RUN n. ______ OPERATORS ______________

______________

Start date ____________ Start time ___________ (from fndrun) Stop date ____________ Stop time ___________ (from fndrun)

File name ____ _____ .raw

Recording directory on fndrun (check the box) [] /data [] other : ......... N. of asked events ______________________________ N. of collected events ___________________________

Active detectors (check the box): TOF [] tof[] LMD [] STB [] ISIM-OSIM []

Trigger (check the box) COSMIC RAYS [] LASER [] PULSER [] Other _______

Magnet Status (check the box): on [] off []

TOF: switched off PMs _______________________________ PMs HV [V](variations) ________________________ thresholds [mV] (variations) ________________________

tof: switched off BIAS ____________________________ HV e+__________ HV e- ______________

LMD: mixture flux [l/h] ________ He flux [l/h] ________ C4H10 flux [l/h]______

HV+[V]: work value ________ variations ___________ HV- [V]: work value ________ variations ___________

Straw flow [l/h] __________ Delta f [l/h] _____________ Straw HV [V] ___________ Straw thresholds [mV] ____________________________

Notes __________________________________________ ________________________________________________ ________________________________________________ ________________________________________________ ________________________________________________ ________________________________________________