Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 767 -0.1028E-01 0.2872E-01

51.00 2.000 714.0 24.13 / 19 Constant 54.58 2.761 Mean -0.8005E-02 0.8421E-03 Sigma 0.1899E-01 0.7104E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 767 -0.9938E-02 0.3036E-01 51.00 2.000 714.0 28.55 / 19 Constant 54.30 2.752 Mean -0.7625E-02 0.8321E-03 Sigma 0.1889E-01 0.6975E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 767 -0.6263E-02 0.2824E-01

20.00 1.000 746.0 14.39 / 19 Constant 64.29 3.221 Mean -0.2435E-02 0.7004E-03 Sigma 0.1746E-01 0.6276E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 767 -0.5473E-02 0.2762E-01 23.00 0.000 744.0 13.90 / 19 Constant 65.43 3.233 Mean -0.2570E-02 0.6838E-03 Sigma 0.1714E-01 0.5911E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 767 -0.9914E-02 0.4366E-01

62.00 6.000 699.0 22.08 / 19 Constant 41.62 2.349 Mean -0.6357E-02 0.1165E-02 Sigma 0.2175E-01 0.1065E-02

cm counts

0

10

20

30

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 476 -0.9057E-02 0.4244E-01 45.00 7.000 424.0 18.56 / 19 Constant 23.12 1.747 Mean -0.5334E-02 0.1681E-02 Sigma 0.2466E-01 0.1898E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 767 -0.4869E-02 0.4884E-01

86.00 16.00 665.0 18.64 / 19 Constant 35.63 2.243 Mean -0.9234E-04 0.1284E-02 Sigma 0.2400E-01 0.1511E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 390 0.1647E-02 0.5593E-01 86.00 9.000 295.0 20.41 / 19 Constant 14.90 1.443 Mean -0.1471E-02 0.2075E-02 Sigma 0.2377E-01 0.2255E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 767 -0.9811E-02 0.4678E-01

59.00 9.000 699.0 25.46 / 19 Constant 39.54 2.388 Mean -0.2736E-02 0.1059E-02 Sigma 0.2119E-01 0.1088E-02

cm counts

0

5

10

15

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 329 -0.1114E-01 0.5255E-01 40.00 4.000 285.0 16.70 / 19 Constant 12.82 1.294 Mean -0.1439E-02 0.2410E-02 Sigma 0.2629E-01 0.2969E-02

cm counts

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 767 -0.4562E-02 0.4782E-01

76.00 18.00 673.0 10.35 / 19 Constant 39.76 2.351 Mean -0.1356E-02 0.1049E-02 Sigma 0.2113E-01 0.1030E-02

cm counts

0 2.5 5 7.5 10

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 767 -0.4951E-02 0.5967E-01 20.00 583.0 164.0 19.48 / 19 Constant 4.902 0.7239 Mean 0.2064E-03 0.9288E-02 Sigma 0.4130E-01 0.1717E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 767 0.1279E-01 1.511 1.000 0.000 766.0 56.91 / 31 Constant 39.92 1.892 Mean 0.5798E-01 0.5721E-01 Sigma 1.423 0.4591E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 767 -0.3311 1.513 1.000 0.000 766.0 31.42 / 33 Constant 40.65 1.862 Mean -0.3001 0.5712E-01 Sigma 1.430 0.4211E-01

cm counts

Residuals on Drift Chambers

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 218 -0.3661E-01 0.3822 33.00 17.00 168.0 19.24 / 16 Constant 11.65 9.513 Mean -0.4689 0.4339 Sigma 0.3370 0.1634

cm counts

0 5 10 15 20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 218 1.525 1.809 0.000 48.00 170.0 19.17 / 16 Constant 13.01 1.518 Mean 1.392 0.9530E-01 Sigma 1.002 0.8804E-01

cm counts

0

5

10

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 218 0.5953E-01 0.4578 11.00 22.00 185.0 39.26 / 10 Constant 8.570 2.063 Mean -0.3772E-01 0.1030E-01 Sigma 0.5715E-01 0.1268E-01

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 218 0.6690E-01 0.4529 2.000 6.000 210.0 21.51 / 5 Constant 8437. 0.1272E+05 Mean 2.589 0.1741 Sigma 0.6913 0.8981E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 269 0.6085E-01 0.2947 14.00 13.00 242.0 20.86 / 16 Constant 12.82 1.285 Mean 0.7843E-01 0.2087E-01 Sigma 0.1489 0.1927E-01

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 269 1.152 1.608 0.000 2.000 267.0 33.77 / 16 Constant 29.82 2.944 Mean 1.089 0.5394E-01 Sigma 0.6834 0.4800E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 269 0.5560E-01 0.3115 11.00 8.000 250.0 10.92 / 11 Constant 16.36 1.704 Mean 0.3949E-01 0.1714E-01 Sigma 0.9931E-01 0.1299E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 269 0.1782E-01 0.3373 0.000 1.000 268.0 5.477 / 5 Constant 24.88 2.704 Mean 0.2271E-01 0.1177E-01 Sigma 0.6822E-01 0.1119E-01

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 288 -0.1083 0.3335 29.00 31.00 228.0 46.50 / 16 Constant 11.71 9.055 Mean -0.4752 0.4965 Sigma 0.3844 0.1975

cm counts

0

10

20

30

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 288 0.7177 1.966 7.000 6.000 275.0 11.78 / 16 Constant 20.64 1.853 Mean 0.7238 0.9498E-01 Sigma 1.185 0.9870E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 288 0.6080E-01 0.3978 18.00 20.00 250.0 28.98 / 10 Constant 12.65 1.470 Mean 0.4397E-01 0.2665E-01 Sigma 0.1018 0.1852E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 288 0.6080E-01 0.3978 18.00 20.00 250.0 16.07 / 5 Constant 14.47 2.437 Mean -0.1163E-01 0.1252E-01 Sigma 0.7381E-01 0.2136E-01

cm counts

Residuals on Drift Chambers

0

5

10

15

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 243 0.8595E-01 0.4646 15.00 18.00 210.0 11.70 / 17 Constant 13.20 1.428 Mean 0.3486E-01 0.9718E-02 Sigma 0.1046 0.7982E-02

cm counts

0

5

10

15

20

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 243 1.178 1.910 1.000 3.000 239.0 16.53 / 16 Constant 13.48 1.336 Mean 1.025 0.1570 Sigma 1.556 0.1887

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 243 0.4871E-01 0.4483 6.000 5.000 232.0 6.352 / 11 Constant 18.34 2.081 Mean 0.2987E-01 0.8807E-02 Sigma 0.8192E-01 0.8741E-02

cm counts

0

5

10

15

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 243 0.4892E-01 0.4487 6.000 5.000 232.0 3.078 / 5 Constant 18.84 2.212 Mean 0.3329E-01 0.2057E-01 Sigma 0.7904E-01 0.1921E-01

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 577 0.8743E-02

0.2446 1.000 3.000 573.0 35.00 / 14 Constant 50.70 4.333 Mean 0.4134E-02 0.3656E-02 Sigma 0.6196E-01 0.5253E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 577 -0.3296E-01 0.3260 29.00 34.00 514.0 24.82 / 13 Constant 28.84 2.616 Mean -0.1141E-01 0.5368E-02 Sigma 0.7764E-01 0.6656E-02

cm counts

0

25

50

75

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 577 0.1495E-01

0.1900 0.000 3.000 574.0 57.73 / 16 Constant 58.21 4.862 Mean 0.5986E-02 0.2827E-02 Sigma 0.5689E-01 0.3909E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 577 -0.3276E-02 0.1587 0.000 0.000 577.0 26.40 / 3 Constant 125.0 10.13 Mean 0.3923E-02 0.1373E-02 Sigma 0.2478E-01 0.1742E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 546 -0.1353 0.2372 2.000 2.000 542.0 43.84 / 14 Constant 41.46 4.338 Mean -0.1384 0.4619E-02 Sigma 0.7130E-01 0.8412E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 546 -0.4678E-02 0.3168 25.00 40.00 481.0 13.37 / 13 Constant 25.22 2.206 Mean -0.2591E-01 0.7323E-02 Sigma 0.9308E-01 0.9139E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 546 0.1076 0.2084 1.000 1.000 544.0 38.84 / 16 Constant 43.14 3.539 Mean 0.1151 0.4750E-02 Sigma 0.7587E-01 0.6536E-02

cm counts

0

25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 546 0.6901E-01 0.1396 0.000 0.000 546.0 12.44 / 3 Constant 74.33 7.082 Mean 0.1514E-01 0.2109E-02 Sigma 0.2725E-01 0.2493E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 620 -0.2954E-01

0.2628 3.000 2.000 615.0 41.55 / 15 Constant 43.77 3.981 Mean -0.2946E-01 0.6418E-02 Sigma 0.8176E-01 0.9655E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 620 -0.2720E-01 0.3191 39.00 38.00 543.0 19.94 / 13 Constant 29.92 2.575 Mean -0.1206E-01 0.5543E-02 Sigma 0.8120E-01 0.6724E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 620 0.2790E-01

0.2168 0.000 2.000 618.0 41.34 / 11 Constant 63.20 4.876 Mean 0.2066E-01 0.2669E-02 Sigma 0.5234E-01 0.3307E-02

cm counts

0

50

100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 620 0.2439E-02 0.1655 1.000 0.000 619.0 42.84 / 10 Constant 72.12 4.832 Mean 0.1307E-01 0.2533E-02 Sigma 0.5125E-01 0.2684E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 600 0.1092 0.2654 8.000 6.000 586.0 51.31 / 15 Constant 36.80 3.343 Mean 0.1234 0.5928E-02 Sigma 0.8846E-01 0.9398E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 600 -0.1157E-01 0.3068 30.00 48.00 522.0 20.49 / 13 Constant 30.08 2.648 Mean -0.1923E-01 0.5340E-02 Sigma 0.7868E-01 0.6596E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 600 0.9185E-01

0.2323 6.000 0.000 594.0 29.12 / 11 Constant 45.60 3.300 Mean 0.1242 0.2012E-01 Sigma 0.1004 0.1266E-01

cm counts

0 25 50 75 100

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 600 0.5459E-01 0.1725 0.000 3.000 597.0 86.30 / 10 Constant 76.35 8.046 Mean 0.4315E-01 0.2075E-02 Sigma 0.3865E-01 0.3734E-02

cm counts