Residuals on Straw Tubes (LOST)

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 802 -0.3667E-02 0.3305E-01

57.00 6.000 739.0 25.52 / 19 Constant 57.27 3.153 Mean 0.2496E-03 0.7650E-03 Sigma 0.1830E-01 0.7910E-03

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 802 -0.4049E-02 0.3313E-01 58.00 4.000 740.0 31.86 / 19 Constant 56.71 3.214 Mean 0.3183E-03 0.7821E-03 Sigma 0.1857E-01 0.8590E-03

cm counts

0

20

40

60

80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 802 -0.3354E-02 0.2759E-01

29.00 2.000 771.0 25.13 / 19 Constant 69.42 3.531 Mean -0.1156E-03 0.6408E-03 Sigma 0.1600E-01 0.5694E-03

cm counts

0 20 40 60 80

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 802 -0.3492E-02 0.2823E-01 27.00 3.000 772.0 21.80 / 19 Constant 69.31 3.505 Mean 0.5522E-03 0.6300E-03 Sigma 0.1613E-01 0.5706E-03

cm counts

Residuals on Straw Tubes (RIST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 802 -0.1920E-02 0.4387E-01

79.00 19.00 704.0 17.34 / 19 Constant 40.57 2.280 Mean -0.7129E-03 0.1151E-02 Sigma 0.2302E-01 0.1148E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 537 0.2066E-03 0.5117E-01 67.00 15.00 455.0 21.48 / 19 Constant 19.75 1.461 Mean -0.1764E-02 0.2618E-02 Sigma 0.3213E-01 0.3369E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 802 -0.2059E-02 0.3951E-01

48.00 6.000 748.0 21.01 / 19 Constant 46.88 2.541 Mean 0.2531E-02 0.1019E-02 Sigma 0.2199E-01 0.1039E-02

cm counts

0

10

20

30

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 402 -0.2097E-02 0.4556E-01 26.00 3.000 373.0 17.64 / 19 Constant 22.87 1.854 Mean -0.4550E-03 0.1388E-02 Sigma 0.2093E-01 0.1450E-02

cm counts

Residuals on Straw Tubes (LEST)

0

20

40

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 802 -0.4776E-02 0.4682E-01

86.00 7.000 709.0 13.21 / 19 Constant 38.42 2.230 Mean -0.6121E-03 0.1320E-02 Sigma 0.2540E-01 0.1533E-02

cm counts

0

10

20

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 457 -0.1120E-02 0.5327E-01 57.00 9.000 391.0 22.22 / 19 Constant 18.48 1.594 Mean 0.3730E-02 0.2071E-02 Sigma 0.2569E-01 0.2490E-02

cm counts

0

20

40

60

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 802 -0.4317E-02 0.4478E-01

50.00 8.000 744.0 21.04 / 19 Constant 44.22 2.412 Mean -0.2051E-04 0.1080E-02 Sigma 0.2258E-01 0.1079E-02

cm counts

0

2

4

6

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 802 0.6061E-03 0.4902E-01 15.00 721.0 66.00 9.672 / 17 Constant 2.657 0.5843 Mean 0.2234E-02 0.1337E-01 Sigma 0.3785E-01 0.2128E-01

cm counts

Z Residuals on Straw Tubes

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 802 -0.2213 1.641 1.000 0.000 801.0 41.93 / 32 Constant 42.52 1.907 Mean -0.1021 0.5380E-01 Sigma 1.392 0.3877E-01

cm counts

0

20

40

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 802 -0.5880E-01 1.447 1.000 0.000 801.0 37.77 / 31 Constant 43.22 1.965 Mean -0.7049E-01 0.5551E-01 Sigma 1.424 0.4390E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 336 -0.4902E-01 0.3211 37.00 19.00 280.0 19.62 / 17 Constant 21.33 1.938 Mean -0.2613E-01 0.7042E-02 Sigma 0.9218E-01 0.5572E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 336 1.529 1.695 3.000 3.000 330.0 12.34 / 16 Constant 30.71 2.554 Mean 1.291 0.5771E-01 Sigma 0.8791 0.5316E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 336 0.4293E-01 0.3229 18.00 37.00 281.0 17.97 / 11 Constant 22.29 2.096 Mean 0.2153E-01 0.9612E-02 Sigma 0.8641E-01 0.7542E-02

cm counts

0

25

50

75

100

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 336 -0.2775E-01 0.1783 0.000 0.000 336.0 28.59 / 5 Constant 103.6 9.938 Mean -0.2305E-02 0.1455E-02 Sigma 0.2103E-01 0.1442E-02

cm counts

Residuals on Drift Chambers

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 312 -0.3389E-01 0.2922 19.00 9.000 284.0 26.95 / 17 Constant 16.04 1.501 Mean -0.1695E-01 0.9682E-02 Sigma 0.1165 0.8170E-02

cm counts

0

10

20

30

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 312 1.652 1.652 1.000 0.000 311.0 13.33 / 15 Constant 27.69 2.182 Mean 1.562 0.7250E-01 Sigma 0.9895 0.5982E-01

cm counts

0

10

20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 312 -0.2069E-01 0.2879 19.00 9.000 284.0 11.82 / 11 Constant 15.96 1.689 Mean -0.3293E-01 0.1659E-01 Sigma 0.1373 0.2519E-01

cm counts

0 20 40 60 80

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 312 0.1563E-01 0.1206 0.000 0.000 312.0 14.70 / 5 Constant 66.25 6.396 Mean 0.5657E-02 0.2509E-02 Sigma 0.3798E-01 0.2966E-02

cm counts

Residuals on Drift Chambers

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 340 0.3323E-01 0.3265 17.00 36.00 287.0 32.29 / 16 Constant 15.35 1.340 Mean -0.6718E-02 0.1407E-01 Sigma 0.1498 0.1340E-01

cm counts

0 10 20 30 40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 340 0.8171 1.793 1.000 2.000 337.0 16.43 / 15 Constant 31.37 2.643 Mean 0.7253 0.5933E-01 Sigma 0.9354 0.6488E-01

cm counts

0 5 10 15 20

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 340 -0.3375E-01 0.3264 35.00 18.00 287.0 25.85 / 11 Constant 14.83 1.437 Mean 0.9931E-02 0.3824E-01 Sigma 0.1716 0.4640E-01

cm counts

0

50

100

150

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 340 -0.9559E-03 0.1246E-01 0.000 0.000 340.0 -9999. / -1 Constant 276.8 234.5 Mean -0.9825E-03 0.1845E-02 Sigma 0.1266E-01 0.1106E-01

cm counts

Residuals on Drift Chambers

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 395 -0.5363E-01 0.2695 33.00 21.00 341.0 11.48 / 17 Constant 26.00 1.995 Mean -0.4484E-01 0.7936E-02 Sigma 0.1108 0.6622E-02

cm counts

0

20

40

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 395 2.027 1.965 4.000 1.000 390.0 10.57 / 15 Constant 37.93 2.645 Mean 1.819 0.5654E-01 Sigma 0.8807 0.4448E-01

cm counts

0

10

20

30

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 395 -0.4842E-01 0.2705 33.00 21.00 341.0 9.409 / 11 Constant 25.85 2.184 Mean -0.4189E-01 0.9974E-02 Sigma 0.1124 0.1153E-01

cm counts

0

100

200

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 395 -0.2816E-02 0.1218E-01 0.000 0.000 395.0 -9999. / -1 Constant 329.3 238.4 Mean -0.2802E-02 0.4201E-02 Sigma 0.1236E-01 0.9199E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 624 -0.4967E-01

0.2705 9.000 10.00 605.0 26.19 / 14 Constant 43.34 3.070 Mean -0.6557E-01 0.3976E-02 Sigma 0.7260E-01 0.4101E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 624 0.1971E-01 0.3054 34.00 38.00 552.0 14.69 / 13 Constant 29.06 2.274 Mean -0.4455E-02 0.6996E-02 Sigma 0.9748E-01 0.8657E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 624 -0.4212E-01

0.2600 9.000 6.000 609.0 48.01 / 16 Constant 40.14 3.917 Mean -0.6247E-01 0.8135E-02 Sigma 0.8916E-01 0.1232E-01

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 624 -0.1061E-02 0.1184 0.000 2.000 622.0 48.85 / 3 Constant 115.5 8.612 Mean 0.3194E-02 0.1857E-02 Sigma 0.2806E-01 0.1900E-02

cm counts

Residuals on OSIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 616 -0.1094 0.2717 8.000 8.000 600.0 37.44 / 14 Constant 37.24 2.840 Mean -0.1032 0.5356E-02 Sigma 0.8661E-01 0.6729E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 616 -0.6310E-02 0.2882 36.00 38.00 542.0 18.32 / 13 Constant 30.78 2.332 Mean -0.3192E-01 0.7386E-02 Sigma 0.9614E-01 0.8452E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 616 0.9998E-01

0.2513 7.000 8.000 601.0 41.64 / 16 Constant 44.35 3.338 Mean 0.9064E-01 0.4035E-02 Sigma 0.7212E-01 0.4752E-02

cm counts

0

50

100

150

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 616 -0.1730E-01 0.1293 0.000 2.000 614.0 19.91 / 3 Constant 109.9 8.440 Mean 0.3072E-02 0.1692E-02 Sigma 0.2863E-01 0.2018E-02

cm counts

Residuals on ISIM

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 655 0.3279E-01

0.2820 13.00 11.00 631.0 34.94 / 15 Constant 38.47 2.770 Mean 0.4857E-01 0.4741E-02 Sigma 0.8440E-01 0.5346E-02

cm counts

0

10

20

30

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 655 0.1788E-01 0.3119 31.00 38.00 586.0 8.597 / 13 Constant 30.14 2.286 Mean -0.1090E-01 0.7170E-02 Sigma 0.1009 0.9063E-02

cm counts

0

20

40

60

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 655 -0.2450E-01

0.2521 10.00 5.000 640.0 34.74 / 11 Constant 43.18 3.486 Mean -0.3592E-01 0.6610E-02 Sigma 0.7756E-01 0.8252E-02

cm counts

0 20 40 60 80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 655 0.6389E-02 0.1783 4.000 3.000 648.0 20.05 / 10 Constant 70.41 4.620 Mean 0.1241E-01 0.2718E-02 Sigma 0.5581E-01 0.3022E-02

cm counts

Residuals on ISIM

0

20

40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 642 0.8167E-01

0.2945 7.000 11.00 624.0 23.55 / 15 Constant 35.74 2.625 Mean 0.9197E-01 0.5817E-02 Sigma 0.9224E-01 0.6822E-02

cm counts

0 10 20 30 40

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 642 0.7531E-02 0.3172 35.00 48.00 559.0 20.75 / 13 Constant 30.14 2.365 Mean -0.2906E-01 0.6881E-02 Sigma 0.9256E-01 0.8050E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 642 0.7568E-01

0.2574 4.000 8.000 630.0 28.62 / 11 Constant 40.81 3.060 Mean 0.6796E-01 0.6039E-02 Sigma 0.7793E-01 0.6777E-02

cm counts

0

20

40

60

80

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 642 -0.1560E-01 0.1787 2.000 1.000 639.0 20.27 / 10 Constant 59.55 3.797 Mean -0.2324E-01 0.3716E-02 Sigma 0.6256E-01 0.3630E-02

cm counts