Residuals on Straw Tubes (LOST)

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

111 116746 -0.3412E-02 0.3614E-01 0.1046E+05

1142. 0.1051E+06 556.8 / 19 Constant 8114. 35.51 Mean 0.3224E-03 0.6541E-04 Sigma 0.1875E-01 0.6210E-04

cm counts

0 2000

4000

6000

8000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

121 116746 -0.3582E-02 0.3483E-01 0.1164E+05 843.0 0.1043E+06 563.9 / 19 Constant 8129. 35.60 Mean 0.2595E-03 0.6509E-04 Sigma 0.1867E-01 0.6167E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

112 116746 -0.2745E-02 0.3181E-01

4405. 678.0 0.1117E+06 812.2 / 19 Constant 9198. 38.83 Mean 0.7480E-04 0.5868E-04 Sigma 0.1777E-01 0.5514E-04

cm counts

0 2500

5000

7500

10000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

122 116746 -0.2839E-02 0.3099E-01 5158. 375.0 0.1112E+06 836.7 / 19 Constant 9255. 39.07 Mean 0.9273E-04 0.5818E-04 Sigma 0.1765E-01 0.5457E-04

cm counts

Residuals on Straw Tubes (RIST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

211 116746 -0.2533E-02 0.5475E-01 0.1472E+05

2118. 0.9991E+05 91.65 / 19 Constant 4672. 24.19 Mean 0.8832E-03 0.1322E-03 Sigma 0.2743E-01 0.1629E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

221 70934 -0.3708E-02 0.5844E-01 0.1151E+05 1760.

0.5766E+05 27.35 / 19 Constant 2483. 17.30 Mean -0.2316E-03 0.2051E-03 Sigma 0.2999E-01 0.2724E-03

cm counts

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

212 116746 -0.4032E-02 0.5470E-01 0.1180E+05

2151. 0.1028E+06 203.2 / 19 Constant 5054. 25.62 Mean 0.7326E-03 0.1175E-03 Sigma 0.2586E-01 0.1397E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

222 62319 -0.5045E-02 0.5750E-01 0.1002E+05 1514.

0.5078E+05 54.61 / 19 Constant 2320. 16.99 Mean -0.2753E-04 0.1902E-03 Sigma 0.2774E-01 0.2364E-03

cm counts

Residuals on Straw Tubes (LEST)

0

2000

4000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

311 116746 -0.2924E-02 0.5482E-01 0.1418E+05

2005. 0.1006E+06 106.2 / 19 Constant 4701. 24.23 Mean 0.1467E-02 0.1324E-03 Sigma 0.2752E-01 0.1635E-03

cm counts

0

1000

2000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

321 64201 -0.3188E-02 0.5921E-01 0.1011E+05 1532.

0.5256E+05 52.20 / 19 Constant 2235. 16.47 Mean 0.1999E-02 0.2131E-03 Sigma 0.2960E-01 0.2795E-03

cm counts

0

2000

4000

6000

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

312 116746 -0.3798E-02 0.5483E-01 0.1228E+05

1837. 0.1026E+06 173.3 / 19 Constant 5064. 25.59 Mean 0.4651E-03 0.1163E-03 Sigma 0.2569E-01 0.1365E-03

cm counts

0

500

1000

1500

-0.2 0 0.2

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

322 116746 -0.3178E-02 0.5868E-01 4463.

0.7811E+05 0.3418E+05 28.05 / 19 Constant 1447. 13.22 Mean 0.1017E-02 0.2684E-03 Sigma 0.2995E-01 0.3563E-03

cm counts

Z Residuals on Straw Tubes

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

401 116746 -0.1528 1.671 359.0 15.00 0.1164E+06 543.8 / 33 Constant 6117. 22.79 Mean -0.7755E-01 0.4698E-02 Sigma 1.481 0.3669E-02

cm counts

0

2000

4000

6000

-5 0 5 10

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

402 116746 -0.2192 1.655 250.0 19.00 0.1165E+06 1024. / 33 Constant 6118. 22.61 Mean -0.1502 0.4771E-02 Sigma 1.478 0.3584E-02

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

511 32740 -0.3605E-01 0.4054 3157. 3150.

0.2643E+05 280.3 / 17 Constant 1254. 13.40 Mean -0.2088E-01 0.1468E-02 Sigma 0.1442 0.1629E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

611 32740 0.9829 2.112 262.0 1387.

0.3109E+05 340.8 / 16 Constant 2546. 21.60 Mean 0.9965 0.7087E-02 Sigma 1.059 0.7271E-02

cm counts

0

500

1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

711 32740 0.2778E-01 0.3973 2217. 2203.

0.2832E+05 222.2 / 11 Constant 1764. 19.63 Mean 0.4794E-02 0.1021E-02 Sigma 0.9630E-01 0.1124E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

811 32740 0.1920E-01 0.3372 877.0 941.0 0.3092E+05 974.0 / 5 Constant 3438. 42.61 Mean -0.5512E-02 0.4142E-03 Sigma 0.4607E-01 0.5194E-03

cm counts

Residuals on Drift Chambers

0

500

1000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

512 34159 0.1795E-01 0.3861 2945. 2983.

0.2823E+05 67.33 / 17 Constant 1189. 12.28 Mean -0.1051E-01 0.2075E-02 Sigma 0.1896 0.3001E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

612 34159 1.147 1.925 158.0 223.0 0.3378E+05 98.78 / 16 Constant 2762. 21.47 Mean 1.224 0.7040E-02 Sigma 1.098 0.6841E-02

cm counts

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

712 34159 0.1515E-01 0.3811 2208. 2071.

0.2988E+05 59.93 / 11 Constant 1593. 17.35 Mean -0.1229E-01 0.1450E-02 Sigma 0.1283 0.2079E-02

cm counts

0 1000

2000

3000

4000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

812 34159 0.2656E-01 0.3271 703.0 880.0 0.3258E+05 290.1 / 5 Constant 3502. 37.78 Mean 0.1069E-01 0.4794E-03 Sigma 0.5291E-01 0.5635E-03

cm counts

Residuals on Drift Chambers

0

500

1000

1500

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

521 36382 -0.5755E-02 0.3942 3607. 3647.

0.2913E+05 209.3 / 17 Constant 1451. 14.02 Mean 0.7799E-02 0.1356E-02 Sigma 0.1505 0.1554E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

621 36382 1.089 2.246 650.0 459.0 0.3527E+05 168.1 / 16 Constant 2600. 20.58 Mean 1.191 0.7878E-02 Sigma 1.190 0.8279E-02

cm counts

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

721 36382 0.7124E-02 0.4098 2647. 2487.

0.3125E+05 355.9 / 11 Constant 1878. 19.06 Mean -0.1106E-01 0.1190E-02 Sigma 0.1161 0.1511E-02

cm counts

0

2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

821 36382 0.5307E-02 0.3193 1214. 1213.

0.3396E+05 2999. / 5 Constant 0.1224E+05 108.9 Mean -0.5099E-03 0.1160E-03 Sigma 0.1655E-01 0.9009E-04

cm counts

Residuals on Drift Chambers

0 500 1000

1500

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

522 40716 0.9880E-02 0.3815 3111. 3097.

0.3451E+05 52.29 / 17 Constant 1944. 16.57 Mean -0.8009E-02 0.1028E-02 Sigma 0.1355 0.1080E-02

cm counts

0

1000

2000

3000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

622 40716 0.9629 2.132 271.0 511.0 0.3993E+05 80.83 / 16 Constant 2705. 20.20 Mean 1.061 0.8685E-02 Sigma 1.311 0.9499E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

722 40716 0.9194E-02 0.3933 2210. 1660.

0.3685E+05 314.9 / 11 Constant 2466. 22.35 Mean -0.7149E-02 0.8813E-03 Sigma 0.1056 0.1066E-02

cm counts

0 2500

5000

7500

10000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

822 40716 0.5572E-02 0.3220 771.0 776.0 0.3917E+05 4264. / 5 Constant 0.1323E+05 111.6 Mean 0.1322E-03 0.1171E-03 Sigma 0.1760E-01 0.9348E-04

cm counts

Residuals on OSIM

0

1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

51 72028 -0.2899E-01

0.3006 1106. 1101.

0.6982E+05 346.6 / 14 Constant 3677. 24.84 Mean -0.4180E-01 0.6586E-03 Sigma 0.1018 0.7742E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

61 72028 -0.5139E-02 0.3413 5697. 4948.

0.6138E+05 140.0 / 13 Constant 2830. 22.21 Mean 0.1081E-02 0.7705E-03 Sigma 0.1045 0.1022E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

71 72028 -0.1947E-01

0.2497 488.0 527.0 0.7101E+05 2630. / 16 Constant 4674. 33.43 Mean -0.1992E-01 0.4526E-03 Sigma 0.8680E-01 0.6103E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

81 72028 0.2272E-01 0.2024 284.0 433.0 0.7131E+05 2063. / 3 Constant 0.1021E+05 78.05 Mean 0.3904E-02 0.1940E-03 Sigma 0.3058E-01 0.2280E-03

cm counts

Residuals on OSIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

52 72619 -0.9714E-01

0.3010 1377. 915.0 0.7033E+05 900.2 / 14 Constant 3879. 27.30 Mean -0.1086 0.5995E-03 Sigma 0.9509E-01 0.7355E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

62 72619 -0.2201E-01 0.3430 6147. 5213.

0.6126E+05 169.5 / 13 Constant 2732. 21.71 Mean -0.2100E-01 0.8806E-03 Sigma 0.1092 0.1178E-02

cm counts

0

2000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

72 72619 0.7248E-01

0.2549 429.0 577.0 0.7161E+05 1214. / 16 Constant 4531. 29.42 Mean 0.7191E-01 0.4883E-03 Sigma 0.9195E-01 0.5690E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

82 72619 0.2973E-02 0.2081 319.0 477.0 0.7182E+05 671.4 / 3 Constant 7921. 63.58 Mean 0.3817E-02 0.2595E-03 Sigma 0.3678E-01 0.3461E-03

cm counts

Residuals on ISIM

0

1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

31 78130 0.1324E-01

0.3195 2133. 2176.

0.7382E+05 368.0 / 15 Constant 3469. 23.25 Mean 0.2324E-01 0.7751E-03 Sigma 0.1135 0.9337E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

41 78132 -0.6806E-02 0.3498 6512. 5606.

0.6601E+05 126.4 / 13 Constant 2925. 22.50 Mean -0.2917E-02 0.7769E-03 Sigma 0.1062 0.1043E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

11 78134 -0.1883E-02

0.2615 929.0 1032.

0.7617E+05 1118. / 11 Constant 5119. 34.60 Mean -0.5500E-02 0.4543E-03 Sigma 0.7820E-01 0.5684E-03

cm counts

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

21 78130 0.2716E-01 0.2316 937.0 1303.

0.7589E+05 1096. / 10 Constant 6069. 39.25 Mean 0.1633E-01 0.3556E-03 Sigma 0.6715E-01 0.4132E-03

cm counts

Residuals on ISIM

0 1000

2000

3000

4000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

32 79915 0.8074E-01

0.3219 2204. 2855.

0.7486E+05 714.9 / 15 Constant 3668. 25.18 Mean 0.9089E-01 0.6408E-03 Sigma 0.1043 0.7957E-03

cm counts

0

1000

2000

3000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

42 79916 -0.1853E-01 0.3528 7169. 5964.

0.6678E+05 161.2 / 13 Constant 2869. 22.26 Mean -0.1587E-01 0.8414E-03 Sigma 0.1093 0.1145E-02

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

12 79917 0.5565E-01

0.2694 983.0 1303.

0.7763E+05 690.6 / 11 Constant 4873. 32.19 Mean 0.5448E-01 0.5802E-03 Sigma 0.8500E-01 0.6871E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

22 79915 -0.5554E-02 0.2381 1343. 1510.

0.7706E+05 527.1 / 10 Constant 5012. 32.00 Mean -0.2589E-03 0.5496E-03 Sigma 0.8673E-01 0.7027E-03

cm counts