Residuals on Drift Chambers

0

1000

2000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

501 66899 -0.8163E-02 0.3964 6102. 6133.

0.5466E+05 163.9 / 17 Constant 2443. 18.12 Mean -0.1666E-01 0.1206E-02 Sigma 0.1650 0.1537E-02

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

601 66899 1.068 2.018 420.0 1610.

0.6487E+05 326.5 / 16 Constant 5281. 30.19 Mean 1.116 0.5030E-02 Sigma 1.087 0.5005E-02

cm counts

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

701 66899 0.2130E-01 0.3891 4425. 4274.

0.5820E+05 205.3 / 11 Constant 3330. 25.95 Mean -0.2564E-02 0.8540E-03 Sigma 0.1115 0.1074E-02

cm counts

0

2000

4000

6000

8000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

801 66899 0.2297E-01 0.3321 1580. 1821.

0.6350E+05 882.8 / 5 Constant 6851. 54.10 Mean 0.3151E-02 0.3242E-03 Sigma 0.5078E-01 0.3783E-03

cm counts

Residuals on Drift Chambers

0

1000

2000

3000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

502 77098 0.2723E-02 0.3874 6718. 6744.

0.6364E+05 164.9 / 17 Constant 3394. 21.62 Mean -0.1321E-02 0.8238E-03 Sigma 0.1420 0.8944E-03

cm counts

0

2000

4000

6000

-12.5 0 12.5

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

602 77098 1.022 2.187 921.0 970.0 0.7521E+05 236.6 / 16 Constant 5292. 28.76 Mean 1.125 0.5864E-02 Sigma 1.254 0.6294E-02

cm counts

0

2000

4000

6000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

702 77098 0.8244E-02 0.4010 4857. 4147.

0.6809E+05 518.9 / 11 Constant 4352. 29.28 Mean -0.8697E-02 0.7119E-03 Sigma 0.1103 0.8768E-03

cm counts

0 5000

10000

15000

20000

-1.25 0 1.25

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

802 77098 0.5449E-02 0.3208 1985. 1989.

0.7312E+05 7259. / 5 Constant 0.2544E+05 155.6 Mean -0.1753E-03 0.8248E-04 Sigma 0.1711E-01 0.6491E-04

cm counts

Residuals on OSIM

0

2000

4000

6000

8000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

53 144647 -0.6319E-01

0.3027 2483. 2016.

0.1401E+06 360.6 / 14 Constant 7121. 34.01 Mean -0.7625E-01 0.4729E-03 Sigma 0.1064 0.5875E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

63 144647 -0.1357E-01 0.3423 0.1184E+05 0.1016E+05 0.1226E+06 254.0 / 13 Constant 5536. 30.94 Mean -0.9548E-02 0.5782E-03 Sigma 0.1073 0.7803E-03

cm counts

0

2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

73 144647 0.2670E-01

0.2565 917.0 1104.

0.1426E+06 527.9 / 16 Constant 8156. 35.20 Mean 0.2577E-01 0.4027E-03 Sigma 0.1060 0.4517E-03

cm counts

0

5000

10000

15000

20000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

83 144647 0.1281E-01 0.2055 603.0 910.0 0.1431E+06 1631. / 3 Constant 0.1835E+05 99.42 Mean 0.4147E-02 0.1515E-03 Sigma 0.3329E-01 0.1883E-03

cm counts

Residuals on ISIM

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

33 158045 0.4723E-01

0.3224 4337. 5031.

0.1487E+06 253.9 / 15 Constant 6809. 32.13 Mean 0.5844E-01 0.5172E-03 Sigma 0.1158 0.6572E-03

cm counts

0

2000

4000

6000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

43 158048 -0.1270E-01 0.3514 0.1368E+05 0.1157E+05 0.1328E+06 258.7 / 13 Constant 5786. 31.61 Mean -0.9235E-02 0.5705E-03 Sigma 0.1079 0.7745E-03

cm counts

0 2500

5000

7500

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

13 158051 0.2716E-01

0.2671 1912. 2335.

0.1538E+06 463.9 / 11 Constant 9420. 43.34 Mean 0.2295E-01 0.3784E-03 Sigma 0.8815E-01 0.4771E-03

cm counts

0

5000

10000

-1 0 1

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

23 158045 0.1068E-01 0.2355 2280. 2813.

0.1530E+06 690.7 / 10 Constant 0.1112E+05 50.33 Mean 0.9254E-02 0.2994E-03 Sigma 0.7548E-01 0.3637E-03

cm counts