Mean -0.1117E-01 0.5257E-02 Sigma 0.2481E-01 0.6825E-02

cm counts

0

2

4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 65 -0.1058E-01 0.4905E-01 17.00 0.000 48.00 8.451 / 14 Constant 3.229 7.598 Mean -0.3112 0.5502 Sigma 0.2363 0.2305

cm counts

Residuals on Straw Tubes (LEST)

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 89 -0.3446E-02 0.4265E-01

6.000 0.000 83.00 19.04 / 18 Constant 2.791 0.5689 Mean -0.6300E-02 0.9902E-02 Sigma 0.3505E-01 0.1715E-01

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 42 -0.5122E-02 0.5105E-01 1.000 0.000 41.00 4.855 / 15 Constant 1.530 0.4213 Mean 0.6703E-02 0.2886E-01 Sigma 0.5676E-01 0.6888E-01

cm counts

0 1 2 3 4

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 89 -0.2211E-01 0.4992E-01

18.00 0.000 71.00 8.511 / 15 Constant 7.351 17.43 Mean -0.5606 0.4689 Sigma 0.3433 0.2018

cm counts

0

1

2

3

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 89 -0.3000E-01 0.5610E-01 1.000 73.00 15.00 1.167 / 4 Constant 1.280 0.7203 Mean 0.6512E-02 0.3398E-01 Sigma 0.4475E-01 0.7391E-01

cm counts

Z Residuals on Straw Tubes

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 89 -0.1404 1.399 0.000 0.000 89.00 19.03 / 25 Constant 3.657 0.6126 Mean 0.2116E-01 0.2837 Sigma 1.743 0.3364

cm counts

0 2.5 5 7.5 10

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 89 -0.6820 1.576 0.000 0.000 89.00 20.24 / 22 Constant 3.745 0.6814 Mean 0.4242 0.6214 Sigma 1.806 0.6803

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 39 -0.6653E-01 0.3791 3.000 5.000 31.00 2.395 / 9 Constant 1.543 0.5189 Mean -0.3366E-01 0.1887 Sigma 0.2059 0.3328

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 39 1.361 2.806 0.000 3.000 36.00 7.241 / 11 Constant 1.898 0.6931 Mean 1.174 0.7373 Sigma 1.951 1.472

cm counts

0 2.5 5 7.5 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 39 0.2468E-01 0.1661 0.000 0.000 39.00 1.653 / 4 Constant 6.512 1.465 Mean 0.1345E-01 0.1733E-01 Sigma 0.6402E-01 0.1351E-01

cm counts

0 1 2 3 4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 39 0.6573E-01 0.3710 3.000 5.000 31.00 1.169 / 4 Constant 2325. 8134. Mean 2.792 0.4047 Sigma 0.7296 0.2107

cm counts

Residuals on Drift Chambers

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 30 0.1797 0.3420 1.000 0.000 29.00 4.217 / 4 Constant 60.85 235.4 Mean 2.185 0.7791 Sigma 0.8134 0.4115

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 30 1.458 2.068 0.000 0.000 30.00 3.074 / 7 Constant 3.197 1.054 Mean 1.029 0.2942 Sigma 0.9410 0.4130

cm counts

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 30 0.2167E-01 0.9968E-01 0.000 0.000 30.00 7.281 / 6 Constant 4.155 1.384 Mean 0.7447E-02 0.1638E-01 Sigma 0.6181E-01 0.1945E-01

cm counts

0

2

4

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 30 0.1754 0.3351 1.000 0.000 29.00 2.039 / 2 Constant 2.287 1.550 Mean 0.1157E-01 0.3478E-01 Sigma 0.7860E-01 0.7559E-01

cm counts

Residuals on Drift Chambers

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36 -0.1442 0.3140 2.000 4.000 30.00 5.439 / 9 Constant 1.815 0.6572 Mean -0.9395E-01 0.6549E-01 Sigma 0.1621 0.1148

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36 1.454 2.061 1.000 0.000 35.00 4.486 / 9 Constant 3.555 1.192 Mean 1.409 0.2592 Sigma 0.9499 0.4097

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36 -0.3472E-02 0.1201E-01 0.000 0.000 36.00 -9999. / -1 Constant 30.40 70.11 Mean -0.3392E-02 0.1612E-01 Sigma 0.1219E-01 0.2884E-01

cm counts

0

2

4

6

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36 0.1442 0.3140 3.000 3.000 30.00 2.890 / 3 Constant 5.924 3.583 Mean -0.9270E-02 0.1586E-01 Sigma 0.1534E-01 0.5060E-02

cm counts

Residuals on Drift Chambers

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 33 0.7083E-01 0.5171 1.000 2.000 30.00 1.979 / 9 Constant 1.481 0.5567 Mean -0.7044E-01 0.1957 Sigma 0.2850 0.3016

cm counts

0

2

4

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 33 1.231 2.414 0.000 0.000 33.00 5.200 / 11 Constant 1.691 0.6352 Mean 1.046 0.6381 Sigma 1.654 1.162

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 33 -0.1894E-02 0.1236E-01 0.000 0.000 33.00 -9999. / -1 Constant 27.12 71.26 Mean -0.1922E-02 0.1060E-01 Sigma 0.1254E-01 0.3397E-01

cm counts

0

1

2

3

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 33 0.1417 0.5023 1.000 2.000 30.00 1.001 / 2 Constant 25.07 81.12 Mean -0.9403 0.8986 Sigma 0.3881 0.2951

cm counts

Residuals on OSIM

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 62 0.6800E-01

0.2133 0.000 2.000 60.00 10.89 / 8 Constant 7.266 1.865 Mean -0.3160E-02 0.7996E-02 Sigma 0.4208E-01 0.1048E-01

cm counts

0 1 2 3 4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 62 -0.1458E-01 0.2209 4.000 10.00 48.00 3.792 / 11 Constant 3.091 0.7492 Mean 0.5371E-02 0.2440E-01 Sigma 0.9266E-01 0.3325E-01

cm counts

0 5 10 15 20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 62 0.5581E-01

0.1433 0.000 0.000 62.00 7.770 / 7 Constant 24.45 4.744 Mean 0.2751E-02 0.2376E-02 Sigma 0.1541E-01 0.2036E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 62 0.4900E-01 0.1611 0.000 2.000 60.00 2.040 / 3 Constant 8.972 2.053 Mean 0.8873E-02 0.9884E-02 Sigma 0.3863E-01 0.1316E-01

cm counts

Residuals on OSIM

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 51 -0.1767 0.2408 3.000 0.000 48.00 11.74 / 9 Constant 4.582 1.360 Mean -0.1619 0.9521E-02 Sigma 0.3990E-01 0.1152E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 51 -0.9615E-01 0.2486 1.000 11.00 39.00 7.287 / 10 Constant 1.872 0.4950 Mean -0.5095E-01 0.1098 Sigma 0.1823 0.1620

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 51 0.1549E-01

0.1568 0.000 0.000 51.00 18.99 / 12 Constant 2.667 0.8836 Mean 0.3327E-01 0.2700E-01 Sigma 0.9411E-01 0.4803E-01

cm counts

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 51 0.1512 0.2539 0.000 2.000 49.00 0.000 / 0 Constant 4.679 27.49 Mean 0.5915 1.149 Sigma 0.3816 1.155

cm counts

Residuals on ISIM

0 2.5 5 7.5 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 65 -0.8869E-01

0.2378 4.000 0.000 61.00 7.506 / 11 Constant 9.698 2.337 Mean -0.2146E-01 0.5239E-02 Sigma 0.3100E-01 0.5948E-02

cm counts

0

2

4

6

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 65 -0.5077E-01 0.2438 2.000 11.00 52.00 8.164 / 10 Constant 2.506 0.6395 Mean 0.8332E-02 0.8064E-01 Sigma 0.1338 0.1412

cm counts

0

5

10

15

20

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 65 0.1051 0.2522 0.000 0.000 65.00 9.160 / 8 Constant 11.01 2.792 Mean 0.4137E-02 0.5229E-02 Sigma 0.3264E-01 0.6880E-02

cm counts

0

5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 65 0.7127E-01 0.1554 0.000 2.000 63.00 11.73 / 9 Constant 10.52 3.175 Mean 0.1960E-01 0.4988E-02 Sigma 0.2901E-01 0.7412E-02

cm counts

Residuals on ISIM

0 2 4 6 8 10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 64 0.1265 0.2639 0.000 2.000 62.00 11.87 / 12 Constant 5.920 1.822 Mean 0.1221 0.9708E-02 Sigma 0.4854E-01 0.1714E-01

cm counts

0

2

4

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 64 -0.4127E-01 0.3063 1.000 8.000 55.00 7.636 / 11 Constant 2.641 0.7858 Mean -0.3233E-01 0.5800E-01 Sigma 0.1208 0.1050

cm counts

0

5

10

15

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 64 0.3781E-01

0.1645 0.000 0.000 64.00 21.53 / 9 Constant 3.337 1.634 Mean 0.3203E-01 0.3048E-01 Sigma 0.8707E-01 0.4286E-01

cm counts

0

2.5

5

7.5

10

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 64 0.1500 0.2312 0.000 1.000 63.00 2.702 / 6 Constant 0.2453E+06 0.4303E+06 Mean 1.949 0.5742E-01 Sigma 0.4035 0.4244E-01

cm counts