\parskip= 4pt plus 1pt
\textwidth=15.0cm
\textheight=23.0cm
\oddsidemargin=0.4in
\evensidemargin=0.4in
\headsep=0.1mm
\topmargin=0.001in
\date { }
%
\def\DAFNE{$DA\Phi NE$ }
\def\FI{$\phi$}
\def\ee{$\,e^+e^-\,$}
