Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 563 -0.1977E-02 0.3556E-01

32.00 10.00 521.0 39.59 / 19 Constant 36.75 2.433 Mean 0.1337E-02 0.1026E-02 Sigma 0.1920E-01 0.1011E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 563 -0.2250E-02 0.3012E-01 47.00 4.000 512.0 31.31 / 19 Constant 37.04 2.394 Mean 0.1553E-02 0.1008E-02 Sigma 0.1925E-01 0.9691E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 563 -0.9375E-02 0.3172E-01

23.00 2.000 538.0 29.69 / 19 Constant 43.94 2.673 Mean -0.7166E-02 0.8683E-03 Sigma 0.1691E-01 0.7379E-03

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 563 -0.1004E-01 0.2891E-01 30.00 1.000 532.0 23.63 / 19 Constant 44.34 2.676 Mean -0.6387E-02 0.8708E-03 Sigma 0.1708E-01 0.7402E-03

cm counts

Residuals on Straw Tubes (RIST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 563 0.2382E-04 0.5973E-01

46.00 13.00 504.0 29.40 / 19 Constant 25.87 1.979 Mean 0.3849E-02 0.1274E-02 Sigma 0.2056E-01 0.1328E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 306 0.3647E-02 0.6221E-01 46.00 5.000 255.0 11.54 / 18 Constant 9.712 1.154 Mean 0.1440E-02 0.4257E-02 Sigma 0.3318E-01 0.7540E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 563 -0.1391E-01 0.5677E-01

45.00 8.000 510.0 28.62 / 19 Constant 21.99 1.701 Mean -0.1325E-02 0.1840E-02 Sigma 0.2621E-01 0.2260E-02

cm counts

0

5

10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 189 -0.1534E-01 0.6040E-01 24.00 4.000 161.0 28.01 / 19 Constant 15.30 26.06 Mean -0.6244 0.2490 Sigma 0.3545 0.8409E-01

cm counts

Residuals on Straw Tubes (LEST)

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 563 0.1219E-02 0.5313E-01

54.00 12.00 497.0 24.25 / 19 Constant 27.39 2.015 Mean 0.4592E-02 0.1259E-02 Sigma 0.2076E-01 0.1297E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 302 -0.3719E-02 0.5426E-01 44.00 2.000 256.0 14.38 / 19 Constant 10.72 1.136 Mean -0.3887E-02 0.3146E-02 Sigma 0.2947E-01 0.4105E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 563 -0.1367E-01 0.5034E-01

46.00 5.000 512.0 33.72 / 19 Constant 27.97 2.036 Mean -0.6025E-02 0.1283E-02 Sigma 0.2057E-01 0.1277E-02

cm counts

0

5

10

15

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 563 -0.8688E-02 0.5024E-01 28.00 224.0 311.0 18.04 / 19 Constant 13.34 1.255 Mean 0.2267E-02 0.2502E-02 Sigma 0.2738E-01 0.2914E-02

cm counts

Z Residuals on Straw Tubes

0

10

20

30

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 563 -0.1686 1.418 0.000 0.000 563.0 22.83 / 31 Constant 31.52 1.717 Mean -0.1082 0.6242E-01 Sigma 1.373 0.5026E-01

cm counts

0

10

20

30

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 563 -0.6412E-01 1.416 0.000 0.000 563.0 14.21 / 28 Constant 29.55 1.635 Mean -0.8987E-03 0.7467E-01 Sigma 1.536 0.6910E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 218 0.4773E-01 0.3388 17.00 30.00 171.0 11.66 / 16 Constant 13.01 1.524 Mean 0.2797E-01 0.9726E-02 Sigma 0.9962E-01 0.8818E-02

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 218 0.9017 1.495 1.000 2.000 215.0 30.89 / 15 Constant 23.65 3.244 Mean 0.7502 0.5985E-01 Sigma 0.7324 0.8629E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 218 -0.8269E-01 0.4144 6.000 4.000 208.0 13.42 / 11 Constant 23.83 2.877 Mean -0.1250E-01 0.5108E-02 Sigma 0.5262E-01 0.4351E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 218 0.8152E-01 0.4007 12.00 22.00 184.0 2.896 / 5 Constant 16.68 2.529 Mean 0.7348E-01 0.8050E-01 Sigma 0.1227 0.7365E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 206 -0.6802E-01 0.3348 11.00 14.00 181.0 21.98 / 17 Constant 9.033 1.137 Mean -0.8735E-01 0.3187E-01 Sigma 0.1433 0.2638E-01

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 206 1.660 1.579 0.000 0.000 206.0 10.36 / 16 Constant 17.66 1.750 Mean 1.396 0.8293E-01 Sigma 1.002 0.7383E-01

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 206 -0.1373E-01 0.3675 1.000 1.000 204.0 14.82 / 11 Constant 18.54 2.168 Mean -0.5491E-01 0.7208E-02 Sigma 0.7230E-01 0.6656E-02

cm counts

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 206 0.2355E-01 0.3763 8.000 8.000 190.0 3.652 / 5 Constant 14.75 2.793 Mean 0.6344E-01 0.4901E-01 Sigma 0.8480E-01 0.2898E-01

cm counts

Residuals on Drift Chambers

0 2 4 6 8

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 158 -0.5593E-01 0.4357 16.00 5.000 137.0 21.37 / 17 Constant 4.136 1.233 Mean -0.2518 0.4286 Sigma 0.4059 0.3515

cm counts

0

5

10

15

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 158 2.254 1.706 2.000 1.000 155.0 17.50 / 13 Constant 12.94 1.560 Mean 2.513 0.2084 Sigma 1.104 0.1846

cm counts

0 2 4 6 8 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 158 0.1037 0.4284 4.000 3.000 151.0 15.02 / 11 Constant 6.538 3.059 Mean 0.1757 0.4123 Sigma 0.2756 0.2782

cm counts

0 2 4 6 8 10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 158 -0.1036 0.4283 3.000 4.000 151.0 8.606 / 5 Constant 0.7776E+05 0.3370E+05 Mean -4.808 0.4915 Sigma 1.096 0.1098

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 237 -0.8221E-01 0.2783 16.00 13.00 208.0 26.96 / 16 Constant 12.45 1.372 Mean -0.9563E-01 0.1777E-01 Sigma 0.1158 0.1340E-01

cm counts

0

10

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 237 1.333 1.587 3.000 3.000 231.0 8.414 / 15 Constant 21.31 1.999 Mean 1.200 0.7577E-01 Sigma 0.9727 0.6994E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 237 -0.4468E-01 0.2890 9.000 12.00 216.0 23.96 / 11 Constant 18.23 1.865 Mean -0.8423E-01 0.1381E-01 Sigma 0.8951E-01 0.9978E-02

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 237 0.4456E-01 0.2883 12.00 9.000 216.0 14.16 / 5 Constant 20.70 2.794 Mean 0.3138E-01 0.1273E-01 Sigma 0.5302E-01 0.9552E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 429 -0.8579E-01

0.2298 8.000 3.000 418.0 63.76 / 14 Constant 42.24 5.683 Mean -0.1027 0.3077E-02 Sigma 0.4620E-01 0.5709E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 429 -0.1156E-01 0.2857 27.00 18.00 384.0 11.34 / 13 Constant 25.69 2.280 Mean 0.2667E-02 0.5589E-02 Sigma 0.7704E-01 0.5899E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 429 -0.3880E-01

0.1565 3.000 1.000 425.0 72.35 / 16 Constant 42.02 4.098 Mean -0.4052E-01 0.3665E-02 Sigma 0.5716E-01 0.4902E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 429 0.7768E-01 0.2221 1.000 1.000 427.0 8.212 / 3 Constant 0.1738E+08 0.1870E+08 Mean 2.065 0.3029E-01 Sigma 0.3913 0.1976E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 399 -0.5132E-01

0.2538 1.000 3.000 395.0 32.60 / 14 Constant 32.13 3.379 Mean -0.7000E-01 0.4110E-02 Sigma 0.6285E-01 0.5580E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 399 -0.7501E-01 0.3145 20.00 16.00 363.0 21.98 / 13 Constant 21.05 1.973 Mean -0.5938E-01 0.8652E-02 Sigma 0.8452E-01 0.8395E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 399 0.2719E-01

0.1459 0.000 1.000 398.0 70.93 / 16 Constant 50.54 9.222 Mean 0.2936E-01 0.2660E-02 Sigma 0.4327E-01 0.7755E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 399 -0.3823E-01 0.2136 2.000 1.000 396.0 5.096 / 3 Constant 78.59 51.55 Mean -0.1405 0.7619E-01 Sigma 0.8705E-01 0.2593E-01

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 443 0.9014E-01

0.2421 7.000 6.000 430.0 67.17 / 15 Constant 24.37 3.419 Mean 0.9323E-01 0.5852E-02 Sigma 0.8019E-01 0.1191E-01

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 443 -0.1561E-01 0.3037 27.00 20.00 396.0 18.79 / 13 Constant 24.01 2.197 Mean -0.1032E-01 0.6028E-02 Sigma 0.7990E-01 0.6599E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 443 -0.1409E-01

0.1562 3.000 0.000 440.0 67.81 / 11 Constant 33.27 3.190 Mean -0.2327E-01 0.6140E-02 Sigma 0.7791E-01 0.9114E-02

cm counts

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 443 0.7691E-01 0.2320 3.000 3.000 437.0 31.28 / 10 Constant 32.80 4.078 Mean 0.6375E-01 0.5970E-02 Sigma 0.6739E-01 0.1054E-01

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 429 0.4933E-01

0.2526 3.000 5.000 421.0 55.13 / 15 Constant 28.76 3.529 Mean 0.4986E-01 0.4711E-02 Sigma 0.7070E-01 0.8125E-02

cm counts

0

10

20

30

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 429 -0.5791E-01 0.3222 19.00 18.00 392.0 17.07 / 13 Constant 20.08 1.839 Mean -0.5337E-01 0.1115E-01 Sigma 0.9869E-01 0.1148E-01

cm counts

0 20 40 60 80 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 429 0.2352E-01

0.1616 0.000 3.000 426.0 60.26 / 11 Constant 49.84 5.715 Mean 0.1999E-01 0.2932E-02 Sigma 0.4748E-01 0.4800E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 429 -0.4261E-01 0.2154 2.000 2.000 425.0 28.19 / 10 Constant 42.41 5.089 Mean -0.3593E-01 0.3540E-02 Sigma 0.5051E-01 0.6333E-02

cm counts