Tube Cleaning

1,0E-09

1,0E-08

1,0E-07

1,0E-06

1,0E-05 10.19 10.48 11.16 11.45 12.14 12.43 13.12 13.40 14.09

Leak (mbar l/s)

Time (hour)

Empty tube connected to the vacuum pump