1,0E-09

1,0E-08

1,0E-07

1,0E-06

1,0E-05

1,0E-04 10.19 10.33 10.48 11.02 11.16 11.31 11.45 12.00

Leak ON

Leak ON

Leak OFF

Leak OFF

Gas IN

Leak (mbar l/s)

Time (hour)

Gas MIX Ar/CO2/He=89/10/1 P = 3 bar